13 0 1 0.00632 30 1 1 0.00827 45 2 1 0.00979 46 3 1 0.0100 49 4 1 0.0105 57 5 1 0.0118 58 6 1 0.0124 42 7 1 0.00949 37 8 1 0.00919 23 9 1 0.00833 18 0 2 0.00632 32 1 2 0.00828 48 2 2 0.0106 51 3 2 0.0111 58 4 2 0.0121 104 5 2 0.0214 91 6 2 0.0192 51 7 2 0.0109 49 8 2 0.0109 32 9 2 0.00925 17 0 3 0.00613 23 1 3 0.00642 47 2 3 0.0106 52 3 3 0.0115 64 4 3 0.0136 314 5 3 0.139 168 6 3 0.0532 59 7 3 0.0127 47 8 3 0.0108 30 9 3 0.00856 20 0 4 0.00612 24 1 4 0.00624 45 2 4 0.0104 58 3 4 0.0122 76 4 4 0.0154 303 5 4 0.127 167 6 4 0.0786 69 7 4 0.0143 38 8 4 0.00905 24 9 4 0.00668 23 0 5 0.00661 21 1 5 0.00554 22 2 5 0.00581 62 3 5 0.0129 90 4 5 0.0183 126 5 5 0.0248 104 6 5 0.0226 68 7 5 0.0142 51 8 5 0.0113 33 9 5 0.00832 49 0 6 0.0308 47 1 6 0.0214 32 2 6 0.0375 66 3 6 0.0147 126 4 6 0.0633 73 5 6 0.0165 78 6 6 0.0169 57 7 6 0.0127 43 8 6 0.0103 49 9 6 0.0121 53 0 7 0.0332 74 1 7 0.0239 58 2 7 0.0149 112 3 7 0.0285 121 4 7 0.0347 88 5 7 0.0207 80 6 7 0.0183 31 7 7 0.00838 30 8 7 0.00816 13 9 7 0.00447 66 0 8 0.0130 77 1 8 0.0144 95 2 8 0.0176 152 3 8 0.0277 208 4 8 0.0436 435 5 8 0.0833 171 6 8 0.0292 111 7 8 0.0189 94 8 8 0.0166 73 9 8 0.0139 101 0 9 0.0186 108 1 9 0.0195 127 2 9 0.0226 109 3 9 0.0197 126 4 9 0.0283 308 5 9 0.0513 160 6 9 0.0299 109 7 9 0.0181 102 8 9 0.0169 86 9 9 0.0145 107 0 10 0.0200 133 1 10 0.0237 117 2 10 0.0195 106 3 10 0.0172 147 4 10 0.0262 277 5 10 0.0460 210 6 10 0.0353 108 7 10 0.0175 95 8 10 0.0157 95 9 10 0.0158 138 0 11 0.0252 97 1 11 0.0175 86 2 11 0.0153 102 3 11 0.0172 241 4 11 0.0383 296 5 11 0.0497 276 6 11 0.0464 128 7 11 0.0222 87 8 11 0.0146 85 9 11 0.0144 100 0 12 0.0184 48 1 12 0.0100 55 2 12 0.0119 117 3 12 0.0211 284 4 12 0.0468 280 5 12 0.0463 322 6 12 0.0531 210 7 12 0.0353 116 8 12 0.0187 84 9 12 0.0146 106 0 13 0.0191 108 1 13 0.0179 96 2 13 0.0172 139 3 13 0.0239 290 4 13 0.0482 290 5 13 0.0480 336 6 13 0.0558 275 7 13 0.0455 142 8 13 0.0232 103 9 13 0.0177 93 0 14 0.0183 109 1 14 0.0184 119 2 14 0.0197 129 3 14 0.0231 263 4 14 0.0434 275 5 14 0.0456 311 6 14 0.0509 296 7 14 0.0487 164 8 14 0.0291 108 9 14 0.0192