16 0 1 0.0103 12 1 1 0.00996 12 2 1 0.00730 12 3 1 0.00899 12 4 1 0.00838 16 5 1 0.00823 12 6 1 0.00909 12 7 1 0.00553 12 8 1 0.00624 12 9 1 0.00774 8 10 1 0.00580 12 11 1 0.00874 12 12 1 0.00577 8 13 1 0.00550 16 14 1 0.00860 12 15 1 0.00731 12 16 1 0.00703 8 17 1 0.00635 8 18 1 0.00581 8 19 1 0.00541 12 20 1 0.00760 12 21 1 0.00587 12 22 1 0.00757 8 23 1 0.00598 8 24 1 0.00506 8 25 1 0.00512 8 26 1 0.00506 8 27 1 0.00303 8 28 1 0.00320 8 29 1 0.00448 8 30 1 0.00497 8 31 1 0.00337 16 0 2 0.0118 16 1 2 0.0103 16 2 2 0.0111 16 3 2 0.00970 12 4 2 0.00994 16 5 2 0.0110 12 6 2 0.00875 16 7 2 0.0102 12 8 2 0.00683 12 9 2 0.00864 12 10 2 0.00856 12 11 2 0.00895 12 12 2 0.00924 12 13 2 0.00669 12 14 2 0.00861 12 15 2 0.00752 12 16 2 0.00834 12 17 2 0.00548 12 18 2 0.00819 12 19 2 0.00898 12 20 2 0.00778 8 21 2 0.00543 12 22 2 0.00811 8 23 2 0.00492 8 24 2 0.00649 8 25 2 0.00519 8 26 2 0.00513 8 27 2 0.00459 8 28 2 0.00373 4 29 2 0.00436 4 30 2 0.00259 8 31 2 0.00523 20 0 3 0.0166 20 1 3 0.0150 20 2 3 0.0124 16 3 3 0.0106 16 4 3 0.0126 16 5 3 0.0115 16 6 3 0.0105 16 7 3 0.00957 16 8 3 0.0124 12 9 3 0.00829 12 10 3 0.00957 12 11 3 0.00653 16 12 3 0.00941 12 13 3 0.00923 12 14 3 0.00912 12 15 3 0.0111 12 16 3 0.00970 12 17 3 0.00918 12 18 3 0.00960 8 19 3 0.00692 12 20 3 0.00808 12 21 3 0.00764 12 22 3 0.00799 12 23 3 0.00733 12 24 3 0.00616 8 25 3 0.00647 8 26 3 0.00559 8 27 3 0.00522 8 28 3 0.00523 8 29 3 0.00694 8 30 3 0.00471 4 31 3 0.00280 20 0 4 0.0144 20 1 4 0.0131 20 2 4 0.0140 20 3 4 0.0140 16 4 4 0.0104 16 5 4 0.0110 16 6 4 0.00989 16 7 4 0.0107 16 8 4 0.0116 16 9 4 0.0109 16 10 4 0.0115 12 11 4 0.00877 16 12 4 0.0120 16 13 4 0.0100 16 14 4 0.0116 12 15 4 0.00900 12 16 4 0.0111 12 17 4 0.00832 12 18 4 0.00654 12 19 4 0.0100 8 20 4 0.00742 12 21 4 0.00742 12 22 4 0.00745 8 23 4 0.00493 8 24 4 0.00606 8 25 4 0.00466 8 26 4 0.00488 8 27 4 0.00671 8 28 4 0.00520 8 29 4 0.00463 8 30 4 0.00536 4 31 4 6.82E-4 24 0 5 0.0176 20 1 5 0.0145 24 2 5 0.0162 24 3 5 0.0169 20 4 5 0.0150 20 5 5 0.0147 20 6 5 0.0126 20 7 5 0.0139 16 8 5 0.0125 20 9 5 0.0134 16 10 5 0.0129 16 11 5 0.0137 16 12 5 0.0129 16 13 5 0.0128 20 14 5 0.0134 16 15 5 0.0141 16 16 5 0.0106 12 17 5 0.0111 16 18 5 0.0120 16 19 5 0.0105 16 20 5 0.0116 12 21 5 0.0103 12 22 5 0.00857 12 23 5 0.00885 12 24 5 0.00798 8 25 5 0.00691 12 26 5 0.00805 12 27 5 0.00700 8 28 5 0.00609 8 29 5 0.00563 8 30 5 0.00614 8 31 5 0.00560 20 0 6 0.0156 20 1 6 0.0135 20 2 6 0.0139 20 3 6 0.0156 20 4 6 0.0132 20 5 6 0.0149 16 6 6 0.0138 20 7 6 0.0148 20 8 6 0.0147 20 9 6 0.0157 20 10 6 0.0135 16 11 6 0.0118 20 12 6 0.0123 20 13 6 0.0146 16 14 6 0.0120 20 15 6 0.0124 16 16 6 0.0126 16 17 6 0.0115 16 18 6 0.0122 12 19 6 0.00888 12 20 6 0.00872 16 21 6 0.0103 12 22 6 0.00879 12 23 6 0.00908 12 24 6 0.00527 8 25 6 0.00548 8 26 6 0.00505 8 27 6 0.00666 8 28 6 0.00638 4 29 6 0.00440 8 30 6 0.00332 4 31 6 0.00340 20 0 7 0.0138 20 1 7 0.0155 20 2 7 0.0165 24 3 7 0.0169 24 4 7 0.0176 20 5 7 0.0171 24 6 7 0.0193 20 7 7 0.0154 24 8 7 0.0160 28 9 7 0.0190 24 10 7 0.0181 20 11 7 0.0161 24 12 7 0.0180 24 13 7 0.0165 20 14 7 0.0152 24 15 7 0.0171 24 16 7 0.0170 20 17 7 0.0151 24 18 7 0.0160 16 19 7 0.0136 20 20 7 0.0132 20 21 7 0.0123 16 22 7 0.0120 16 23 7 0.0108 16 24 7 0.0108 16 25 7 0.00957 8 26 7 0.00817 12 27 7 0.00764 12 28 7 0.00987 12 29 7 0.00749 8 30 7 0.00637 12 31 7 0.00769 16 0 8 0.0128 20 1 8 0.0133 20 2 8 0.0137 20 3 8 0.0157 20 4 8 0.0167 20 5 8 0.0159 24 6 8 0.0154 24 7 8 0.0174 28 8 8 0.0189 24 9 8 0.0185 28 10 8 0.0199 24 11 8 0.0198 24 12 8 0.0180 24 13 8 0.0173 24 14 8 0.0186 24 15 8 0.0180 24 16 8 0.0191 20 17 8 0.0151 20 18 8 0.0163 20 19 8 0.0147 20 20 8 0.0130 16 21 8 0.0129 16 22 8 0.0115 12 23 8 0.0108 12 24 8 0.00885 12 25 8 0.00772 16 26 8 0.00955 12 27 8 0.00863 12 28 8 0.00848 16 29 8 0.0122 16 30 8 0.0122 12 31 8 0.00840 16 0 9 0.0119 16 1 9 0.0123 20 2 9 0.0134 20 3 9 0.0159 20 4 9 0.0172 24 5 9 0.0170 24 6 9 0.0178 24 7 9 0.0175 28 8 9 0.0196 32 9 9 0.0215 32 10 9 0.0226 32 11 9 0.0229 32 12 9 0.0224 28 13 9 0.0216 32 14 9 0.0216 28 15 9 0.0220 28 16 9 0.0207 28 17 9 0.0186 24 18 9 0.0182 20 19 9 0.0164 20 20 9 0.0163 20 21 9 0.0148 20 22 9 0.0141 20 23 9 0.0132 16 24 9 0.0113 16 25 9 0.0106 16 26 9 0.0111 20 27 9 0.0131 24 28 9 0.0146 16 29 9 0.0107 16 30 9 0.0131 16 31 9 0.0121 36 0 10 0.0474 40 1 10 0.0496 36 2 10 0.0495 32 3 10 0.0435 28 4 10 0.0249 24 5 10 0.0214 24 6 10 0.0178 24 7 10 0.0181 28 8 10 0.0198 32 9 10 0.0229 32 10 10 0.0244 40 11 10 0.0310 40 12 10 0.0302 36 13 10 0.0258 36 14 10 0.0272 36 15 10 0.0265 36 16 10 0.0257 28 17 10 0.0222 28 18 10 0.0187 24 19 10 0.0183 24 20 10 0.0188 20 21 10 0.0134 20 22 10 0.0140 24 23 10 0.0159 20 24 10 0.0152 24 25 10 0.0169 20 26 10 0.0164 20 27 10 0.0150 24 28 10 0.0179 20 29 10 0.0147 20 30 10 0.0151 20 31 10 0.0133 136 0 11 0.128 68 1 11 0.0986 32 2 11 0.0335 36 3 11 0.0328 44 4 11 0.0476

