3 0 1 0.00922 3 1 1 0.0110 4 2 1 0.0116 4 3 1 0.0127 4 4 1 0.0137 4 5 1 0.0142 4 6 1 0.0146 4 7 1 0.0144 4 8 1 0.0119 2 9 1 0.00533 1 10 1 0.00315 1 11 1 0.00296 3 0 2 0.0100 3 1 2 0.0115 4 2 2 0.0132 5 3 2 0.0157 6 4 2 0.0234 5 5 2 0.0170 5 6 2 0.0156 4 7 2 0.0141 3 8 2 0.00840 2 9 2 0.00464 1 10 2 0.00398 1 11 2 0.00371 3 0 3 0.0110 4 1 3 0.0127 5 2 3 0.0155 7 3 3 0.132 10 4 3 0.790 5 5 3 0.0176 5 6 3 0.0154 4 7 3 0.0126 2 8 3 0.00618 2 9 3 0.00491 1 10 3 0.00475 1 11 3 0.00402 4 0 4 0.0130 4 1 4 0.0142 5 2 4 0.0161 9 3 4 0.553 79 4 4 1.57 6 5 4 0.0195 5 6 4 0.0158 4 7 4 0.0123 2 8 4 0.00657 2 9 4 0.00613 2 10 4 0.00585 1 11 4 0.00444 4 0 5 0.0137 4 1 5 0.0147 5 2 5 0.0165 339 3 5 1.18 522 4 5 1.83 7 5 5 0.0417 5 6 5 0.0151 3 7 5 0.0105 3 8 5 0.00860 3 9 5 0.00869 2 10 5 0.00717 2 11 5 0.00500 4 0 6 0.0142 5 1 6 0.0152 5 2 6 0.0178 722 3 6 2.67

1318 4 6 4.56 7 5 6 0.0270 5 6 6 0.0262 4 7 6 0.0122 3 8 6 0.00882 3 9 6 0.00999 2 10 6 0.00740 2 11 6 0.00492 4 0 7 0.0138 5 1 7 0.0149 5 2 7 0.0171 60 3 7 0.535 228 4 7 1.53 32 5 7 0.201 24 6 7 0.148 4 7 7 0.0251 4 8 7 0.0385 4 9 7 0.0212 3 10 7 0.00875 2 11 7 0.00688 4 0 8 0.0146 5 1 8 0.0157 6 2 8 0.0255 11 3 8 0.106 13 4 8 0.396 9 5 8 0.191 5 6 8 0.0325 6 7 8 0.101 19 8 8 0.442 8 9 8 0.209 3 10 8 0.0235 4 11 8 0.0912 5 0 9 0.0165 6 1 9 0.0252 8 2 9 0.0289 5 3 9 0.0211 6 4 9 0.0938 4 5 9 0.0225 4 6 9 0.0147 4 7 9 0.0229 5 8 9 0.130 3 9 9 0.0553 5 10 9 0.180 8 11 9 0.278

4.00E-5

6.34E-5

1.00E-4

1.59E-4

2.52E-4

4.00E-4

6.34E-4

0.00100

0.00159

0.00252

0.00400

0.00634

0.0100

0.0159

0.0252

0.0400

0.0634

0.100

0.159

0.252

0.400

0.634

1.00

1.59

2.52

4.00

6.34

10.0

15.9

25.2

40.0

63.4 100 159 252 400 634 1.00E3

1.59E3

2.52E3

4.00E3

6.34E3

1.00E4

1.59E4

2.52E4