-4 0 1 -0.0155 -1 1 1 0.00342 1 2 1 0.00506 0 3 1 0.00257 -2 4 1 0.00148 0 5 1 0.00267 -1 6 1 -4.16E-4 0 7 1 5.87E-4 -2 8 1 -0.00312 0 9 1 0.00129 -3 10 1 -0.00762 1 11 1 0.00396 0 12 1 0.00380 -2 13 1 -0.00815 2 14 1 0.00710 3 15 1 0.00882 0 16 1 7.76E-5 2 17 1 0.00549 -1 18 1 -0.00145 0 19 1 -0.00304 -1 20 1 -0.00355 1 21 1 4.96E-4 -1 22 1 5.18E-4 0 23 1 0.00115 -1 24 1 -0.00205 0 25 1 -0.00144 -1 26 1 -0.00104 0 27 1 3.55E-4 -1 28 1 -0.00548 -3 29 1 -0.00836 -2 30 1 -0.0101 0 31 1 7.21E-4 2 0 2 0.0121 -1 1 2 0.00495 0 2 2 0.0122 3 3 2 0.0155 1 4 2 0.00736 3 5 2 0.0101 1 6 2 0.00644 0 7 2 0.0107 1 8 2 0.00699 1 9 2 0.00797 2 10 2 0.0106 2 11 2 0.00741 3 12 2 0.0124 -1 13 2 0.00711 4 14 2 0.0202 3 15 2 0.0174 3 16 2 0.0151 2 17 2 0.0108 3 18 2 0.0144 2 19 2 0.0158 1 20 2 0.0139 1 21 2 0.00779 3 22 2 0.0191 1 23 2 0.0139 1 24 2 0.0128 3 25 2 0.0180 2 26 2 0.0132 -1 27 2 0.00730 -1 28 2 0.00218 0 29 2 0.00836 0 30 2 0.00455 0 31 2 0.00760 -3 0 3 3.36E-4 -2 1 3 -3.13E-4 0 2 3 0.00597 1 3 3 0.0145 -1 4 3 0.00631 2 5 3 0.0173 1 6 3 0.0142 -1 7 3 0.00458 -1 8 3 -5.75E-4 0 9 3 0.00960 -3 10 3 -0.00400 -1 11 3 0.00861 0 12 3 0.00551 0 13 3 0.00447 3 14 3 0.0183 4 15 3 0.0173 0 16 3 0.00872 1 17 3 0.0106 1 18 3 0.00762 1 19 3 0.00873 -1 20 3 0.0110 2 21 3 0.0154 1 22 3 0.0138 1 23 3 0.00467 0 24 3 0.0112 0 25 3 0.00588 0 26 3 0.00788 -1 27 3 0.00622 -3 28 3 0.00271 -1 29 3 0.00587 -1 30 3 0.00482 -1 31 3 -0.00265 1 0 4 0.0135 0 1 4 0.00704 0 2 4 0.00847 0 3 4 0.00940 3 4 4 0.0116 1 5 4 0.0124 0 6 4 0.00626 0 7 4 0.00607 1 8 4 0.00925 1 9 4 0.00839 3 10 4 0.0154 1 11 4 0.0130 2 12 4 0.00956 0 13 4 0.00947 3 14 4 0.0199 3 15 4 0.0134 3 16 4 0.0171 4 17 4 0.0157 2 18 4 0.0122 4 19 4 0.0224 4 20 4 0.0254 3 21 4 0.0250 5 22 4 0.0237 4 23 4 0.0233 3 24 4 0.0210 3 25 4 0.0183 2 26 4 0.0138 -1 27 4 0.00968 1 28 4 0.0139 1 29 4 0.0106 1 30 4 0.0159 1 31 4 0.0129 1 0 5 0.0116 0 1 5 0.00561 -1 2 5 0.00760 2 3 5 0.0133 0 4 5 0.0107 0 5 5 0.00975 1 6 5 0.00964 0 7 5 0.00530 1 8 5 0.0170 3 9 5 0.0164 1 10 5 0.0110 1 11 5 0.0112 2 12 5 0.0212 2 13 5 0.0138 5 14 5 0.0177 3 15 5 0.0194 2 16 5 0.0179 4 17 5 0.0127 1 18 5 0.0157 4 19 5 0.0221 4 20 5 0.0200 6 21 5 0.0325 4 22 5 0.0195 4 23 5 0.0236 3 24 5 0.0232 2 25 5 0.0145 3 26 5 0.0194 0 27 5 0.00929 3 28 5 0.0204 -1 29 5 0.00686 0 