1 0 1 0.00300 1 1 1 0.00355 1 2 1 0.00355 1 3 1 0.00341 1 4 1 0.00348 1 5 1 0.00358 1 6 1 0.00370 1 7 1 0.00362 1 8 1 0.00369 1 9 1 0.00373 1 10 1 0.00376 1 11 1 0.00382 1 0 2 0.00365 1 1 2 0.00396 1 2 2 0.00393 1 3 2 0.00401 1 4 2 0.00401 2 5 2 0.00416 2 6 2 0.00423 2 7 2 0.00421 2 8 2 0.00429 2 9 2 0.00432 2 10 2 0.00431 2 11 2 0.00446 2 0 3 0.00419 2 1 3 0.00442 2 2 3 0.00433 2 3 3 0.00444 2 4 3 0.00448 2 5 3 0.00472 2 6 3 0.00483 2 7 3 0.00501 2 8 3 0.00482 2 9 3 0.00482 2 10 3 0.00482 2 11 3 0.00486 2 0 4 0.00478 2 1 4 0.00503 2 2 4 0.00511 2 3 4 0.00531 2 4 4 0.00543 2 5 4 0.00554 2 6 4 0.00564 2 7 4 0.00575 2 8 4 0.00573 2 9 4 0.00568 2 10 4 0.00562 2 11 4 0.00550 2 0 5 0.00579 2 1 5 0.00605 2 2 5 0.00617 2 3 5 0.00642 3 4 5 0.00672 3 5 5 0.00704 3 6 5 0.00712 3 7 5 0.00727 3 8 5 0.00708 3 9 5 0.00676 2 10 5 0.00657 2 11 5 0.00655 3 0 6 0.00684 3 1 6 0.00722 3 2 6 0.00739 3 3 6 0.00804 3 4 6 0.00865 3 5 6 0.00908 3 6 6 0.00919 3 7 6 0.00905 3 8 6 0.00853 3 9 6 0.00809 3 10 6 0.00770 3 11 6 0.00758 3 0 7 0.00843 3 1 7 0.00932 4 2 7 0.00990 4 3 7 0.0108 5 4 7 0.0121 5 5 7 0.0130 5 6 7 0.0127 5 7 7 0.0121 4 8 7 0.0110 4 9 7 0.0102 4 10 7 0.00990 4 11 7 0.00943 4 0 8 0.0115 5 1 8 0.0124 5 2 8 0.0139 6 3 8 0.0156 7 4 8 0.0192 8 5 8 0.0212 7 6 8 0.0199 6 7 8 0.0174 6 8 8 0.0153 5 9 8 0.0147 5 10 8 0.0139 5 11 8 0.0140 6 0 9 0.0220 6 1 9 0.0225 7 2 9 0.0384 9 3 9 0.0351 8 4 9 0.0456 8 5 9 0.0231 17 6 9 0.132 14 7 9 0.154 8 8 9 0.0486 11 9 9 0.0858 17 10 9 0.179 26 11 9 0.162

4.00E-5

6.34E-5

1.00E-4

1.59E-4

2.52E-4

4.00E-4

6.34E-4

0.00100

0.00159

0.00252

0.00400

0.00634

0.0100

0.0159

0.0252

0.0400

0.0634

0.100

0.159

0.252

0.400

0.634

1.00

1.59

2.52

4.00

6.34

10.0

15.9

25.2

40.0

63.4 100 159 252 400 634 1.00E3

1.59E3

2.52E3

4.00E3

6.34E3

1.00E4

1.59E4

2.52E4