0 0 1 3.63E-4 4 1 1 0.00128 4 2 1 0.00116 0 3 1 3.70E-4 4 4 1 0.00100 4 5 1 9.87E-4 4 6 1 0.00153 8 7 1 0.00257 4 8 1 0.00146 4 9 1 0.00133 8 10 1 0.00278 8 11 1 0.00249 8 12 1 0.00280 8 13 1 0.00298 8 14 1 0.00230 4 15 1 0.00152 12 16 1 0.00297 8 17 1 0.00186 8 18 1 0.00236 4 19 1 0.00116 8 20 1 0.00185 8 21 1 0.00282 4 22 1 0.00177 8 23 1 0.00178 4 24 1 6.69E-4 4 25 1 0.00155 8 26 1 0.00232 8 27 1 0.00236 0 28 1 0.00103 4 29 1 0.00158 8 30 1 0.00249 4 31 1 0.00118 8 0 2 0.00250 8 1 2 0.00163 4 2 2 9.03E-4 8 3 2 0.00215 0 4 2 4.99E-4 8 5 2 0.00166 8 6 2 0.00238 4 7 2 6.09E-4 12 8 2 0.00247 8 9 2 0.00281 8 10 2 0.00162 0 11 2 1.59E-4 4 12 2 5.45E-4 8 13 2 0.00195 12 14 2 0.00296 4 15 2 0.00268 8 16 2 0.00218 12 17 2 0.00241 8 18 2 0.00234 12 19 2 0.00319 4 20 2 0.00123 8 21 2 0.00104 4 22 2 0.00223 12 23 2 0.00223 0 24 2 5.63E-4 8 25 2 0.00318 4 26 2 9.32E-4 4 27 2 0.00109 8 28 2 0.00141 4 29 2 2.38E-4 4 30 2 0.00153 4 31 2 1.36E-5 8 0 3 0.00301 8 1 3 0.00230 4 2 3 0.00260 12 3 3 0.00259 12 4 3 0.00319 8 5 3 0.00212 16 6 3 0.00381 8 7 3 0.00265 12 8 3 0.00342 16 9 3 0.00434 8 10 3 0.00400 12 11 3 0.00361 8 12 3 0.00281 16 13 3 0.00403 12 14 3 0.00430 12 15 3 0.00439 12 16 3 0.00401 12 17 3 0.00320 12 18 3 0.00405 12 19 3 0.00288 16 20 3 0.00381 12 21 3 0.00357 12 22 3 0.00310 8 23 3 0.00355 16 24 3 0.00396 8 25 3 0.00283 8 26 3 0.00218 12 27 3 0.00324 12 28 3 0.00334 8 29 3 0.00306 8 30 3 0.00297 8 31 3 0.00191 0 0 4 1.99E-4 4 1 4 6.88E-4 8 2 4 0.00186 4 3 4 6.63E-4 8 4 4 0.00193 8 5 4 0.00117 12 6 4 0.00313 4 7 4 0.00256 16 8 4 0.00336 12 9 4 0.00382 8 10 4 0.00291 12 11 4 0.00259 8 12 4 0.00313 8 13 4 0.00211 8 14 4 0.00209 12 15 4 0.00262 12 16 4 0.00284 12 17 4 0.00330 8 18 4 0.00266 12 19 4 0.00306 12 20 4 0.00241 8 21 4 0.00293 8 22 4 0.00181 12 23 4 0.00294 12 24 4 0.00241 8 25 4 0.00265 4 26 4 0.00212 12 27 4 0.00172 4 28 4 0.00181 8 29 4 0.00144 8 30 4 0.00194 8 31 4 0.00172 4 0 5 8.88E-4 4 1 5 9.11E-4 8 2 5 0.00192 4 3 5 0.00166 12 4 5 0.00311 12 5 5 0.00218 12 6 5 0.00303 8 7 5 0.00224 12 8 5 0.00299 8 9 5 0.00281 12 10 5 0.00369 16 11 5 0.00478 16 12 5 0.00362 12 13 5 0.00364 16 14 5 0.00329 16 15 5 0.00425 16 16 5 0.00520 16 17 5 0.00444 12 18 5 0.00373 12 19 5 0.00382 12 20 5 0.00403 12 21 5 0.00320 8 22 5 0.00142 4 23 5 0.00157 12 24 5 0.00263 12 25 5 0.00333 8 26 5 0.00230 8 27 5 0.00275 8 28 5 0.00192 8 29 5 0.00183 8 30 5 0.00146 4 31 5 0.00127 8 0 6 0.00167 8 1 6 0.00265 8 