2 0 1 0.0701 2 1 1 0.0780 2 2 1 0.0930 3 3 1 0.107 4 4 1 0.137 4 5 1 0.174 5 6 1 0.227 4 7 1 0.169 3 8 1 0.135 3 9 1 0.113 2 10 1 0.0952 2 11 1 0.0837 2 0 2 0.0733 2 1 2 0.0866 3 2 2 0.136 4 3 2 0.178 6 4 2 2.88 780 5 2 32.5

2022 6 2 67.8 616 7 2 25.1 6 8 2 3.55 5 9 2 1.48 4 10 2 1.24 3 11 2 0.306 28 0 3 3.19 85 1 3 2.83 143 2 3 5.35 215 3 3 9.04 725 4 3 29.6

1410 5 3 56.9

1893 6 3 75.5

1069 7 3 43.2 628 8 3 25.0 430 9 3 16.6 310 10 3 12.2 190 11 3 6.48 91 0 4 5.08 120 1 4 5.32 273 2 4 10.6 312 3 4 12.9 678 4 4 25.4

1135 5 4 43.3

1109 6 4 41.0 826 7 4 33.1 666 8 4 24.9 506 9 4 19.6 387 10 4 15.4 272 11 4 11.1 158 0 5 6.87 241 1 5 9.23 253 2 5 8.86 415 3 5 14.7 717 4 5 27.3 765 5 5 28.0 317 6 5 15.7 765 7 5 28.3 761 8 5 28.8 484 9 5 15.7 362 10 5 11.8 401 11 5 15.4 107 0 6 4.47 127 1 6 5.37 27 2 6 1.39 436 3 6 14.7 699 4 6 26.7 720 5 6 22.0 63 6 6 2.97 776 7 6 25.1 773 8 6 29.7 605 9 6 18.1 42 10 6 2.30 441 11 6 16.2 84 0 7 3.65 85 1 7 3.20 24 2 7 1.85 427 3 7 16.8 683 4 7 26.1 674 5 7 19.9 52 6 7 2.70 755 7 7 21.9 745 8 7 28.7 633 9 7 24.2 34 10 7 2.94 269 11 7 9.85 99 0 8 4.90 34 1 8 2.37 44 2 8 5.90 518 3 8 20.2 608 4 8 23.5 592 5 8 16.4 56 6 8 2.58 645 7 8 17.3 682 8 8 26.2 613 9 8 23.9 68 10 8 8.25 49 11 8 3.28 250 0 9 9.01 56 1 9 5.00 318 2 9 10.1 418 3 9 14.8 480 4 9 16.9 515 5 9 16.5 365 6 9 12.3 554 7 9 17.6 541 8 9 18.5 497 9 9 17.1 411 10 9 13.3 318 11 9 9.74

4.00E-5

6.34E-5

1.00E-4

1.59E-4

2.52E-4

4.00E-4

6.34E-4

0.00100

0.00159

0.00252

0.00400

0.00634

0.0100

0.0159

0.0252

0.0400

0.0634

0.100

0.159

0.252

0.400

0.634

1.00

1.59

2.52

4.00

6.34

10.0

15.9

25.2

40.0

63.4 100 159 252 400 634 1.00E3

1.59E3

2.52E3

4.00E3

6.34E3

1.00E4

1.59E4

2.52E4