4 0 1 2.59E-5 4 1 1 2.26E-5 4 2 1 2.25E-5 4 3 1 2.68E-5 4 4 1 2.56E-5 9 5 1 6.31E-5 20 6 1 1.39E-4 52 7 1 7.87E-4 153 8 1 0.00154 41 9 1 5.38E-4 13 10 1 1.09E-4 7 11 1 4.38E-5 4 12 1 2.62E-5 3 13 1 1.84E-5 2 14 1 8.86E-6 1 15 1 3.47E-6 5 0 2 2.76E-5 4 1 2 2.58E-5 5 2 2 3.08E-5 5 3 2 3.87E-5 24 4 2 4.57E-4 58 5 2 8.94E-4 541 6 2 0.00309 491 7 2 0.00297 347 8 2 0.00319 134 9 2 0.00168 70 10 2 7.30E-4 24 11 2 1.90E-4 5 12 2 3.31E-5 3 13 2 1.90E-5 2 14 2 5.66E-6 -1 15 2 -7.88E-6 4 0 3 2.29E-5 3 1 3 1.72E-5 5 2 3 2.78E-5 59 3 3 9.16E-4 292 4 3 0.00249 508 5 3 0.00286 564 6 3 0.00400 549 7 3 0.00385 553 8 3 0.00388 568 9 3 0.00402 522 10 3 0.00266 59 11 3 6.98E-4 36 12 3 5.04E-4 3 13 3 1.85E-5 1 14 3 3.24E-6 -3 15 3 -2.31E-5 2 0 4 1.52E-5 3 1 4 1.57E-5 17 2 4 1.50E-4 482 3 4 0.00311 569 4 4 0.00413 514 5 4 0.00359 466 6 4 0.00319 438 7 4 0.00299 441 8 4 0.00302 470 9 4 0.00324 523 10 4 0.00366 515 11 4 0.00263 164 12 4 0.00121 18 13 4 4.43E-4 2 14 4 6.76E-6 -3 15 4 -2.40E-5 2 0 5 1.05E-5 3 1 5 2.04E-5 56 2 5 6.10E-4 562 3 5 0.00372 533 4 5 0.00375 447 5 5 0.00307 401 6 5 0.00271 377 7 5 0.00254 378 8 5 0.00255 403 9 5 0.00273 456 10 5 0.00313 547 11 5 0.00386 81 12 5 0.00133 135 13 5 0.00145 2 14 5 7.07E-6 -5 15 5 -2.98E-5 0 0 6 -1.51E-6 4 1 6 2.32E-5 113 2 6 0.00221 613 3 6 0.00445 498 4 6 0.00346 410 5 6 0.00280 361 6 6 0.00242 338 7 6 0.00226 340 8 6 0.00228 368 9 6 0.00247 423 10 6 0.00289 529 11 6 0.00369 610 12 6 0.00373 50 13 6 9.89E-4 1 14 6 3.06E-6 -8 15 6 -5.01E-5 2 0 7 1.11E-5 7 1 7 4.78E-5 138 2 7 0.00214 642 3 7 0.00445 523 4 7 0.00363 423 5 7 0.00287 364 6 7 0.00245 337 7 7 0.00227 340 8 7 0.00227 371 9 7 0.00249 437 10 7 0.00298 555 11 7 0.00387 699 12 7 0.00511 38 13 7 9.61E-4 2 14 7 8.70E-6 -8 15 7 -5.99E-5 2 0 8 1.26E-5 8 1 8 5.24E-5 144 2 8 0.00333 677 3 8 0.00431 623 4 8 0.00437 500 5 8 0.00342 429 6 8 0.00290 396 7 8 0.00267 401 8 8 0.00269 439 9 8 0.00297 524 10 8 0.00359 666 11 8 0.00467 761 12 8 0.00455 24 13 8 2.47E-4 1 14 8 3.92E-6 -8 15 8 -5.72E-5 1 0 9 1.48E-6 6 1 9 3.59E-5 111 2 9 0.00202 390 3 9 0.00680 838 4 9 0.00598 686 5 9 0.00476 593 6 9 0.00406 549 7 9 0.00375 556 8 9 0.00379 613 9 9 0.00420 722 10 9 0.00504 773 11 9 0.00422 46 12 9 0.00153 14 13 9 9.49E-5 -2 14 9 -1.61E-5 -9 15 9 -6.37E-5 1 0 10 4.74E-6 5 1 10 3.23E-5 34 2 10 4.91E-4 158 3 10 0.00169

1025 4 10 0.00565

1055 5 10 0.00756 933 6 10 0.00657 882 7 10 0.00613 891 8 10 0.00623 976 9 10 0.00687

1085 10 10 0.00761 142 11 10 0.00323 25 12 10 2.21E-4 4 13 10 2.80E-5 -1 14 10 -7.66E-6 -6 15 10 -4.76E-5 0 0 11 -3.81E-7 2 1 11 1.50E-5 6 2 11 3.79E-5 26 3 11 3.29E-4 52 4 11 7.92E-4 79 5 11 0.00330

1293 6 11 0.00722

1530 7 11 0.0111

1537 8 11 0.0112

1456 9 11 0.00895 48 10 11 0.00236 28 11 11 3.33E-4 10 12 11 8.57E-5 1 13 11 5.42E-7 -1 14 11 -5.68E-6 -3 15 11 -2.43E-5 0 0 12 -1.45E-6 1 1 12 4.74E-6 2 2 12 1.05E-5 3 3 12 2.25E-5 13 4 12 1.71E-4 47 5 12 6.24E-4 63 6 12 6.15E-4 95 7 12 0.00425 61 8 12 0.00372 37 9 12 3.62E-4 29 10 12 3.35E-4 9 11 12 7.85E-5 2 12 12 1.17E-5 1 13 12 2.22E-6 0 14 12 6.12E-7 -1 15 12 -1.04E-5