2 6 0.00287 8 3 6 0.00175 12 4 6 0.00273 12 5 6 0.00306 12 6 6 0.00425 8 7 6 0.00172 16 8 6 0.00425 12 9 6 0.00333 16 10 6 0.00410 20 11 6 0.00602 16 12 6 0.00494 16 13 6 0.00398 16 14 6 0.00461 20 15 6 0.00571 20 16 6 0.00456 20 17 6 0.00540 16 18 6 0.00463 16 19 6 0.00483 16 20 6 0.00411 20 21 6 0.00503 16 22 6 0.00359 12 23 6 0.00355 12 24 6 0.00276 8 25 6 0.00284 12 26 6 0.00308 12 27 6 0.00274 12 28 6 0.00237 8 29 6 0.00180 4 30 6 0.00193 8 31 6 0.00288 4 0 7 0.00237 4 1 7 0.00213 8 2 7 0.00113 12 3 7 0.00288 16 4 7 0.00359 16 5 7 0.00356 16 6 7 0.00368 20 7 7 0.00463 24 8 7 0.00606 20 9 7 0.00527 24 10 7 0.00664 16 11 7 0.00606 20 12 7 0.00540 24 13 7 0.00648 24 14 7 0.00706 20 15 7 0.00609 20 16 7 0.00605 20 17 7 0.00498 24 18 7 0.00595 24 19 7 0.00741 24 20 7 0.00592 24 21 7 0.00710 20 22 7 0.00514 20 23 7 0.00435 20 24 7 0.00559 12 25 7 0.00358 12 26 7 0.00317 12 27 7 0.00323 12 28 7 0.00292 12 29 7 0.00309 8 30 7 0.00324 8 31 7 0.00272 16 0 8 0.00359 12 1 8 0.00308 16 2 8 0.00445 20 3 8 0.00545 16 4 8 0.00560 16 5 8 0.00580 24 6 8 0.00703 20 7 8 0.00489 20 8 8 0.00597 24 9 8 0.00732 24 10 8 0.00698 28 11 8 0.00750 28 12 8 0.00852 24 13 8 0.00785 32 14 8 0.00902 28 15 8 0.00958 20 16 8 0.00652 32 17 8 0.00902 32 18 8 0.00907 28 19 8 0.00770 24 20 8 0.00678 24 21 8 0.00692 28 22 8 0.00691 20 23 8 0.00648 20 24 8 0.00577 20 25 8 0.00569 20 26 8 0.00530 16 27 8 0.00480 16 28 8 0.00391 16 29 8 0.00345 16 30 8 0.00432 16 31 8 0.00415 16 0 9 0.00445 12 1 9 0.00358 16 2 9 0.00480 20 3 9 0.00539 16 4 9 0.00474 20 5 9 0.00502 20 6 9 0.00628 28 7 9 0.00768 28 8 9 0.00750 32 9 9 0.0116 32 10 9 0.00772 28 11 9 0.00820 40 12 9 0.0106 32 13 9 0.00911 36 14 9 0.00977 40 15 9 0.0112 40 16 9 0.0107 36 17 9 0.00990 40 18 9 0.0113 36 19 9 0.00983 36 20 9 0.00920 36 21 9 0.00987 28 22 9 0.00850 32 23 9 0.00941 20 24 9 0.00629 24 25 9 0.00674 20 26 9 0.00656 20 27 9 0.00693 24 28 9 0.00613 16 29 9 0.00503 12 30 9 0.00462 16 31 9 0.00345 20 0 10 0.00576 24 1 10 0.00618 24 2 10 0.00633 20 3 10 0.00670 28 4 10 0.00741 24 5 10 0.00799 32 6 10 0.00927 28 7 10 0.00835 32 8 10 0.0100 44 9 10 0.0122 44 10 10 0.0130 48 11 10 0.0133 48 12 10 0.0138 48 13 10 0.0127 48 14 10 0.0138 52 15 10 0.0148 48 16 10 0.0143 56 17 10 0.0149 48 18 10 0.0144 48 19 10 0.0135 48 20 10 0.0134 40 21 10 0.0125 36 22 10 0.0111 44 23 10 0.0112 32 24 10 0.00962 32 25 10 0.00891 28 26 10 0.00873 24 27 10 0.00767 28 28 10 0.00824 24 29 10 