1 0 1 0.00974 1 1 1 0.0110 1 2 1 0.0114 1 3 1 0.0123 1 4 1 0.0136 1 5 1 0.0135 1 6 1 0.0140 1 7 1 0.0144 1 8 1 0.0112 0 9 1 0.00501 0 10 1 0.00340 0 11 1 0.00312 1 0 2 0.00944 1 1 2 0.0109 1 2 2 0.0128 1 3 2 0.0151 1 4 2 0.0225 1 5 2 0.0163 1 6 2 0.0144 1 7 2 0.0130 1 8 2 0.00700 0 9 2 0.00387 0 10 2 0.00356 0 11 2 0.00348 1 0 3 0.0116 1 1 3 0.0127 1 2 3 0.0154 2 3 3 0.130 4 4 3 0.802 1 5 3 0.0174 1 6 3 0.0152 1 7 3 0.0117 0 8 3 0.00553 0 9 3 0.00485 0 10 3 0.00478 0 11 3 0.00422 1 0 4 0.0131 1 1 4 0.0138 1 2 4 0.0152 3 3 4 0.552 19 4 4 2.18 2 5 4 0.0194 1 6 4 0.0150 1 7 4 0.0112 0 8 4 0.00586 0 9 4 0.00555 0 10 4 0.00547 0 11 4 0.00394 1 0 5 0.0142 1 1 5 0.0149 1 2 5 0.0166 84 3 5 1.17 129 4 5 1.92 2 5 5 0.0431 1 6 5 0.0150 1 7 5 0.0107 1 8 5 0.00842 1 9 5 0.00855 1 10 5 0.00719 0 11 5 0.00536 1 0 6 0.0148 1 1 6 0.0150 1 2 6 0.0180 180 3 6 2.65 325 4 6 4.55 2 5 6 0.0275 1 6 6 0.0237 1 7 6 0.0117 1 8 6 0.00868 1 9 6 0.0100 1 10 6 0.00755 0 11 6 0.00471 1 0 7 0.0149 1 1 7 0.0155 1 2 7 0.0176 15 3 7 0.534 56 4 7 1.56 9 5 7 0.197 7 6 7 0.150 1 7 7 0.0252 2 8 7 0.0375 1 9 7 0.0214 1 10 7 0.00878 1 11 7 0.00696 1 0 8 0.0166 1 1 8 0.0172 2 2 8 0.0260 3 3 8 0.106 5 4 8 0.397 3 5 8 0.190 1 6 8 0.0343 2 7 8 0.0999 6 8 8 0.435 3 9 8 0.206 1 10 8 0.0255 2 11 8 0.0906 1 0 9 0.0170 2 1 9 0.0254 2 2 9 0.0293 1 3 9 0.0209 2 4 9 0.0929 1 5 9 0.0228 1 6 9 0.0144 1 7 9 0.0227 2 8 9 0.131 1 9 9 0.0545 2 10 9 0.175 4 11 9 0.269

4.00E-5

6.34E-5

1.00E-4

1.59E-4

2.52E-4

4.00E-4

6.34E-4

0.00100

0.00159

0.00252

0.00400

0.00634

0.0100

0.0159

0.0252

0.0400

0.0634

0.100

0.159

0.252

0.400

0.634

1.00

1.59

2.52

4.00

6.34

10.0

15.9

25.2

40.0

63.4 100 159 252 400 634 1.00E3

1.59E3

2.52E3

4.00E3

6.34E3

1.00E4

1.59E4

2.52E4