0 0 1 0.00356 0 1 1 0.00399 0 2 1 0.00302 0 3 1 0.00223 0 4 1 0.00247 0 5 1 0.00241 0 6 1 0.00146 0 7 1 0.00136 0 8 1 0.00355 0 9 1 0.00524 0 0 2 -0.00167 0 1 2 -6.17E-4 0 2 2 4.32E-4 0 3 2 9.09E-5 0 4 2 7.82E-4 0 5 2 -0.00107 0 6 2 7.60E-4 0 7 2 8.06E-4 0 8 2 8.31E-4 0 9 2 0.00274 0 0 3 -0.00293 0 1 3 -0.00381 0 2 3 -0.00194 0 3 3 -0.00164 0 4 3 -0.00274 0 5 3 -0.00258 0 6 3 -0.00236 0 7 3 -0.00243 0 8 3 -5.00E-4 0 9 3 -0.00209 0 0 4 -0.00167 0 1 4 -0.00279 0 2 4 -0.00273 0 3 4 -0.00276 0 4 4 -0.00264 0 5 4 -0.00220 0 6 4 -0.00245 0 7 4 -0.00125 0 8 4 -9.17E-4 0 9 4 -0.00143 0 0 5 -0.00184 0 1 5 -0.00268 0 2 5 -0.00336 0 3 5 -0.00242 0 4 5 -0.00261 0 5 5 -0.00247 0 6 5 -0.00168 0 7 5 -0.00200 0 8 5 -0.00230 0 9 5 -0.00107 0 0 6 -0.00336 0 1 6 -0.00401 0 2 6 -0.00408 0 3 6 -0.00178 0 4 6 -0.00201 0 5 6 -0.00148 0 6 6 -0.00204 0 7 6 -0.00283 0 8 6 -0.00202 0 9 6 -0.00326 0 0 7 0.00186 0 1 7 1.67E-4 0 2 7 1.51E-4 0 3 7 -0.00101 0 4 7 8.54E-4 0 5 7 6.18E-4 0 6 7 2.13E-4 0 7 7 8.66E-4 0 8 7 0.00172 0 9 7 0.00141 0 0 8 0.00480 0 1 8 0.00181 0 2 8 0.00248 0 3 8 0.00329 0 4 8 0.00176 0 5 8 0.00184 0 6 8 0.00313 0 7 8 0.00355 0 8 8 0.00241 0 9 8 0.00412 0 0 9 2.98E-4 0 1 9 -0.00243 0 2 9 -7.69E-4 0 3 9 -0.00145 0 4 9 -0.00160 0 5 9 -0.00124 0 6 9 -2.85E-4 0 7 9 -0.00103 0 8 9 -4.35E-4 0 9 9 -0.00101 0 0 10 -8.36E-4 0 1 10 -0.00146 0 2 10 -0.00288 0 3 10 -0.00213 0 4 10 -0.00250 0 5 10 -0.00120 0 6 10 -0.00129 0 7 10 -0.00197 0 8 10 -0.00119 0 9 10 -0.00110 0 0 11 3.17E-4 0 1 11 -0.00160 0 2 11 -0.00166 0 3 11 -0.00283 0 4 11 -0.00120 0 5 11 -0.00293 0 6 11 -4.51E-4 0 7 11 -0.00142 0 8 11 -0.00139 0 9 11 9.12E-5 0 0 12 0.00269 0 1 12 -5.54E-4 0 2 12 -1.98E-4 0 3 12 -8.20E-7 0 4 12 3.02E-4 0 5 12 0.00247 0 6 12 1.16E-4 0 7 12 3.44E-4 0 8 12 -1.47E-4 0 9 12 0.00108 0 0 13 0.00340 0 1 13 0.00148 0 2 13 0.00167 0 3 13 0.00131 0 4 13 2.81E-4 0 5 13 3.06E-4 0 6 13 -4.01E-4 0 7 13 -1.19E-4 0 8 13 9.08E-4 0 9 13 0.00201 0 0 14 0.00248 0 1 14 -1.98E-4 0 2 14 -5.94E-4 0 3 14 -0.00105 0 4 14 -0.00251 0 5 14 -0.00144 0 6 14 -0.00189 0 7 14 -9.69E-4 0 8 14 0.00156 0 9 14 0.00122