0.00626 20 30 10 0.00573 16 31 10 0.00500 16 0 11 0.00470 16 1 11 0.00430 20 2 11 0.00510 28 3 11 0.00690 20 4 11 0.00615 32 5 11 0.00778 32 6 11 0.00901 32 7 11 0.00954 36 8 11 0.0109 40 9 11 0.0109 52 10 11 0.0140 48 11 11 0.0131 52 12 11 0.0142 56 13 11 0.0158 60 14 11 0.0171 64 15 11 0.0177 64 16 11 0.0179 60 17 11 0.0166 60 18 11 0.0168 56 19 11 0.0161 56 20 11 0.0165 48 21 11 0.0146 44 22 11 0.0120 44 23 11 0.0126 40 24 11 0.0101 28 25 11 0.00887 28 26 11 0.00852 28 27 11 0.00692 24 28 11 0.00695 28 29 11 0.00734 20 30 11 0.00523 12 31 11 0.00375 16 0 12 0.00506 20 1 12 0.00624 24 2 12 0.00627 28 3 12 0.00874 28 4 12 0.00857 36 5 12 0.00943 36 6 12 0.0102 40 7 12 0.0114 40 8 12 0.0120 52 9 12 0.0149 56 10 12 0.0157 60 11 12 0.0178 68 12 12 0.0196 72 13 12 0.0200 76 14 12 0.0220 84 15 12 0.0235 84 16 12 0.0235 80 17 12 0.0242 80 18 12 0.0239 80 19 12 0.0233 68 20 12 0.0200 60 21 12 0.0182 56 22 12 0.0159 52 23 12 0.0143 48 24 12 0.0131 40 25 12 0.0112 40 26 12 0.0118 32 27 12 0.00959 28 28 12 0.00890 28 29 12 0.00727 20 30 12 0.00581 24 31 12 0.00665 16 0 13 0.00554 20 1 13 0.00658 24 2 13 0.00603 28 3 13 0.00808 32 4 13 0.00922 32 5 13 0.00899 44 6 13 0.0113 44 7 13 0.0127 48 8 13 0.0134 56 9 13 0.0168 64 10 13 0.0180 76 11 13 0.0204 80 12 13 0.0231 92 13 13 0.0257 96 14 13 0.0278 104 15 13 0.0288 108 16 13 0.0311 108 17 13 0.0309 104 18 13 0.0304 96 19 13 0.0270 80 20 13 0.0235 72 21 13 0.0210 68 22 13 0.0194 60 23 13 0.0174 56 24 13 0.0164 48 25 13 0.0135 44 26 13 0.0122 40 27 13 0.0119 32 28 13 0.00999 28 29 13 0.00781 20 30 13 0.00671 28 31 13 0.00790 24 0 14 0.00574 20 1 14 0.00575 28 2 14 0.00738 32 3 14 0.00845 36 4 14 0.00980 36 5 14 0.0103 48 6 14 0.0133 52 7 14 0.0140 56 8 14 0.0152 64 9 14 0.0178 72 10 14 0.0192 80 11 14 0.0219 92 12 14 0.0250 104 13 14 0.0286 116 14 14 0.0326 132 15 14 0.0362 132 16 14 0.0376 136 17 14 0.0374 132 18 14 0.0377 120 19 14 0.0331 100 20 14 0.0287 84 21 14 0.0244 76 22 14 0.0212 68 23 14 0.0190 60 24 14 0.0163 56 25 14 0.0145 44 26 14 0.0135 40 27 14 0.0105 36 28 14 0.0102 32 29 14 0.00830 24 30 14 0.00718 24 31 14 0.00696 20 0 15 0.00605 28 1 15 0.00794 28 2 15 0.00884 32 3 15 0.00938 44 4 15 0.0128 44 5 15 0.0125 48 6 15 0.0133 48 7 15 0.0143 60 8 15 0.0172 72 9 15 0.0209 84 10 15 0.0224 92 11 15 0.0266 108 12 15 0.0309 128 13 15 0.0365 144 14 15 0.0413 160 15 15 0.0456 176 16 15 0.0504 188 17 15 0.0544 172 18 15 0.0508 148 19 15 0.0428 120 20 