37 0 1 0.00333 40 1 1 0.00363 41 2 1 0.00371 41 3 1 0.00367 41 4 1 0.00370 42 5 1 0.00380 44 6 1 0.00393 44 7 1 0.00398 44 8 1 0.00393 45 9 1 0.00401 45 10 1 0.00406 45 11 1 0.00407 44 0 2 0.00398 46 1 2 0.00411 46 2 2 0.00416 46 3 2 0.00415 47 4 2 0.00419 48 5 2 0.00433 50 6 2 0.00450 50 7 2 0.00452 50 8 2 0.00451 51 9 2 0.00459 51 10 2 0.00462 51 11 2 0.00461 51 0 3 0.00459 52 1 3 0.00466 53 2 3 0.00475 54 3 3 0.00483 55 4 3 0.00490 57 5 3 0.00509 58 6 3 0.00521 60 7 3 0.00543 59 8 3 0.00531 59 9 3 0.00528 58 10 3 0.00525 58 11 3 0.00524 59 0 4 0.00531 60 1 4 0.00540 62 2 4 0.00555 64 3 4 0.00571 66 4 4 0.00590 68 5 4 0.00610 69 6 4 0.00619 70 7 4 0.00633 70 8 4 0.00629 68 9 4 0.00613 68 10 4 0.00609 67 11 4 0.00600 70 0 5 0.00631 72 1 5 0.00644 74 2 5 0.00667 77 3 5 0.00693 81 4 5 0.00729 85 5 5 0.00765 86 6 5 0.00772 87 7 5 0.00783 84 8 5 0.00759 81 9 5 0.00726 79 10 5 0.00710 78 11 5 0.00701 85 0 6 0.00767 88 1 6 0.00788 92 2 6 0.00827 98 3 6 0.00885 106 4 6 0.00957 112 5 6 0.0101 113 6 6 0.0101 111 7 6 0.00997 105 8 6 0.00942 99 9 6 0.00888 95 10 6 0.00855 93 11 6 0.00836 107 0 7 0.00963 113 1 7 0.0102 122 2 7 0.0110 132 3 7 0.0120 148 4 7 0.0134 158 5 7 0.0143 156 6 7 0.0141 148 7 7 0.0133 136 8 7 0.0122 126 9 7 0.0114 121 10 7 0.0110 117 11 7 0.0106 145 0 8 0.0131 150 1 8 0.0136 169 2 8 0.0154 188 3 8 0.0172 227 4 8 0.0209 247 5 8 0.0227 234 6 8 0.0215 208 7 8 0.0191 184 8 8 0.0168 175 9 8 0.0161 167 10 8 0.0153 170 11 8 0.0154 190 0 9 0.0201 189 1 9 0.0203 206 2 9 0.0240 268 3 9 0.0301 263 4 9 0.0275 270 5 9 0.0239 504 6 9 0.103 362 7 9 0.0777 251 8 9 0.0342 352 9 9 0.0599 505 10 9 0.0685 824 11 9 0.0909

4.00E-5

6.34E-5

1.00E-4

1.59E-4

2.52E-4

4.00E-4

6.34E-4

0.00100

0.00159

0.00252

0.00400

0.00634

0.0100

0.0159

0.0252

0.0400

0.0634

0.100

0.159

0.252

0.400

0.634

1.00

1.59

2.52

4.00

6.34

10.0

15.9

25.2

40.0

63.4 100 159 252 400 634 1.00E3

1.59E3

2.52E3

4.00E3

6.34E3

1.00E4

1.59E4

2.52E4