18 0 1 0.00326 21 1 1 0.00373 21 2 1 0.00382 21 3 1 0.00381 21 4 1 0.00383 22 5 1 0.00392 23 6 1 0.00405 23 7 1 0.00407 23 8 1 0.00404 23 9 1 0.00414 23 10 1 0.00418 23 11 1 0.00415 22 0 2 0.00394 24 1 2 0.00420 24 2 2 0.00428 24 3 2 0.00427 24 4 2 0.00432 25 5 2 0.00445 26 6 2 0.00462 26 7 2 0.00461 26 8 2 0.00462 26 9 2 0.00468 26 10 2 0.00473 26 11 2 0.00471 26 0 3 0.00469 27 1 3 0.00481 27 2 3 0.00492 28 3 3 0.00499 28 4 3 0.00507 29 5 3 0.00526 30 6 3 0.00535 31 7 3 0.00559 30 8 3 0.00545 30 9 3 0.00542 30 10 3 0.00541 30 11 3 0.00540 31 0 4 0.00552 32 1 4 0.00565 32 2 4 0.00579 33 3 4 0.00595 34 4 4 0.00612 35 5 4 0.00633 36 6 4 0.00640 36 7 4 0.00655 36 8 4 0.00651 35 9 4 0.00635 35 10 4 0.00630 35 11 4 0.00624 37 0 5 0.00663 38 1 5 0.00676 39 2 5 0.00700 40 3 5 0.00725 42 4 5 0.00760 44 5 5 0.00797 45 6 5 0.00804 45 7 5 0.00815 44 8 5 0.00787 42 9 5 0.00753 41 10 5 0.00739 41 11 5 0.00730 45 0 6 0.00809 46 1 6 0.00834 49 2 6 0.00874 52 3 6 0.00933 56 4 6 0.0101 59 5 6 0.0106 59 6 6 0.0106 58 7 6 0.0104 55 8 6 0.00982 52 9 6 0.00924 50 10 6 0.00892 49 11 6 0.00873 56 0 7 0.0102 60 1 7 0.0108 65 2 7 0.0117 70 3 7 0.0127 79 4 7 0.0143 84 5 7 0.0153 83 6 7 0.0149 78 7 7 0.0140 71 8 7 0.0128 66 9 7 0.0119 63 10 7 0.0114 62 11 7 0.0110 77 0 8 0.0139 80 1 8 0.0145 90 2 8 0.0163 101 3 8 0.0185 122 4 8 0.0225 135 5 8 0.0247 126 6 8 0.0235 111 7 8 0.0204 98 8 8 0.0178 93 9 8 0.0189 89 10 8 0.0166 91 11 8 0.0165 103 0 9 0.0239 102 1 9 0.0239 106 2 9 0.0292 145 3 9 0.0490 151 4 9 0.0355 135 5 9 0.0278 311 6 9 0.120 198 7 9 0.128 141 8 9 0.0440 173 9 9 0.0669 321 10 9 0.110 445 11 9 0.118

4.00E-5

6.34E-5

1.00E-4

1.59E-4

2.52E-4

4.00E-4

6.34E-4

0.00100

0.00159

0.00252

0.00400

0.00634

0.0100

0.0159

0.0252

0.0400

0.0634

0.100

0.159

0.252

0.400

0.634

1.00

1.59

2.52

4.00

6.34

10.0

15.9

25.2

40.0

63.4 100 159 252 400 634 1.00E3

1.59E3

2.52E3

4.00E3

6.34E3

1.00E4

1.59E4

2.52E4