4 0 1 2.04E-5 4 1 1 1.51E-5 4 2 1 1.76E-5 4 3 1 2.40E-5 4 4 1 2.89E-5 9 5 1 1.07E-4 20 6 1 2.13E-4 52 7 1 8.78E-4 153 8 1 0.00165 41 9 1 5.75E-4 13 10 1 1.13E-4 7 11 1 4.79E-5 4 12 1 2.55E-5 3 13 1 1.23E-5 2 14 1 -1.23E-6 1 15 1 -1.61E-5 5 0 2 2.08E-5 4 1 2 1.72E-5 5 2 2 2.66E-5 5 3 2 6.00E-5 24 4 2 6.85E-4 58 5 2 0.00141 541 6 2 0.00502 491 7 2 0.00470 347 8 2 0.00481 134 9 2 0.00235 70 10 2 7.84E-4 24 11 2 2.62E-4 5 12 2 4.24E-5 3 13 2 9.86E-6 2 14 2 -3.06E-6 -1 15 2 -2.02E-5 4 0 3 2.67E-5 3 1 3 3.33E-5 5 2 3 5.19E-5 59 3 3 0.00141 292 4 3 0.00401 508 5 3 0.00484 564 6 3 0.00712 549 7 3 0.00694 553 8 3 0.00697 568 9 3 0.00712 522 10 3 0.00442 59 11 3 8.18E-4 36 12 3 6.69E-4 3 13 3 2.98E-5 1 14 3 8.39E-6 -3 15 3 -1.63E-5 2 0 4 1.84E-5 3 1 4 3.34E-5 17 2 4 2.52E-4 482 3 4 0.00486 569 4 4 0.00712 514 5 4 0.00652 466 6 4 0.00593 438 7 4 0.00562 441 8 4 0.00565 470 9 4 0.00601 523 10 4 0.00667 515 11 4 0.00441 164 12 4 0.00147 18 13 4 4.87E-4 2 14 4 1.80E-5 -3 15 4 -1.21E-5 2 0 5 2.08E-5 3 1 5 3.92E-5 56 2 5 7.55E-4 562 3 5 0.00606 533 4 5 0.00668 447 5 5 0.00565 401 6 5 0.00498 377 7 5 0.00466 378 8 5 0.00471 403 9 5 0.00507 456 10 5 0.00581 547 11 5 0.00689 81 12 5 0.00202 135 13 5 0.00179 2 14 5 2.45E-5 -5 15 5 -2.39E-5 0 0 6 2.21E-5 4 1 6 7.43E-5 113 2 6 0.00334 613 3 6 0.00742 498 4 6 0.00628 410 5 6 0.00515 361 6 6 0.00442 338 7 6 0.00412 340 8 6 0.00415 368 9 6 0.00455 423 10 6 0.00535 529 11 6 0.00669 610 12 6 0.00617 50 13 6 0.00141 1 14 6 3.64E-5 -8 15 6 -2.62E-5 2 0 7 2.82E-5 7 1 7 1.07E-4 138 2 7 0.00321 642 3 7 0.00745 523 4 7 0.00653 423 5 7 0.00527 364 6 7 0.00447 337 7 7 0.00414 340 8 7 0.00415 371 9 7 0.00459 437 10 7 0.00551 555 11 7 0.00699 699 12 7 0.00845 38 13 7 0.00138 2 14 7 4.25E-5 -8 15 7 -3.14E-5 2 0 8 1.80E-5 8 1 8 6.62E-5 144 2 8 0.00315 677 3 8 0.00643 623 4 8 0.00765 500 5 8 0.00621 429 6 8 0.00528 396 7 8 0.00488 401 8 8 0.00492 439 9 8 0.00546 524 10 8 0.00653 666 11 8 0.00821 761 12 8 0.00730 24 13 8 3.54E-4 1 14 8 2.75E-5 -8 15 8 -4.30E-5 1 0 9 9.54E-6 6 1 9 5.09E-5 111 2 9 0.00180 390 3 9 0.00681 838 4 9 0.00995 686 5 9 0.00832 593 6 9 0.00724 549 7 9 0.00674 556 8 9 0.00682 613 9 9 0.00750 722 10 9 0.00885 773 11 9 0.00709 46 12 9 0.00237 14 13 9 1.54E-4 -2 14 9 6.71E-6 -9 15 9 -4.54E-5 1 0 10 8.57E-6 5 1 10 3.43E-5 34 2 10 4.33E-4 158 3 10 0.00169

1025 4 10 0.00878

1055 5 10 0.0124 933 6 10 0.0112 882 7 10 0.0106 891 8 10 0.0107 976 9 10 0.0116

1085 10 10 0.0124 142 11 10 0.00496 25 12 10 3.17E-4 4 13 10 5.93E-5 -1 14 10 1.83E-6 -6 15 10 -3.71E-5 0 0 11 1.68E-5 2 1 11 3.02E-5 6 2 11 5.21E-5 26 3 11 3.40E-4 52 4 11 7.67E-4 79 5 11 0.00496

1293 6 11 0.0113

1530 7 11 0.0173

1537 8 11 0.0173

1456 9 11 0.0137 48 10 11 0.00351 28 11 11 4.81E-4 10 12 11 1.58E-4 1 13 11 2.58E-5 -1 14 11 5.53E-6 -3 15 11 -1.60E-5 0 0 12 -6.09E-6 1 1 12 1.75E-6 2 2 12 1.74E-5 3 3 12 2.77E-5 13 4 12 1.99E-4 47 5 12 6.32E-4 63 6 12 6.85E-4 95 7 12 0.00541 61 8 12 0.00488 37 9 12 5.09E-4 29 10 12 5.11E-4 9 11 12 1.39E-4 2 12 12 1.73E-5 1 13 12 5.61E-6 0 14 12 -7.66E-6 -1 15 12 -1.29E-5