0 0 1 0.00917 0 1 1 0.0109 0 2 1 0.0118 0 3 1 0.0132 0 4 1 0.0125 0 5 1 0.0136 0 6 1 0.0146 0 7 1 0.0122 0 8 1 0.0109 0 9 1 0.00371 0 10 1 0.00229 0 11 1 0.00251 0 0 2 0.0165 0 1 2 0.0174 0 2 2 0.0220 0 3 2 0.0200 0 4 2 0.0281 0 5 2 0.0211 0 6 2 0.0220 0 7 2 0.0202 0 8 2 0.0138 0 9 2 0.0101 0 10 2 0.0108 0 11 2 0.00996 0 0 3 0.00671 0 1 3 0.00734 0 2 3 0.00890 0 3 3 0.129 2 4 3 0.773 0 5 3 0.0142 0 6 3 0.0107 0 7 3 0.00739 0 8 3 0.00227 0 9 3 -0.00141 0 10 3 -0.00108 0 11 3 -7.98E-4 0 0 4 0.00941 0 1 4 0.0100 0 2 4 0.0114 1 3 4 0.547 6 4 4 2.14 0 5 4 0.0186 0 6 4 0.0114 0 7 4 0.00810 0 8 4 0.00296 0 9 4 0.00205 0 10 4 0.00150 0 11 4 -0.00162 0 0 5 0.0137 0 1 5 0.0143 0 2 5 0.0141 16 3 5 1.12 24 4 5 1.84 0 5 5 0.0465 0 6 5 0.0149 0 7 5 0.00937 0 8 5 0.00939 0 9 5 0.00763 0 10 5 0.00586 0 11 5 0.00318 0 0 6 0.0134 0 1 6 0.0112 0 2 6 0.0155 34 3 6 2.59 64 4 6 4.43 0 5 6 0.0298 0 6 6 0.0219 0 7 6 0.00688 0 8 6 0.00570 0 9 6 0.00675 0 10 6 0.00414 0 11 6 0.00204 0 0 7 0.0141 0 1 7 0.0164 0 2 7 0.0184 4 3 7 0.512 11 4 7 1.51 2 5 7 0.196 2 6 7 0.146 0 7 7 0.0227 1 8 7 0.0388 0 9 7 0.0217 0 10 7 0.00947 0 11 7 0.00835 0 0 8 0.0208 0 1 8 0.0176 0 2 8 0.0294 1 3 8 0.105 2 4 8 0.383 1 5 8 0.185 0 6 8 0.0360 1 7 8 0.101 3 8 8 0.422 1 9 8 0.204 0 10 8 0.0276 1 11 8 0.0884 0 0 9 0.0184 0 1 9 0.0255 0 2 9 0.0289 0 3 9 0.0229 1 4 9 0.0928 0 5 9 0.0251 0 6 9 0.0139 0 7 9 0.0231 1 8 9 0.127 0 9 9 0.0557 1 10 9 0.168 2 11 9 0.263

4.00E-5

6.34E-5

1.00E-4

1.59E-4

2.52E-4

4.00E-4

6.34E-4

0.00100

0.00159

0.00252

0.00400

0.00634

0.0100

0.0159

0.0252

0.0400

0.0634

0.100

0.159

0.252

0.400

0.634

1.00

1.59

2.52

4.00

6.34

10.0

15.9

25.2

40.0

63.4 100 159 252 400 634 1.00E3

1.59E3

2.52E3

4.00E3

6.34E3

1.00E4

1.59E4

2.52E4