30 5 0.00462 1 31 5 0.00723 0 0 6 0.00858 -1 1 6 0.00102 1 2 6 0.00506 0 3 6 0.00873 1 4 6 0.0120 2 5 6 0.0169 2 6 6 0.0164 1 7 6 0.00489 1 8 6 0.00694 0 9 6 0.0103 1 10 6 0.00510 1 11 6 0.00975 1 12 6 0.00662 2 13 6 0.00956 0 14 6 -6.08E-4 4 15 6 0.0175 3 16 6 0.0201 5 17 6 0.0198 2 18 6 0.0145 5 19 6 0.0244 8 20 6 0.0385 5 21 6 0.0260 6 22 6 0.0228 6 23 6 0.0256 3 24 6 0.0189 3 25 6 0.0128 4 26 6 0.0187 1 27 6 0.0120 -1 28 6 0.00405 -1 29 6 0.00190 -2 30 6 3.06E-4 -1 31 6 7.18E-4 0 0 7 0.00165 -1 1 7 -0.00123 1 2 7 0.0102 2 3 7 0.0107 -1 4 7 0.00106 2 5 7 0.0152 4 6 7 0.0176 0 7 7 0.00856 1 8 7 0.0132 0 9 7 0.00541 1 10 7 0.00980 1 11 7 0.00774 1 12 7 0.00682 2 13 7 0.0132 2 14 7 0.0130 4 15 7 0.0138 5 16 7 0.0212 5 17 7 0.0277 7 18 7 0.0257 8 19 7 0.0318 10 20 7 0.0454 10 21 7 0.0454 12 22 7 0.0503 9 23 7 0.0394 8 24 7 0.0287 8 25 7 0.0324 4 26 7 0.0186 3 27 7 0.0123 3 28 7 0.0116 2 29 7 0.00642 0 30 7 0.00646 1 31 7 0.00873 -1 0 8 -0.00131 0 1 8 0.00262 0 2 8 0.00834 2 3 8 0.0159 0 4 8 0.00781 1 5 8 0.00807 0 6 8 0.00122 2 7 8 0.0146 0 8 8 0.00198 0 9 8 0.00435 0 10 8 0.0113 0 11 8 0.00111 2 12 8 0.0115 1 13 8 0.00743 4 14 8 0.0185 5 15 8 0.0260 5 16 8 0.0197 8 17 8 0.0321 9 18 8 0.0348 12 19 8 0.0453 18 20 8 0.0717 20 21 8 0.0794 19 22 8 0.0734 15 23 8 0.0587 9 24 8 0.0375 7 25 8 0.0260 3 26 8 0.0160 4 27 8 0.0256 3 28 8 0.0138 0 29 8 2.73E-4 1 30 8 0.00568 -1 31 8 5.10E-4 -1 0 9 -0.00355 -2 1 9 -0.00101 -1 2 9 0.00375 -2 3 9 1.33E-4 1 4 9 0.00508 -2 5 9 -4.31E-4 1 6 9 0.00974 0 7 9 9.81E-4 0 8 9 0.00778 2 9 9 0.0135 -1 10 9 0.00148 1 11 9 0.0126 3 12 9 0.0641 1 13 9 0.00881 3 14 9 0.0168 3 15 9 0.0163 3 16 9 0.0114 3 17 9 0.0170 7 18 9 0.0262 14 19 9 0.0547 29 20 9 0.118 73 21 9 1.17 43 22 9 0.170 23 23 9 0.0911 14 24 9 0.0519 7 25 9 0.0319 4 26 9 0.0175 3 27 9 0.0148 0 28 9 0.0106 -1 29 9 0.00151 -3 30 9 -0.00286 -1 31 9 -0.00213 0 0 10 0.00617 -1 1 10 0.00307 1 2 10 0.00638 1 3 10 0.00501 1 4 10 0.0116 0 5 10 0.00277 0 6 10 0.00353 1 7 10 0.00618 -1 8 10 0.00349 -1 9 10 0.00839 0 10 10 0.00930 2 11 10 0.0103 1 12 10 0.00895 2 13 10 0.00964 4 14 10 0.0196 4 15 10 0.0211 4 16 10 0.0220 12 17 10 0.268 7 18 10 0.0338 17 19 10 0.0668 44 20 10 0.501 130 21 10 2.09 187 22 10 3.19 51 23 10 0.205 27 24 10 0.0996 13 25 10 0.0557 8 26 10 0.0332 4 27 10 0.0199 