15 0.0352 100 21 15 0.0283 84 22 15 0.0238 72 23 15 0.0200 60 24 15 0.0170 56 25 15 0.0163 48 26 15 0.0137 36 27 15 0.0107 36 28 15 0.00975 28 29 15 0.00761 24 30 15 0.00775 24 31 15 0.00649 4 0 16 0.00323 12 1 16 0.00414 16 2 16 0.00478 20 3 16 0.00578 28 4 16 0.00884 32 5 16 0.0105 36 6 16 0.0111 52 7 16 0.0147 72 8 16 0.0205 84 9 16 0.0297 100 10 16 0.0456 108 11 16 0.0321 128 12 16 0.0362 160 13 16 0.0463 184 14 16 0.0692 204 15 16 0.0583 272 16 16 0.190 400 17 16 0.324 312 18 16 0.325 236 19 16 0.154 168 20 16 0.0904 164 21 16 0.138 168 22 16 0.269 156 23 16 0.153 144 24 16 0.212 104 25 16 0.180 68 26 16 0.0614 48 27 16 0.0633 64 28 16 0.0876 20 29 16 0.00619 20 30 16 0.00588 12 31 16 0.00403 12 0 17 0.00333 8 1 17 0.00231 12 2 17 0.00414 20 3 17 0.00713 32 4 17 0.00879 36 5 17 0.0102 48 6 17 0.0316 72 7 17 0.0568 92 8 17 0.0596 132 9 17 0.0727 132 10 17 0.0888 140 11 17 0.0841 156 12 17 0.0799 364 13 17 0.260 292 14 17 0.230 244 15 17 0.145 196 16 17 0.133 204 17 17 0.138 104 18 17 0.0667 68 19 17 0.0428 48 20 17 0.0480 32 21 17 0.0109 28 22 17 0.0592 28 23 17 0.0512 12 24 17 0.00593 8 25 17 0.00282 4 26 17 0.00175 8 27 17 0.0166 8 28 17 0.00227 4 29 17 9.60E-4 12 30 17 0.00336 4 31 17 0.00147 20 0 18 0.00882 20 1 18 0.00937 40 2 18 0.0228 64 3 18 0.0293 132 4 18 0.0722 128 5 18 0.0914 108 6 18 0.0640 204 7 18 0.173 136 8 18 0.0472 272 9 18 0.196 772 10 18 0.400 316 11 18 0.224 140 12 18 0.0751 200 13 18 0.144 276 14 18 0.258 648 15 18 0.619 124 16 18 0.136 40 17 18 0.0344 76 18 18 0.0719 88 19 18 0.0498 32 20 18 0.0224 8 21 18 0.0167 8 22 18 0.00435 4 23 18 0.00248 12 24 18 0.00295 4 25 18 8.34E-4 8 26 18 0.00180 8 27 18 0.00289 8 28 18 0.00260 4 29 18 0.00204 4 30 18 0.00249 4 31 18 0.00200 12 0 19 0.00581 12 1 19 0.0125 8 2 19 0.00269 24 3 19 0.00674 68 4 19 0.112 36 5 19 0.0490 112 6 19 0.0972 68 7 19 0.0824 108 8 19 0.0892 64 9 19 0.0402 36 10 19 0.00923 20 11 19 0.00617 20 12 19 0.00595 28 13 19 0.0116 20 14 19 0.00729 24 15 19 0.00834 12 16 19 0.00399 16 17 19 0.00611 12 18 19 0.00462 20 19 19 0.0109 12 20 19 0.00485 8 21 19 0.00218 8 22 19 0.00258 4 23 19 0.00213 12 24 19 0.00328 12 25 19 0.00366 8 26 19 0.00317 12 27 19 0.00383 4 28 19 0.00130 12 29 19 0.00313 12 30 19 0.00430 8 31 19 0.00194 4 0 20 -3.40E-5 0 1 20 4.32E-4 8 2 20 0.00161 4 3 20 0.00156 8 4 20 0.00192 8 5 20 0.00305 4 6 20 0.00208 4 7 20 0.00153 12 8 20 0.00161 12 9 20 0.00298 12 10 20 0.00303 8 11 20 0.00263 8 