25 0 1 0.00221 27 1 1 0.00242 28 2 1 0.00249 28 3 1 0.00250 28 4 1 0.00253 29 5 1 0.00257 29 6 1 0.00269 29 7 1 0.00257 29 8 1 0.00261 29 9 1 0.00262 30 10 1 0.00265 29 11 1 0.00264 27 0 2 0.00240 28 1 2 0.00252 28 2 2 0.00252 28 3 2 0.00252 29 4 2 0.00265 29 5 2 0.00259 29 6 2 0.00269 29 7 2 0.00259 30 8 2 0.00267 29 9 2 0.00267 30 10 2 0.00270 30 11 2 0.00271 28 0 3 0.00251 28 1 3 0.00254 28 2 3 0.00255 28 3 3 0.00255 29 4 3 0.00257 29 5 3 0.00260 29 6 3 0.00266 30 7 3 0.00274 30 8 3 0.00273 30 9 3 0.00269 30 10 3 0.00273 31 11 3 0.00276 29 0 4 0.00257 29 1 4 0.00265 28 2 4 0.00257 29 3 4 0.00261 29 4 4 0.00264 29 5 4 0.00261 30 6 4 0.00268 31 7 4 0.00281 31 8 4 0.00283 31 9 4 0.00277 31 10 4 0.00284 31 11 4 0.00284 29 0 5 0.00264 29 1 5 0.00259 29 2 5 0.00260 29 3 5 0.00258 29 4 5 0.00262 29 5 5 0.00266 30 6 5 0.00272 31 7 5 0.00281 32 8 5 0.00297 31 9 5 0.00284 32 10 5 0.00288 32 11 5 0.00291 29 0 6 0.00263 29 1 6 0.00262 29 2 6 0.00262 29 3 6 0.00270 29 4 6 0.00265 30 5 6 0.00269 31 6 6 0.00279 32 7 6 0.00294 33 8 6 0.00300 32 9 6 0.00295 33 10 6 0.00294 33 11 6 0.00300 30 0 7 0.00269 30 1 7 0.00272 30 2 7 0.00270 30 3 7 0.00271 30 4 7 0.00272 31 5 7 0.00278 31 6 7 0.00281 32 7 7 0.00292 33 8 7 0.00304 34 9 7 0.00308 34 10 7 0.00310 35 11 7 0.00312 30 0 8 0.00273 31 1 8 0.00277 31 2 8 0.00277 31 3 8 0.00282 31 4 8 0.00281 31 5 8 0.00284 32 6 8 0.00291 33 7 8 0.00298 35 8 8 0.00311 36 9 8 0.00323 35 10 8 0.00322 36 11 8 0.00329 30 0 9 0.00270 31 1 9 0.00283 32 2 9 0.00284 32 3 9 0.00294 32 4 9 0.00290 32 5 9 0.00293 33 6 9 0.00303 34 7 9 0.00311 36 8 9 0.00326 37 9 9 0.00340 37 10 9 0.00342 38 11 9 0.00343

4.00E-5

6.34E-5

1.00E-4

1.59E-4

2.52E-4

4.00E-4

6.34E-4

0.00100

0.00159

0.00252

0.00400

0.00634

0.0100

0.0159

0.0252

0.0400

0.0634

0.100

0.159

0.252

0.400

0.634

1.00

1.59

2.52

4.00

6.34

10.0

15.9

25.2

40.0

63.4 100 159 252 400 634 1.00E3

1.59E3

2.52E3

4.00E3

6.34E3

1.00E4

1.59E4

2.52E4