6 0 1 0.00308 7 1 1 0.00350 7 2 1 0.00358 7 3 1 0.00357 7 4 1 0.00358 7 5 1 0.00366 7 6 1 0.00379 7 7 1 0.00382 7 8 1 0.00378 7 9 1 0.00389 7 10 1 0.00393 7 11 1 0.00392 7 0 2 0.00377 7 1 2 0.00399 7 2 2 0.00403 7 3 2 0.00403 8 4 2 0.00406 8 5 2 0.00418 8 6 2 0.00437 8 7 2 0.00437 8 8 2 0.00438 8 9 2 0.00445 8 10 2 0.00449 8 11 2 0.00446 8 0 3 0.00438 8 1 3 0.00449 8 2 3 0.00458 9 3 3 0.00466 9 4 3 0.00473 9 5 3 0.00491 9 6 3 0.00502 10 7 3 0.00526 10 8 3 0.00514 9 9 3 0.00513 9 10 3 0.00513 9 11 3 0.00510 9 0 4 0.00511 10 1 4 0.00525 10 2 4 0.00533 10 3 4 0.00550 10 4 4 0.00564 11 5 4 0.00587 11 6 4 0.00595 11 7 4 0.00610 11 8 4 0.00610 11 9 4 0.00598 11 10 4 0.00597 11 11 4 0.00588 11 0 5 0.00604 12 1 5 0.00623 12 2 5 0.00642 12 3 5 0.00664 13 4 5 0.00698 14 5 5 0.00734 14 6 5 0.00741 14 7 5 0.00757 14 8 5 0.00736 13 9 5 0.00709 13 10 5 0.00694 13 11 5 0.00685 14 0 6 0.00735 14 1 6 0.00762 15 2 6 0.00798 16 3 6 0.00852 17 4 6 0.00917 18 5 6 0.00964 18 6 6 0.00972 18 7 6 0.00962 17 8 6 0.00912 16 9 6 0.00862 15 10 6 0.00831 15 11 6 0.00817 17 0 7 0.00923 18 1 7 0.00988 20 2 7 0.0107 21 3 7 0.0115 24 4 7 0.0129 26 5 7 0.0138 25 6 7 0.0136 24 7 7 0.0129 22 8 7 0.0119 21 9 7 0.0110 20 10 7 0.0107 19 11 7 0.0103 23 0 8 0.0127 24 1 8 0.0133 27 2 8 0.0149 31 3 8 0.0168 37 4 8 0.0204 41 5 8 0.0223 38 6 8 0.0211 34 7 8 0.0185 30 8 8 0.0163 29 9 8 0.0172 28 10 8 0.0152 28 11 8 0.0154 32 0 9 0.0221 32 1 9 0.0232 33 2 9 0.0331 44 3 9 0.0459 44 4 9 0.0379 41 5 9 0.0256 95 6 9 0.120 61 7 9 0.129 44 8 9 0.0448 53 9 9 0.0746 94 10 9 0.160 143 11 9 0.149

4.00E-5

6.34E-5

1.00E-4

1.59E-4

2.52E-4

4.00E-4

6.34E-4

0.00100

0.00159

0.00252

0.00400

0.00634

0.0100

0.0159

0.0252

0.0400

0.0634

0.100

0.159

0.252

0.400

0.634

1.00

1.59

2.52

4.00

6.34

10.0

15.9

25.2

40.0

63.4 100 159 252 400 634 1.00E3

1.59E3

2.52E3

4.00E3

6.34E3

1.00E4

1.59E4

2.52E4