128 1 3 0.00285 185 1 4 0.00419 6 3 5 5.62E-4 8 6 5 7.45E-4 4 7 5 4.58E-5 15 3 6 4.86E-4 14 6 6 5.51E-4 13 1 7 2.10E-4