1 0 1 0.0663 1 1 1 0.0766 1 2 1 0.0884 1 3 1 0.100 2 4 1 0.127 2 5 1 0.162 2 6 1 0.186 2 7 1 0.159 2 8 1 0.129 1 9 1 0.104 1 10 1 0.0864 1 11 1 0.0810 1 0 2 0.0671 1 1 2 0.0792 1 2 2 0.0990 2 3 2 0.131 3 4 2 1.16 277 5 2 25.8 958 6 2 60.4 9 7 2 21.4 3 8 2 1.88 2 9 2 0.764 2 10 2 0.558 1 11 2 0.110 6 0 3 2.85 35 1 3 2.42 67 2 3 4.69 103 3 3 8.20 325 4 3 26.8 681 5 3 54.6 959 6 3 76.7 536 7 3 43.5 306 8 3 24.2 206 9 3 15.7 151 10 3 11.6 91 11 3 5.91 55 0 4 5.55 48 1 4 4.41 120 2 4 9.79 152 3 4 12.4 320 4 4 24.4 566 5 4 43.2 563 6 4 42.0 412 7 4 33.1 324 8 4 24.4 248 9 4 19.2 187 10 4 14.9 122 11 4 10.4 66 0 5 6.12 117 1 5 8.91 126 2 5 9.05 185 3 5 13.7 349 4 5 26.4 380 5 5 28.3 187 6 5 15.9 378 7 5 28.1 373 8 5 28.2 229 9 5 15.0 183 10 5 12.3 197 11 5 14.9 51 0 6 4.09 63 1 6 5.44 14 2 6 1.63 209 3 6 12.8 343 4 6 26.2 355 5 6 22.6 29 6 6 2.91 382 7 6 24.6 381 8 6 29.3 295 9 6 16.8 22 10 6 2.70 222 11 6 16.7 36 0 7 3.48 43 1 7 3.38 11 2 7 1.22 204 3 7 15.5 335 4 7 25.5 333 5 7 20.4 25 6 7 2.65 371 7 7 21.5 367 8 7 28.3 309 9 7 23.3 16 10 7 2.38 140 11 7 10.8 45 0 8 4.80 22 1 8 3.14 19 2 8 4.44 248 3 8 19.5 300 4 8 23.1 295 5 8 16.8 27 6 8 2.50 316 7 8 16.8 334 8 8 25.7 297 9 8 23.1 30 10 8 7.27 27 11 8 4.02 123 0 9 8.82 46 1 9 5.75 143 2 9 9.38 204 3 9 14.2 231 4 9 16.2 261 5 9 17.1 221 6 9 13.6 282 7 9 17.9 267 8 9 18.1 247 9 9 16.9 207 10 9 13.3 174 11 9 10.5

4.00E-5

6.34E-5

1.00E-4

1.59E-4

2.52E-4

4.00E-4

6.34E-4

0.00100

0.00159

0.00252

0.00400

0.00634

0.0100

0.0159

0.0252

0.0400

0.0634

0.100

0.159

0.252

0.400

0.634

1.00

1.59

2.52

4.00

6.34

10.0

15.9

25.2

40.0

63.4 100 159 252 400 634 1.00E3

1.59E3

2.52E3

4.00E3

6.34E3

1.00E4

1.59E4

2.52E4