1308 5 11 0.894 84 6 11 0.297 40 7 11 0.0338 36 8 11 0.0302 40 9 11 0.0316 40 10 11 0.0349 52 11 11 0.0350 152 12 11 0.270 84 13 11 0.130 48 14 11 0.0360 44 15 11 0.0301 40 16 11 0.0275 36 17 11 0.0251 28 18 11 0.0233 24 19 11 0.0159 20 20 11 0.0154 24 21 11 0.0165 24 22 11 0.0194 24 23 11 0.0182 24 24 11 0.0172 24 25 11 0.0181 28 26 11 0.0208 20 27 11 0.0161 24 28 11 0.0158 20 29 11 0.0160 24 30 11 0.0172 16 31 11 0.0110 304 0 12 0.208 168 1 12 0.141 28 2 12 0.0193 36 3 12 0.0517 52 4 12 0.127 764 5 12 0.505 148 6 12 0.477 136 7 12 0.144 52 8 12 0.0640 48 9 12 0.0350 112 10 12 0.192 120 11 12 0.185 336 12 12 0.262 156 13 12 0.152 100 14 12 0.0793 72 15 12 0.0523 68 16 12 0.0532 40 17 12 0.0299 36 18 12 0.0248 28 19 12 0.0208 32 20 12 0.0224 28 21 12 0.0204 24 22 12 0.0166 28 23 12 0.0216 24 24 12 0.0170 28 25 12 0.0205 28 26 12 0.0194 28 27 12 0.0231 24 28 12 0.0176 28 29 12 0.0212 24 30 12 0.0192 16 31 12 0.0131 356 0 13 0.392 428 1 13 0.545 152 2 13 0.129 44 3 13 0.0593 344 4 13 0.542 888 5 13 1.45 432 6 13 0.486 316 7 13 0.379 192 8 13 0.254 56 9 13 0.0614 460 10 13 0.435 292 11 13 0.288 264 12 13 0.277 248 13 13 0.210 472 14 13 0.791 136 15 13 0.144 104 16 13 0.171 60 17 13 0.0471 56 18 13 0.0394 28 19 13 0.0217 28 20 13 0.0220 28 21 13 0.0210 28 22 13 0.0205 28 23 13 0.0213 24 24 13 0.0164 36 25 13 0.0276 28 26 13 0.0216 28 27 13 0.0215 32 28 13 0.0244 32 29 13 0.0251 32 30 13 0.0265 32 31 13 0.0267 560 0 14 0.422 696 1 14 0.497 208 2 14 0.188 48 3 14 0.0900 388 4 14 0.374 80 5 14 0.226 484 6 14 0.467 124 7 14 0.276 48 8 14 0.0475 48 9 14 0.0357 68 10 14 0.100 84 11 14 0.0880 112 12 14 0.123 168 13 14 0.137 292 14 14 0.415 252 15 14 0.428 116 16 14 0.0888 80 17 14 0.0609 64 18 14 0.0542 48 19 14 0.0485 52 20 14 0.0559 68 21 14 0.0666 100 22 14 0.0842 160 23 14 0.120 232 24 14 0.159 244 25 14 0.168 252 26 14 0.180 240 27 14 0.170 236 28 14 0.184 240 29 14 0.256 220 30 14 0.228 216 31 14 0.174 244 0 15 0.216 308 1 15 0.248 108 2 15 0.181 192 3 15 0.217 688 4 15 0.483 860 5 15 0.606 812 6 15 0.661 240 7 15 0.442 136 8 15 0.443 560 9 15 0.484 956 10 15 0.502 816 11 15 0.496 624 12 15 0.461 332 13 15 0.299 436 14 15 0.309 432 15 15 0.330 412 16 15 0.316 428 17 15 0.332 484 18 15 0.380 540 19 15 0.413 476 20 15 0.412 564 21 15 0.434 616 22 15 0.475 744 23 15 0.550 856 24 15 0.627 928 25 15 0.665

