50 0 1 0.00219 54 1 1 0.00242 56 2 1 0.00250 56 3 1 0.00250 56 4 1 0.00252 57 5 1 0.00256 57 6 1 0.00265 57 7 1 0.00256 58 8 1 0.00262 58 9 1 0.00261 59 10 1 0.00264 58 11 1 0.00262 54 0 2 0.00240 56 1 2 0.00252 56 2 2 0.00253 56 3 2 0.00252 57 4 2 0.00264 57 5 2 0.00259 58 6 2 0.00267 58 7 2 0.00261 59 8 2 0.00269 59 9 2 0.00267 60 10 2 0.00270 60 11 2 0.00271 56 0 3 0.00251 57 1 3 0.00255 57 2 3 0.00254 57 3 3 0.00256 57 4 3 0.00258 58 5 3 0.00260 59 6 3 0.00267 60 7 3 0.00272 60 8 3 0.00273 60 9 3 0.00269 61 10 3 0.00272 62 11 3 0.00276 57 0 4 0.00257 58 1 4 0.00265 57 2 4 0.00258 57 3 4 0.00261 58 4 4 0.00263 58 5 4 0.00263 60 6 4 0.00269 62 7 4 0.00281 62 8 4 0.00283 61 9 4 0.00278 63 10 4 0.00283 63 11 4 0.00283 58 0 5 0.00267 58 1 5 0.00262 58 2 5 0.00264 58 3 5 0.00262 58 4 5 0.00264 60 5 5 0.00270 60 6 5 0.00275 62 7 5 0.00283 64 8 5 0.00295 63 9 5 0.00285 64 10 5 0.00289 65 11 5 0.00292 59 0 6 0.00265 59 1 6 0.00264 59 2 6 0.00266 59 3 6 0.00268 59 4 6 0.00267 60 5 6 0.00272 62 6 6 0.00281 64 7 6 0.00292 65 8 6 0.00299 65 9 6 0.00297 65 10 6 0.00295 66 11 6 0.00300 60 0 7 0.00268 60 1 7 0.00273 60 2 7 0.00271 60 3 7 0.00270 60 4 7 0.00273 61 5 7 0.00277 62 6 7 0.00280 64 7 7 0.00290 66 8 7 0.00301 67 9 7 0.00306 68 10 7 0.00307 69 11 7 0.00309 61 0 8 0.00274 62 1 8 0.00277 62 2 8 0.00278 62 3 8 0.00283 62 4 8 0.00282 63 5 8 0.00284 64 6 8 0.00289 66 7 8 0.00299 69 8 8 0.00309 71 9 8 0.00320 70 10 8 0.00318 72 11 8 0.00327 61 0 9 0.00272 64 1 9 0.00286 64 2 9 0.00287 64 3 9 0.00295 65 4 9 0.00292 65 5 9 0.00295 67 6 9 0.00304 69 7 9 0.00311 72 8 9 0.00326 75 9 9 0.00339 75 10 9 0.00343 75 11 9 0.00342

4.00E-5

6.34E-5

1.00E-4

1.59E-4

2.52E-4

4.00E-4

6.34E-4

0.00100

0.00159

0.00252

0.00400

0.00634

0.0100

0.0159

0.0252

0.0400

0.0634

0.100

0.159

0.252

0.400

0.634

1.00

1.59

2.52

4.00

6.34

10.0

15.9

25.2

40.0

63.4 100 159 252 400 634 1.00E3

1.59E3

2.52E3

4.00E3

6.34E3

1.00E4

1.59E4

2.52E4