3 0 1 1.73E-5 12 1 1 6.42E-5 83 2 1 0.00145 476 3 1 0.00237 729 4 1 0.00347 89 5 1 0.00178 12 6 1 6.38E-5 1 7 1 4.86E-6 4 0 2 2.55E-5 231 1 2 0.00164 439 2 2 0.00232 333 3 2 0.00164 390 4 2 0.00197 641 5 2 0.00352 72 6 2 0.00101 6 7 2 3.75E-5 6 0 3 4.03E-5 534 1 3 0.00257 295 2 3 0.00142 246 3 3 0.00118 287 4 3 0.00139 490 5 3 0.00250 866 6 3 0.00465 17 7 3 9.69E-5 9 0 4 1.05E-4 552 1 4 0.00309 281 2 4 0.00135 238 3 4 0.00114 273 4 4 0.00131 478 5 4 0.00242 903 6 4 0.00435 11 7 4 5.99E-5 4 0 5 2.88E-5 485 1 5 0.00208 354 2 5 0.00172 278 3 5 0.00133 325 4 5 0.00157 624 5 5 0.00303 502 6 5 0.00288 3 7 5 2.75E-5 0 0 6 7.24E-6 11 1 6 1.96E-4 411 2 6 0.00169 440 3 6 0.00226 512 4 6 0.00246 498 5 6 0.00227 7 6 6 1.73E-4 -2 7 6 -3.65E-7