12 20 0.00246 8 13 20 0.00186 8 14 20 0.00237 4 15 20 0.00216 16 16 20 0.00441 20 17 20 0.00581 16 18 20 0.00368 12 19 20 0.00343 16 20 20 0.00451 12 21 20 0.00433 12 22 20 0.00456 16 23 20 0.00445 20 24 20 0.00544 12 25 20 0.00382 16 26 20 0.00364 20 27 20 0.00471 16 28 20 0.00400 12 29 20 0.00306 8 30 20 0.00139 4 31 20 0.00173 12 0 21 0.00258 8 1 21 0.00248 8 2 21 0.00293 4 3 21 0.00183 8 4 21 0.00256 12 5 21 0.00196 12 6 21 0.00187 12 7 21 0.00216 12 8 21 0.00345 12 9 21 0.00280 12 10 21 0.00384 12 11 21 0.00445 16 12 21 0.00544 12 13 21 0.00388 20 14 21 0.00391 20 15 21 0.00556 24 16 21 0.00632 20 17 21 0.00506 16 18 21 0.00394 16 19 21 0.00442 20 20 21 0.00550 12 21 21 0.00364 20 22 21 0.00506 8 23 21 0.00257 12 24 21 0.00314 12 25 21 0.00408 12 26 21 0.00310 16 27 21 0.00432 16 28 21 0.00443 8 29 21 0.00373 8 30 21 0.00283 12 31 21 0.00276 12 0 22 0.00381 12 1 22 0.00334 16 2 22 0.00382 12 3 22 0.00377 12 4 22 0.00394 12 5 22 0.00396 16 6 22 0.00543 16 7 22 0.00351 16 8 22 0.00534 12 9 22 0.00426 20 10 22 0.00586 20 11 22 0.00557 16 12 22 0.00483 20 13 22 0.00588 24 14 22 0.00680 20 15 22 0.00672 20 16 22 0.00498 20 17 22 0.00533 16 18 22 0.00477 16 19 22 0.00532 16 20 22 0.00518 12 21 22 0.00413 12 22 22 0.00451 12 23 22 0.00361 8 24 22 0.00237 8 25 22 0.00156 12 26 22 0.00368 16 27 22 0.00408 12 28 22 0.00307 12 29 22 0.00339 12 30 22 0.00418 12 31 22 0.00325 16 0 23 0.00347 4 1 23 0.00103 12 2 23 0.00385 8 3 23 0.00313 8 4 23 0.00299 12 5 23 0.00337 12 6 23 0.00486 16 7 23 0.00468 20 8 23 0.00498 8 9 23 0.00362 16 10 23 0.00517 16 11 23 0.00514 8 12 23 0.00234 12 13 23 0.00351 8 14 23 0.00373 20 15 23 0.00549 8 16 23 0.00221 8 17 23 0.00314 12 18 23 0.00377 16 19 23 0.00471 12 20 23 0.00406 12 21 23 0.00346 12 22 23 0.00378 12 23 23 0.00408 12 24 23 0.00325 12 25 23 0.00381 12 26 23 0.00382 16 27 23 0.00391 8 28 23 0.00220 12 29 23 0.00211 12 30 23 0.00423 4 31 23 0.00150 12 0 24 0.00233 8 1 24 0.00286 12 2 24 0.00285 8 3 24 0.00309 8 4 24 0.00339 12 5 24 0.00366 12 6 24 0.00321 8 7 24 0.00386 12 8 24 0.00432 12 9 24 0.00341 12 10 24 0.00398 16 11 24 0.00486 16 12 24 0.00394 16 13 24 0.00455 8 14 24 0.00189 12 15 24 0.00403 16 16 24 0.00440 12 17 24 0.00364 12 18 24 0.00461 16 19 24 0.00394 16 20 24 0.00440 16 21 24 0.00381 12 22 24 0.00356 8 23 24 0.00217 8 24 24 0.00221 8 25 24 0.00350 12 26 24 0.00377 4 27 24 8.00E-4 8 28 24 0.00213 8 29 24 0.00230 12 30 24 0.00279 8 31 24 0.00245