11 0 1 0.00919 13 1 1 0.0104 14 2 1 0.0115 16 3 1 0.0128 17 4 1 0.0141 18 5 1 0.0151 19 6 1 0.0155 18 7 1 0.0151 15 8 1 0.0121 6 9 1 0.00524 4 10 1 0.00328 4 11 1 0.00312 12 0 2 0.00976 13 1 2 0.0111 16 2 2 0.0134 20 3 2 0.0162 22 4 2 0.0240 21 5 2 0.0173 19 6 2 0.0160 18 7 2 0.0145 9 8 2 0.00800 5 9 2 0.00439 5 10 2 0.00382 4 11 2 0.00353 14 0 3 0.0115 16 1 3 0.0136 20 2 3 0.0164 28 3 3 0.137 36 4 3 0.511 22 5 3 0.0179 19 6 3 0.0156 16 7 3 0.0123 7 8 3 0.00580 6 9 3 0.00483 6 10 3 0.00455 5 11 3 0.00399 17 0 4 0.0139 18 1 4 0.0149 21 2 4 0.0170 36 3 4 0.338 201 4 4 0.673 24 5 4 0.0201 20 6 4 0.0162 15 7 4 0.0121 8 8 4 0.00665 7 9 4 0.00630 7 10 4 0.00609 5 11 4 0.00453 17 0 5 0.0143 18 1 5 0.0150 21 2 5 0.0174

1557 3 5 1.26

2122 4 5 1.69 27 5 5 0.0309 19 6 5 0.0151 12 7 5 0.0106 11 8 5 0.00882 11 9 5 0.00903 9 10 5 0.00749 6 11 5 0.00516 17 0 6 0.0143 18 1 6 0.0149 21 2 6 0.0182

3172 3 6 1.14

4031 4 6 1.48 30 5 6 0.0284 20 6 6 0.0217 14 7 6 0.0119 11 8 6 0.00910 12 9 6 0.0102 9 10 6 0.00748 6 11 6 0.00497 17 0 7 0.0141 18 1 7 0.0147 21 2 7 0.0175 280 3 7 0.553 917 4 7 0.864 136 5 7 0.206 98 6 7 0.146 13 7 7 0.0251 14 8 7 0.0407 13 9 7 0.0223 10 10 7 0.00903 8 11 7 0.00689 18 0 8 0.0146 19 1 8 0.0155 21 2 8 0.0271 43 3 8 0.114 50 4 8 0.364 33 5 8 0.193 16 6 8 0.0361 20 7 8 0.107 81 8 8 0.451 27 9 8 0.214 11 10 8 0.0242 13 11 8 0.0963 21 0 9 0.0172 25 1 9 0.0270 34 2 9 0.0301 18 3 9 0.0217 22 4 9 0.0839 17 5 9 0.0237 14 6 9 0.0153 14 7 9 0.0236 16 8 9 0.134 10 9 9 0.0526 15 10 9 0.203 27 11 9 0.269

4.00E-5

6.34E-5

1.00E-4

1.59E-4

2.52E-4

4.00E-4

6.34E-4

0.00100

0.00159

0.00252

0.00400

0.00634

0.0100

0.0159

0.0252

0.0400

0.0634

0.100

0.159

0.252

0.400

0.634

1.00

1.59

2.52

4.00

6.34

10.0

15.9

25.2

40.0

63.4 100 159 252 400 634 1.00E3

1.59E3

2.52E3

4.00E3

6.34E3

1.00E4

1.59E4

2.52E4