6 0 1 0.00922 6 1 1 0.0107 7 2 1 0.0116 8 3 1 0.0127 8 4 1 0.0140 9 5 1 0.0147 9 6 1 0.0150 9 7 1 0.0145 7 8 1 0.0120 3 9 1 0.00547 2 10 1 0.00331 2 11 1 0.00312 6 0 2 0.00954 7 1 2 0.0110 8 2 2 0.0131 10 3 2 0.0159 11 4 2 0.0238 11 5 2 0.0172 10 6 2 0.0157 9 7 2 0.0142 5 8 2 0.00826 3 9 2 0.00470 2 10 2 0.00391 2 11 2 0.00365 7 0 3 0.0110 8 1 3 0.0129 10 2 3 0.0157 14 3 3 0.166 18 4 3 0.690 11 5 3 0.0176 9 6 3 0.0156 8 7 3 0.0125 4 8 3 0.00616 3 9 3 0.00493 3 10 3 0.00468 3 11 3 0.00412 8 0 4 0.0133 9 1 4 0.0145 10 2 4 0.0165 18 3 4 0.527 118 4 4 1.10 12 5 4 0.0195 9 6 4 0.0157 7 7 4 0.0121 4 8 4 0.00668 4 9 4 0.00623 4 10 4 0.00594 3 11 4 0.00458 8 0 5 0.0138 9 1 5 0.0149 10 2 5 0.0171 744 3 5 1.25

1056 4 5 1.80 13 5 5 0.0340 9 6 5 0.0151 6 7 5 0.0107 5 8 5 0.00878 5 9 5 0.00896 5 10 5 0.00747 3 11 5 0.00518 8 0 6 0.0140 9 1 6 0.0148 11 2 6 0.0181

1563 3 6 2.28

2651 4 6 3.54 15 5 6 0.0274 10 6 6 0.0252 7 7 6 0.0119 5 8 6 0.00893 6 9 6 0.0101 4 10 6 0.00742 3 11 6 0.00493 8 0 7 0.0139 9 1 7 0.0147 10 2 7 0.0173 132 3 7 0.553 460 4 7 1.16 67 5 7 0.205 49 6 7 0.149 7 7 7 0.0245 8 8 7 0.0393 7 9 7 0.0217 5 10 7 0.00887 4 11 7 0.00688 9 0 8 0.0143 9 1 8 0.0153 11 2 8 0.0262 21 3 8 0.111 25 4 8 0.404 17 5 8 0.197 9 6 8 0.0350 10 7 8 0.108 40 8 8 0.454 14 9 8 0.214 6 10 8 0.0235 7 11 8 0.0948 10 0 9 0.0165 12 1 9 0.0260 16 2 9 0.0291 9 3 9 0.0211 11 4 9 0.0966 8 5 9 0.0225 7 6 9 0.0148 7 7 9 0.0228 9 8 9 0.135 5 9 9 0.0542 8 10 9 0.196 14 11 9 0.276

4.00E-5

6.34E-5

1.00E-4

1.59E-4

2.52E-4

4.00E-4

6.34E-4

0.00100

0.00159

0.00252

0.00400

0.00634

0.0100

0.0159

0.0252

0.0400

0.0634

0.100

0.159

0.252

0.400

0.634

1.00

1.59

2.52

4.00

6.34

10.0

15.9

25.2

40.0

63.4 100 159 252 400 634 1.00E3

1.59E3

2.52E3

4.00E3

6.34E3

1.00E4

1.59E4

2.52E4