0 1 3 0.101 0 1 4 0.00245 0 3 5 0.00705 0 6 5 0.0255 0 6 6 7.66E-4

4.00E-5

6.34E-5

1.00E-4

1.59E-4

2.52E-4

4.00E-4

6.34E-4

0.00100

0.00159

0.00252

0.00400

0.00634

0.0100

0.0159

0.0252

0.0400

0.0634

0.100

0.159

0.252

0.400

0.634

1.00

1.59

2.52

4.00

6.34

10.0

15.9

25.2

40.0

63.4 100 159 252 400 634 1.00E3

1.59E3

2.52E3

4.00E3

6.34E3

1.00E4

1.59E4

2.52E4