18 0 1 0.00320 20 1 1 0.00365 21 2 1 0.00376 21 3 1 0.00375 21 4 1 0.00375 22 5 1 0.00386 22 6 1 0.00399 23 7 1 0.00405 23 8 1 0.00404 23 9 1 0.00413 23 10 1 0.00416 23 11 1 0.00411 22 0 2 0.00390 23 1 2 0.00417 24 2 2 0.00422 24 3 2 0.00423 24 4 2 0.00425 25 5 2 0.00438 26 6 2 0.00457 26 7 2 0.00459 26 8 2 0.00461 26 9 2 0.00470 26 10 2 0.00472 26 11 2 0.00470 26 0 3 0.00463 27 1 3 0.00475 27 2 3 0.00486 27 3 3 0.00491 28 4 3 0.00498 29 5 3 0.00518 30 6 3 0.00534 31 7 3 0.00560 30 8 3 0.00545 30 9 3 0.00543 30 10 3 0.00541 30 11 3 0.00536 31 0 4 0.00549 31 1 4 0.00562 32 2 4 0.00577 33 3 4 0.00594 34 4 4 0.00609 35 5 4 0.00631 36 6 4 0.00642 36 7 4 0.00656 36 8 4 0.00652 35 9 4 0.00637 35 10 4 0.00633 35 11 4 0.00624 37 0 5 0.00656 37 1 5 0.00671 39 2 5 0.00695 40 3 5 0.00722 42 4 5 0.00754 44 5 5 0.00789 44 6 5 0.00799 45 7 5 0.00809 44 8 5 0.00787 42 9 5 0.00754 41 10 5 0.00737 40 11 5 0.00729 44 0 6 0.00799 46 1 6 0.00826 48 2 6 0.00867 51 3 6 0.00926 55 4 6 0.00992 58 5 6 0.0105 59 6 6 0.0105 58 7 6 0.0104 55 8 6 0.00980 52 9 6 0.00925 50 10 6 0.00893 49 11 6 0.00876 55 0 7 0.00988 59 1 7 0.0106 64 2 7 0.0115 69 3 7 0.0125 77 4 7 0.0140 83 5 7 0.0150 82 6 7 0.0147 77 7 7 0.0139 71 8 7 0.0128 66 9 7 0.0119 63 10 7 0.0115 62 11 7 0.0111 74 0 8 0.0133 78 1 8 0.0140 89 2 8 0.0161 101 3 8 0.0184 120 4 8 0.0221 132 5 8 0.0241 124 6 8 0.0227 109 7 8 0.0199 96 8 8 0.0175 92 9 8 0.0177 88 10 8 0.0161 90 11 8 0.0163 100 0 9 0.0223 101 1 9 0.0231 107 2 9 0.0287 151 3 9 0.0448 159 4 9 0.0359 140 5 9 0.0269 315 6 9 0.119 190 7 9 0.125 140 8 9 0.0425 175 9 9 0.0665 288 10 9 0.0986 428 11 9 0.113

4.00E-5

6.34E-5

1.00E-4

1.59E-4

2.52E-4

4.00E-4

6.34E-4

0.00100

0.00159

0.00252

0.00400

0.00634

0.0100

0.0159

0.0252

0.0400

0.0634

0.100

0.159

0.252

0.400

0.634

1.00

1.59

2.52

4.00

6.34

10.0

15.9

25.2

40.0

63.4 100 159 252 400 634 1.00E3

1.59E3

2.52E3

4.00E3

6.34E3

1.00E4

1.59E4

2.52E4