10 0 1 5.69E-5 8 1 1 4.23E-5 7 2 1 3.22E-5 7 3 1 3.54E-5 5 4 1 2.52E-5 10 5 1 6.53E-5 23 6 1 1.58E-4 48 7 1 7.10E-4 126 8 1 0.00129 37 9 1 4.10E-4 17 10 1 1.22E-4 11 11 1 6.54E-5 7 12 1 4.30E-5 7 13 1 2.97E-5 4 14 1 1.24E-5 2 15 1 4.10E-7 9 0 2 5.00E-5 8 1 2 3.88E-5 6 2 2 3.49E-5 8 3 2 4.21E-5 29 4 2 3.60E-4 33 5 2 8.70E-4 655 6 2 0.00400 641 7 2 0.00354 331 8 2 0.00335 114 9 2 0.00167 52 10 2 6.26E-4 28 11 2 2.39E-4 7 12 2 3.16E-5 4 13 2 1.76E-5 2 14 2 1.74E-6 1 15 2 -9.08E-6 7 0 3 3.45E-5 6 1 3 3.08E-5 6 2 3 3.19E-5 74 3 3 0.00115 326 4 3 0.00297 637 5 3 0.00360 658 6 3 0.00467 638 7 3 0.00447 643 8 3 0.00451 662 9 3 0.00469 611 10 3 0.00307 63 11 3 7.75E-4 44 12 3 6.36E-4 4 13 3 1.45E-5 2 14 3 2.38E-6 -1 15 3 -2.06E-5 4 0 4 2.02E-5 5 1 4 2.17E-5 20 2 4 1.78E-4 526 3 4 0.00348 665 4 4 0.00482 597 5 4 0.00417 539 6 4 0.00371 507 7 4 0.00346 512 8 4 0.00349 545 9 4 0.00375 610 10 4 0.00427 603 11 4 0.00304 184 12 4 0.00133 18 13 4 4.60E-4 1 14 4 -7.16E-7 -3 15 4 -3.04E-5 3 0 5 1.31E-5 5 1 5 2.29E-5 54 2 5 7.46E-4 657 3 5 0.00428 620 4 5 0.00434 517 5 5 0.00354 458 6 5 0.00310 429 7 5 0.00289 432 8 5 0.00291 464 9 5 0.00314 527 10 5 0.00362 634 11 5 0.00448 91 12 5 0.00152 144 13 5 0.00156 1 14 5 -6.28E-6 -4 15 5 -3.57E-5 2 0 6 6.47E-6 5 1 6 2.40E-5 142 2 6 0.00266 714 3 6 0.00520 578 4 6 0.00402 476 5 6 0.00322 411 6 6 0.00275 387 7 6 0.00258 388 8 6 0.00259 421 9 6 0.00282 489 10 6 0.00332 612 11 6 0.00428 715 12 6 0.00439 55 13 6 0.00113 3 14 6 4.08E-6 -6 15 6 -4.71E-5 1 0 7 1.10E-6 6 1 7 4.19E-5 127 2 7 0.00242 750 3 7 0.00519 606 4 7 0.00419 487 5 7 0.00330 415 6 7 0.00278 383 7 7 0.00258 389 8 7 0.00259 425 9 7 0.00285 503 10 7 0.00342 646 11 7 0.00451 815 12 7 0.00594 41 13 7 0.00108 1 14 7 -5.21E-6 -8 15 7 -6.65E-5 1 0 8 1.90E-6 8 1 8 4.26E-5 169 2 8 0.00350 790 3 8 0.00491 726 4 8 0.00508 581 5 8 0.00397 494 6 8 0.00333 456 7 8 0.00306 461 8 8 0.00310 506 9 8 0.00343 605 10 8 0.00414 779 11 8 0.00545 884 12 8 0.00527 25 13 8 2.57E-4 0 14 8 -9.64E-6 -8 15 8 -6.25E-5 1 0 9 -3.79E-6 5 1 9 2.72E-5 114 2 9 0.00205 416 3 9 0.00717 976 4 9 0.00697 802 5 9 0.00555 690 6 9 0.00473 637 7 9 0.00435 646 8 9 0.00442 709 9 9 0.00485 840 10 9 0.00585 900 11 9 0.00491 49 12 9 0.00175 14 13 9 9.76E-5 -2 14 9 -2.60E-5 -9 15 9 -6.76E-5 0 0 10 -6.58E-6 4 1 10 2.04E-5 33 2 10 5.22E-4 168 3 10 0.00179

1216 4 10 0.00670

1244 5 10 0.00890

1090 6 10 0.00769

1023 7 10 0.00715

1039 8 10 0.00729

1135 9 10 0.00803

1289 10 10 0.00897 165 11 10 0.00379 27 12 10 2.37E-4 3 13 10 1.67E-5 -1 14 10 -1.93E-5 -7 15 10 -5.55E-5 -1 0 11 -1.21E-5 1 1 11 1.66E-6 4 2 11 2.24E-5 25 3 11 3.30E-4 54 4 11 8.13E-4 85 5 11 0.00392

1525 6 11 0.00849

1807 7 11 0.0131

1823 8 11 0.0133

1728 9 11 0.0106 50 10 11 0.00273 30 11 11 3.67E-4 9 12 11 8.04E-5 -1 13 11 -1.60E-5 -3 14 11 -2.42E-5 -5 15 11 -3.93E-5 -1 0 12 -1.35E-5 0 1 12 -6.53E-6 1 2 12 7.81E-8 2 3 12 6.60E-6 13 4 12 1.78E-4 50 5 12 6.55E-4 65 6 12 6.49E-4 103 7 12 0.00508 68 8 12 0.00448 41 9 12 4.08E-4 31 10 12 3.65E-4 8 11 12 7.53E-5 1 12 12 1.00E-6 0 13 12 -5.83E-6 -1 14 12 -1.36E-5 -2 15 12 -2.14E-5