0 0 1 0.00316 0 1 1 0.00255 0 2 1 9.62E-4 0 3 1 5.75E-4 0 4 1 0.00127 0 5 1 0.00186 0 6 1 5.97E-4 0 7 1 0.00143 0 8 1 0.00197 0 9 1 0.00568 0 0 2 -6.13E-5 0 1 2 2.14E-4 0 2 2 0.00107 0 3 2 0.00157 0 4 2 0.00274 0 5 2 0.00114 0 6 2 0.00152 0 7 2 0.00219 0 8 2 0.00240 0 9 2 0.00478 0 0 3 -0.00207 0 1 3 -0.00288 0 2 3 -0.00343 0 3 3 -0.00208 0 4 3 -0.00279 0 5 3 -0.00171 0 6 3 -5.26E-4 0 7 3 -0.00331 0 8 3 -2.97E-4 0 9 3 -3.69E-4 0 0 4 -0.00241 0 1 4 -0.00320 0 2 4 -0.00373 0 3 4 -0.00206 0 4 4 -0.00260 0 5 4 -0.00201 0 6 4 -0.00260 0 7 4 -0.00150 0 8 4 -0.00110 0 9 4 -8.83E-4 0 0 5 -0.00332 0 1 5 -0.00325 0 2 5 -0.00408 0 3 5 -0.00371 0 4 5 -0.00395 0 5 5 -0.00220 0 6 5 -0.00292 0 7 5 -0.00313 0 8 5 -0.00348 0 9 5 -0.00216 0 0 6 -0.00498 0 1 6 -0.00389 0 2 6 -0.00258 0 3 6 -0.00306 0 4 6 -0.00266 0 5 6 -0.00163 0 6 6 -0.00199 0 7 6 -0.00261 0 8 6 -0.00260 0 9 6 -0.00373 0 0 7 6.21E-4 0 1 7 0.00108 0 2 7 -0.00142 0 3 7 -0.00105 0 4 7 0.00123 0 5 7 5.49E-4 0 6 7 -5.95E-4 0 7 7 8.52E-4 0 8 7 0.00141 0 9 7 7.27E-4 0 0 8 0.00484 0 1 8 0.00264 0 2 8 0.00308 0 3 8 0.00312 0 4 8 0.00282 0 5 8 0.00368 0 6 8 0.00355 0 7 8 0.00360 0 8 8 0.00287 0 9 8 0.00369 0 0 9 -1.32E-4 0 1 9 -5.56E-4 0 2 9 2.06E-4 0 3 9 -4.14E-4 0 4 9 -2.46E-4 0 5 9 3.66E-4 0 6 9 0.00205 0 7 9 -7.58E-5 0 8 9 2.15E-4 0 9 9 -5.45E-4 0 0 10 5.07E-4 0 1 10 -1.16E-5 0 2 10 5.27E-4 0 3 10 -3.61E-4 0 4 10 -0.00101 0 5 10 -8.70E-4 0 6 10 -7.75E-4 0 7 10 2.06E-4 0 8 10 -4.01E-4 0 9 10 5.80E-4 0 0 11 -0.00297 0 1 11 -0.00382 0 2 11 -0.00408 0 3 11 -0.00424 0 4 11 -0.00281 0 5 11 -0.00331 0 6 11 -5.51E-4 0 7 11 -0.00341 0 8 11 -0.00234 0 9 11 -0.00274 0 0 12 0.00132 0 1 12 -0.00147 0 2 12 8.69E-5 0 3 12 -0.00132 0 4 12 -0.00134 0 5 12 0.00223 0 6 12 -2.66E-4 0 7 12 -0.00124 0 8 12 -0.00104 0 9 12 6.10E-4 0 0 13 5.03E-4 0 1 13 -0.00241 0 2 13 -0.00140 0 3 13 -8.33E-5 0 4 13 -0.00249 0 5 13 -0.00242 0 6 13 -0.00155 0 7 13 -0.00128 0 8 13 -5.47E-4 0 9 13 2.15E-4 0 0 14 0.00403 0 1 14 0.00112 0 2 14 0.00109 0 3 14 3.84E-5 0 4 14 -0.00102 0 5 14 -2.04E-4 0 6 14 7.25E-5 0 7 14 6.79E-4 0 8 14 0.00153 0 9 14 0.00279