2 0 1 5.35E-6 4 1 1 2.00E-5 30 2 1 0.00106 80 3 1 0.00170 71 4 1 0.00160 27 5 1 6.80E-4 4 6 1 2.36E-5 2 7 1 5.65E-6 3 0 2 8.76E-6 32 1 2 8.92E-4 523 2 2 0.00360 380 3 2 0.00277 338 4 2 0.00243 369 5 2 0.00258 30 6 2 7.71E-4 4 7 2 1.43E-5 5 0 3 2.68E-5 167 1 3 0.00250 425 2 3 0.00308 317 3 3 0.00226 295 4 3 0.00210 324 5 3 0.00232 413 6 3 0.00287 8 7 3 5.10E-5 6 0 4 2.84E-5 567 1 4 0.00326 449 2 4 0.00322 345 3 4 0.00246 318 4 4 0.00227 358 5 4 0.00257 513 6 4 0.00416 8 7 4 5.40E-5 4 0 5 1.83E-5 35 1 5 8.16E-4 598 2 5 0.00411 484 3 5 0.00353 449 4 5 0.00327 526 5 5 0.00388 155 6 5 0.00256 5 7 5 2.98E-5 2 0 6 4.93E-6 6 1 6 4.83E-5 63 2 6 0.00194 844 3 6 0.00577 834 4 6 0.00611 767 5 6 0.00444 7 6 6 1.89E-4 2 7 6 3.07E-6