3 28 10 0.0144 1 29 10 0.00790 -1 30 10 0.00439 1 31 10 0.0121 0 0 11 0.00834 -1 1 11 9.85E-5 0 2 11 0.00494 1 3 11 0.0146 1 4 11 0.00627 1 5 11 0.0129 1 6 11 0.00758 1 7 11 0.0138 0 8 11 0.00530 1 9 11 0.0113 2 10 11 0.00813 1 11 11 0.0164 3 12 11 0.0162 1 13 11 0.00763 3 14 11 0.0104 5 15 11 0.0167 7 16 11 0.0306 6 17 11 0.0267 9 18 11 0.0362 14 19 11 0.0575 24 20 11 0.0932 55 21 11 0.680 127 22 11 2.16 212 23 11 3.19 45 24 11 0.212 19 25 11 0.0792 9 26 11 0.0361 4 27 11 0.0250 1 28 11 0.0132 1 29 11 0.00999 -1 30 11 0.00613 -1 31 11 0.00660 0 0 12 0.00788 -1 1 12 0.00297 5 2 12 0.0364 7 3 12 0.0614 1 4 12 0.00316 -1 5 12 -0.00179 2 6 12 0.00797 4 7 12 0.0192 0 8 12 0.00635 1 9 12 0.00776 1 10 12 0.00782 3 11 12 0.00806 3 12 12 0.0138 1 13 12 0.0112 3 14 12 0.0106 4 15 12 0.0105 3 16 12 0.0135 5 17 12 0.0183 6 18 12 0.0187 8 19 12 0.0318 12 20 12 0.0510 28 21 12 0.106 51 22 12 0.223 988 23 12 4.30 80 24 12 1.73 19 25 12 0.0752 8 26 12 0.0339 4 27 12 0.0255 2 28 12 0.00987 2 29 12 0.0100 -2 30 12 -5.74E-4 1 31 12 0.00611 8 0 13 0.0650 5 1 13 0.0567 3 2 13 0.0168 1 3 13 0.0130 2 4 13 0.00899 2 5 13 0.0118 1 6 13 0.00553 3 7 13 0.0159 0 8 13 -0.00780 0 9 13 0.00534 2 10 13 0.00687 6 11 13 0.0290 11 12 13 0.0627 4 13 13 0.0172 1 14 13 -0.00183 3 15 13 0.00940 4 16 13 0.0244 4 17 13 0.00858 1 18 13 0.00617 5 19 13 0.0155 8 20 13 0.0284 16 21 13 0.220 23 22 13 0.0950 65 23 13 1.28 27 24 13 0.0965 12 25 13 0.0481 7 26 13 0.0295 4 27 13 0.0441 4 28 13 0.0325 -1 29 13 -0.00271 -1 30 13 -0.00292 -2 31 13 -0.00113 9 0 14 0.672 -1 1 14 0.00138 -1 2 14 -0.00421 -4 3 14 -0.0115 -2 4 14 -0.00558 1 5 14 0.00577 0 6 14 0.0257 0 7 14 -0.00251 0 8 14 5.24E-4 3 9 14 0.0586 1 10 14 0.00567 3 11 14 0.0258 5 12 14 0.0325 6 13 14 0.0326 9 14 14 0.0484 1 15 14 0.00758 4 16 14 0.0180 0 17 14 0.00347 -1 18 14 -0.00830 0 19 14 0.00331 4 20 14 0.0149 3 21 14 0.0166 8 22 14 0.0329 12 23 14 0.0392 7 24 14 0.0325 6 25 14 0.0186 4 26 14 0.0349 -1 27 14 0.00481 -1 28 14 -0.00674 -1 29 14 -0.00272 -1 30 14 -0.00606 -1 31 14 -2.44E-4 2 0 15 0.0128 4 1 15 0.0415 -2 2 15 -0.00147 0 3 15 0.00376 0 4 15 0.00950 -1 5 15 0.00928 1 6 15 0.00949 1 7 15 0.0108 3 8 15 0.0127 1 9 15 0.00283 11 10 15 0.0862 5 11 15 0.0540 1 12 15 0.0102 4 13 15 0.0197 6 14 15 0.0251 3 15 15 0.0142 8 16 15 0.0364 9 17 15 