10 0 1 5.43E-5 8 1 1 3.77E-5 7 2 1 2.74E-5 7 3 1 3.17E-5 5 4 1 3.17E-5 10 5 1 1.14E-4 23 6 1 2.45E-4 48 7 1 8.24E-4 126 8 1 0.00141 37 9 1 4.47E-4 17 10 1 1.32E-4 11 11 1 6.82E-5 7 12 1 4.72E-5 7 13 1 2.31E-5 4 14 1 1.39E-6 2 15 1 -6.30E-6 9 0 2 5.22E-5 8 1 2 3.63E-5 6 2 2 3.53E-5 8 3 2 7.08E-5 29 4 2 5.61E-4 33 5 2 0.00144 655 6 2 0.00647 641 7 2 0.00571 331 8 2 0.00525 114 9 2 0.00248 52 10 2 7.30E-4 28 11 2 3.16E-4 7 12 2 5.28E-5 4 13 2 1.83E-5 2 14 2 3.56E-6 1 15 2 -1.67E-5 7 0 3 4.55E-5 6 1 3 4.39E-5 6 2 3 6.06E-5 74 3 3 0.00177 326 4 3 0.00468 637 5 3 0.00619 658 6 3 0.00835 638 7 3 0.00813 643 8 3 0.00816 662 9 3 0.00835 611 10 3 0.00514 63 11 3 9.31E-4 44 12 3 8.66E-4 4 13 3 3.45E-5 2 14 3 6.00E-6 -1 15 3 -1.62E-5 4 0 4 1.57E-5 5 1 4 2.69E-5 20 2 4 2.86E-4 526 3 4 0.00541 665 4 4 0.00833 597 5 4 0.00760 539 6 4 0.00691 507 7 4 0.00653 512 8 4 0.00658 545 9 4 0.00701 610 10 4 0.00778 603 11 4 0.00512 184 12 4 0.00167 18 13 4 5.20E-4 1 14 4 2.81E-6 -3 15 4 -2.75E-5 3 0 5 1.67E-5 5 1 5 3.44E-5 54 2 5 9.90E-4 657 3 5 0.00702 620 4 5 0.00776 517 5 5 0.00657 458 6 5 0.00579 429 7 5 0.00541 432 8 5 0.00545 464 9 5 0.00589 527 10 5 0.00676 634 11 5 0.00805 91 12 5 0.00233 144 13 5 0.00197 1 14 5 9.52E-6 -4 15 5 -3.39E-5 2 0 6 1.42E-5 5 1 6 7.02E-5 142 2 6 0.00404 714 3 6 0.00871 578 4 6 0.00731 476 5 6 0.00600 411 6 6 0.00515 387 7 6 0.00477 388 8 6 0.00481 421 9 6 0.00529 489 10 6 0.00623 612 11 6 0.00780 715 12 6 0.00728 55 13 6 0.00160 3 14 6 2.22E-5 -6 15 6 -3.57E-5 1 0 7 5.73E-6 6 1 7 9.34E-5 127 2 7 0.00363 750 3 7 0.00878 606 4 7 0.00761 487 5 7 0.00611 415 6 7 0.00519 383 7 7 0.00479 389 8 7 0.00482 425 9 7 0.00534 503 10 7 0.00640 646 11 7 0.00818 815 12 7 0.00991 41 13 7 0.00156 1 14 7 2.06E-5 -8 15 7 -5.07E-5 1 0 8 3.01E-6 8 1 8 4.86E-5 169 2 8 0.00347 790 3 8 0.00749 726 4 8 0.00896 581 5 8 0.00722 494 6 8 0.00613 456 7 8 0.00566 461 8 8 0.00572 506 9 8 0.00634 605 10 8 0.00760 779 11 8 0.00964 884 12 8 0.00851 25 13 8 3.76E-4 0 14 8 9.31E-8 -8 15 8 -5.78E-5 1 0 9 -3.04E-6 5 1 9 3.94E-5 114 2 9 0.00191 416 3 9 0.00747 976 4 9 0.0117 802 5 9 0.00978 690 6 9 0.00847 637 7 9 0.00785 646 8 9 0.00796 709 9 9 0.00876 840 10 9 0.0104 900 11 9 0.00827 49 12 9 0.00270 14 13 9 1.64E-4 -2 14 9 -3.67E-6 -9 15 9 -5.40E-5 0 0 10 -8.49E-6 4 1 10 9.14E-6 33 2 10 4.53E-4 168 3 10 0.00183

1216 4 10 0.0104

1244 5 10 0.0146

1090 6 10 0.0131

1023 7 10 0.0124

1039 8 10 0.0125

1135 9 10 0.0136

1289 10 10 0.0146 165 11 10 0.00582 27 12 10 3.27E-4 3 13 10 4.45E-5 -1 14 10 -1.80E-5 -7 15 10 -5.25E-5 -1 0 11 -1.67E-5 1 1 11 -1.07E-6 4 2 11 2.21E-5 25 3 11 3.36E-4 54 4 11 7.81E-4 85 5 11 0.00591

1525 6 11 0.0133

1807 7 11 0.0204

1823 8 11 0.0205

1728 9 11 0.0161 50 10 11 0.00407 30 11 11 5.24E-4 9 12 11 1.52E-4 -1 13 11 -3.85E-6 -3 14 11 -2.25E-5 -5 15 11 -4.30E-5 -1 0 12 -1.19E-5 0 1 12 -5.57E-6 1 2 12 7.68E-6 2 3 12 2.35E-5 13 4 12 2.14E-4 50 5 12 6.83E-4 65 6 12 7.50E-4 103 7 12 0.00648 68 8 12 0.00590 41 9 12 5.89E-4 31 10 12 5.85E-4 8 11 12 1.53E-4 1 12 12 1.34E-5 0 13 12 9.76E-7 -1 14 12 -1.51E-5 -2 15 12 -2.41E-5