30 0 1 0.0105 49 1 1 0.0117 55 2 1 0.0121 57 3 1 0.0125 62 4 1 0.0132 65 5 1 0.0138 68 6 1 0.0145 72 7 1 0.0150 70 8 1 0.0156 37 0 2 0.0108 51 1 2 0.0115 56 2 2 0.0118 57 3 2 0.0125 66 4 2 0.0138 69 5 2 0.0146 73 6 2 0.0154 76 7 2 0.0160 78 8 2 0.0167 43 0 3 0.0110 52 1 3 0.0114 45 2 3 0.0104 48 3 3 0.0107 63 4 3 0.0138 72 5 3 0.0151 75 6 3 0.0160 80 7 3 0.0170 82 8 3 0.0173 49 0 4 0.0118 50 1 4 0.0114 38 2 4 0.00920 41 3 4 0.0100 63 4 4 0.0138 72 5 4 0.0159 79 6 4 0.0172 84 7 4 0.0180 86 8 4 0.0182 59 0 5 0.0136 56 1 5 0.0125 46 2 5 0.0102 37 3 5 0.00925 65 4 5 0.0145 82 5 5 0.0176 92 6 5 0.0196 97 7 5 0.0205 95 8 5 0.0207 33 0 6 0.00839 35 1 6 0.00833 41 2 6 0.00976 40 3 6 0.00989 75 4 6 0.0164 99 5 6 0.0209 111 6 6 0.0235 116 7 6 0.0244 114 8 6 0.0239 27 0 7 0.00667 21 1 7 0.00548 27 2 7 0.00667 24 3 7 0.00613 52 4 7 0.0116 92 5 7 0.0200 146 6 7 0.0307 153 7 7 0.0322 138 8 7 0.0291 33 0 8 0.00756 41 1 8 0.0110 87 2 8 0.0304 28 3 8 0.00707 127 4 8 0.0396 122 5 8 0.0742 63 6 8 0.0236 65 7 8 0.0200 110 8 8 0.0244 12 0 9 0.00831 55 1 9 0.0522 148 2 9 0.0985 38 3 9 0.0111 306 4 9 0.0981 116 5 9 0.0350 29 6 9 0.0128 36 7 9 0.0160 31 8 9 0.00845 3 0 10 0.00234 7 1 10 0.00323 17 2 10 0.00536 9 3 10 0.00367 16 4 10 0.00535 8 5 10 0.00399 0 6 10 0.00214 2 7 10 0.00559 13 8 10 0.00497 0 0 11 0.00184 3 1 11 0.00205 0 2 11 0.00155 0 3 11 0.00200 1 4 11 0.00206 0 5 11 0.00180 0 6 11 0.00157 0 7 11 0.00124 0 8 11 0.00195 0 0 12 0.00152 2 1 12 0.00184 0 2 12 0.00149 0 3 12 0.00173 0 4 12 0.00152 0 5 12 0.00155 0 6 12 0.00138 0 7 12 0.00120 0 8 12 0.00120 0 0 13 0.00120 0 1 13 0.00136 0 2 13 0.00124 0 3 13 0.00130 0 4 13 0.00129 0 5 13 0.00155 0 6 13 0.00129 0 7 13 0.00153 0 8 13 0.00136 0 0 14 0.00129 0 1 14 9.80E-4 0 2 14 9.31E-4 0 3 14 7.96E-4 0 4 14 9.72E-4 0 5 14 9.37E-4 0 6 14 9.80E-4 0 7 14 9.68E-4 0 8 14 8.55E-4 0 9 14 9.10E-4 4.00E-5

6.34E-5

1.00E-4

1.59E-4

2.52E-4

4.00E-4

6.34E-4

0.00100

0.00159

0.00252

0.00400

0.00634

0.0100

0.0159

0.0252

0.0400

0.0634

0.100

0.159

0.252

0.400

0.634

1.00

1.59

2.52

4.00

6.34

10.0

15.9

25.2

40.0

63.4 100 159 252 400 634 1.00E3

1.59E3

2.52E3

4.00E3

6.34E3

1.00E4

1.59E4

2.52E4