0.0343 8 18 15 0.0354 8 19 15 0.0381 7 20 15 0.0276 4 21 15 0.0129 3 22 15 0.0148 6 23 15 0.0197 4 24 15 0.0204 2 25 15 0.0117 1 26 15 0.00836 2 27 15 0.00979 -1 28 15 -0.00260 0 29 15 0.00133 0 30 15 0.00414 1 31 15 0.00849 2 0 16 0.0144 1 1 16 0.00650 1 2 16 0.00959 3 3 16 0.0204 1 4 16 0.0179 2 5 16 0.00771 5 6 16 0.0192 3 7 16 0.0173 3 8 16 0.0200 2 9 16 0.0109 3 10 16 0.0182 4 11 16 0.0165 2 12 16 0.0157 4 13 16 0.0147 4 14 16 0.0178 6 15 16 0.0255 9 16 16 0.0319 9 17 16 0.0334 6 18 16 0.0258 7 19 16 0.0297 4 20 16 0.0169 3 21 16 0.0112 5 22 16 0.0177 5 23 16 0.0194 4 24 16 0.0211 2 25 16 0.0116 4 26 16 0.0174 2 27 16 0.0106 3 28 16 0.0131 0 29 16 0.00260 3 30 16 0.00589 1 31 16 0.00766 0 0 17 -0.00116 -1 1 17 -0.00897 0 2 17 -0.00153 3 3 17 0.0155 3 4 17 0.00844 2 5 17 0.00608 1 6 17 0.00237 0 7 17 0.00351 3 8 17 0.0129 3 9 17 0.00815 4 10 17 0.0147 6 11 17 0.0181 4 12 17 0.0180 5 13 17 0.0224 7 14 17 0.0254 9 15 17 0.0344 8 16 17 0.0308 7 17 17 0.0328 8 18 17 0.0347 7 19 17 0.0279 8 20 17 0.0256 9 21 17 0.0363 11 22 17 0.0424 12 23 17 0.0422 10 24 17 0.0453 10 25 17 0.0390 10 26 17 0.0413 10 27 17 0.0364 9 28 17 0.0313 8 29 17 0.0294 5 30 17 0.0208 2 31 17 0.00885 -2 0 18 -0.00711 0 1 18 5.71E-4 0 2 18 0.00500 1 3 18 0.00251 2 4 18 0.0105 2 5 18 0.0127 3 6 18 0.00760 2 7 18 0.0135 2 8 18 0.0110 1 9 18 0.00695 5 10 18 0.0212 4 11 18 0.0142 2 12 18 0.0128 3 13 18 0.0164 3 14 18 0.0137 3 15 18 0.0111 5 16 18 0.0131 6 17 18 0.0185 5 18 18 0.0205 6 19 18 0.0251 10 20 18 0.0368 9 21 18 0.0342 12 22 18 0.0484 13 23 18 0.0555 11 24 18 0.0409 11 25 18 0.0446 12 26 18 0.0476 11 27 18 0.0437 8 28 18 0.0353 4 29 18 0.0203 5 30 18 0.0255 3 31 18 0.0121 0 0 19 0.0107 0 1 19 0.00154 4 2 19 0.0185 5 3 19 0.0186 3 4 19 0.0108 3 5 19 0.0179 1 6 19 0.0104 3 7 19 0.0166 4 8 19 0.0157 4 9 19 0.0195 3 10 19 0.0167 1 11 19 0.00877 3 12 19 0.00774 5 13 19 0.0176 2 14 19 0.0109 6 15 19 0.0253 4 16 19 0.0201 6 17 19 0.0249 7 18 19 0.0309 3 19 19 0.0144 8 20 19 0.0318 8 21 19 0.0352 5 22 19 0.0267 5 23 19 0.0265 4 24 19 0.0167 7 25 19 0.0339 5 26 19 0.0222 6 27 19 0.0266 6 28 19 0.0265 4 29 19 0.0197 7 30 19 0.0285 3 31 19 0.0141 1 0 20 0.0116 -1 1 20 -0.00379 0 2 20 0.00148 2 3 20 0.0102 1 4 20 3.76E-4 -1 5 20 -0.00442 2 6 20 0.00903 -1 7 20 -7.03E-4 -1 8 20 -0.00634 2 9 20 0.00842 1 10 20 0.00443 1 11 20 0.00396 1 12 20 0.00538 3 13 20 0.0177 4 14 20 0.0142 6 15 20 0.0234 4 16 20 0.0142 3 17 20 0.0127 3 18 20 0.0110 1 19 20 0.00289 3 20 20 0.0116 3 21 20 0.0113 2 22 20 0.00536 1 23 20 0.00361 3 24 20 0.00664 5 25 20 0.0220 6 26 20 0.0238 2 27 20 0.00995 0 28 20 0.00291 3 29 20 0.0108 1 30 20 0.00349 0 31 20 0.00439 3 0 21 0.00826 1 1 21 0.00748 -1 2 21 -0.00205 1 3 21 0.00412 2 4 21 0.00640 3 5 21 0.0128 4 6 21 0.0157 4 7 21 0.0179 3 8 21 0.0175 2 9 21 0.0104 3 10 21 0.00889 1 11 21 0.00832 2 12 21 0.00962 3 13 21 0.0161 5 14 21 0.0163 5 15 21 0.0146 4 16 21 0.0211 2 17 21 0.00927 2 18 21 0.00824 2 19 21 0.00685 3 20 21 0.0150 4 21 21 0.0155 5 22 21 0.0225 2 23 21 0.00763 3 24 21 0.0123 3 25 21 0.0128 2 26 21 0.00514 1 27 21 0.00652 6 28 21 0.0221 2 29 21 0.00457 -2 30 21 -0.00764 -3 31 21 -0.00569 -1 0 22 -4.11E-4 3 1 22 0.00892 1 2 22 0.00559 2 3 22 0.00699 1 4 22 0.00566 2 5 22 0.00861 1 6 22 0.00985 4 7 22 0.0148 3 8 22 0.0174 3 9 22 0.0135 3 10 22 0.0146 2 11 22 0.0149 3 12 22 0.00807 3 13 22 0.0117 4 14 22 0.0156 5 15 22 0.0176 4 16 22 0.0167 1 17 22 0.00112 3 18 22 0.00522 5 19 22 0.0219 5 20 22 0.0196 5 21 22 0.0283 7 22 22 0.0257 1 23 22 0.00322 0 24 22 0.00661 0 25 22 -3.56E-4 0 26 22 0.00221 0 27 22 6.73E-4 1 28 22 0.0136 2 29 22 0.00905 0 30 22 0.00702 2 31 22 0.00357 2 0 23 0.0164 0 1 23 0.0102 3 2 23 0.0131 2 3 23 0.0100 2 4 23 0.0165 3 5 23 0.0149 3 6 23 0.0197 3 7 23 0.00999 2 8 23 0.00943 2 9 23 0.0147 1 10 23 0.0155 3 11 23 0.0155 1 12 23 0.0103 3 13 23 0.0155 3 14 23 0.0222 4 15 23 0.0204 5 16 23 0.0219 5 17 23 0.0267 2 18 23 0.0149 3 19 23 0.0163 3 20 23 0.0141 1 21 23 0.00707 0 22 23 0.00894 4 23 23 0.0142 2 24 23 0.0145 1 25 23 0.00847 2 26 23 0.0102 1 27 23 0.0135 2 28 23 0.0176 0 29 23 0.00475 1 30 23 0.0121 0 31 23 0.0115 1 0 24 0.00864 1 1 24 0.00509 0 2 24 8.76E-4 1 3 24 0.00735 0 4 24 0.00451 4 5 24 0.0174 1 6 24 0.0127 4 7 24 0.0185 2 8 24 0.00554 0 9 24 0.00918 0 10 24 0.00338 1 11 24 -0.00153 1 12 24 0.00409 1 13 24 0.00530 3 14 24 0.00908 3 15 24 0.00985 1 16 24 0.00431 3 17 24 0.0171 0 18 24 0.00815 5 19 24 0.0209 3 20 24 0.0130 0 21 24 0.0118 2 22 24 0.0161 3 23 24 0.0137 2 24 24 0.0163 4 25 24 0.0162 3 26 24 0.0125 0 27 24 0.00596 -1 28 24 0.00296 0 29 24 0.00331 -1 30 24 0.00414 1 31 24 0.00776