1004 26 15 0.723 992 27 15 0.732

1016 28 15 0.743

1168 29 15 0.868

1032 30 15 0.830 944 31 15 0.678 516 0 16 0.393 528 1 16 0.400 524 2 16 0.401 564 3 16 0.515 980 4 16 0.817 940 5 16 0.928 832 6 16 0.869 840 7 16 0.683 836 8 16 0.654 792 9 16 0.609 832 10 16 0.626 976 11 16 0.693

1152 12 16 0.762 792 13 16 0.720 948 14 16 0.870

1076 15 16 0.946

1092 16 16 0.982

1168 17 16 1.01

1240 18 16 1.05

1320 19 16 1.07

1552 20 16 1.16

1672 21 16 1.22

1728 22 16 1.27

1728 23 16 1.30

1672 24 16 1.31

1696 25 16 1.26

1680 26 16 1.24

1600 27 16 1.18

1552 28 16 1.15

1420 29 16 1.05

1300 30 16 0.953

1160 31 16 0.851 1288 0 17 0.975

1220 1 17 0.940

1148 2 17 0.900

1152 3 17 0.934

1652 4 17 1.27

2156 5 17 1.57

2816 6 17 1.95

2892 7 17 2.05

2368 8 17 1.78

1884 9 17 1.43

1828 10 17 1.35

1784 11 17 1.38

2356 12 17 1.76

3068 13 17 2.19

3160 14 17 2.29

3172 15 17 2.37

3104 16 17 2.44

3280 17 17 2.53

3356 18 17 2.60

3480 19 17 2.64

3680 20 17 2.72

3536 21 17 2.65

3428 22 17 2.49

3304 23 17 2.38

3108 24 17 2.24

2916 25 17 2.08

2604 26 17 1.89

2312 27 17 1.66

2140 28 17 1.54

2016 29 17 1.48

1892 30 17 1.37

1644 31 17 1.18 1928 0 18 1.10

1908 1 18 1.19

2196 2 18 1.72

2148 3 18 1.59

2228 4 18 1.66

2404 5 18 1.76

3056 6 18 2.16

3316 7 18 2.36

3000 8 18 2.06

2516 9 18 1.81

1908 10 18 1.35

2604 11 18 1.84

2772 12 18 2.07

2896 13 18 2.16

2940 14 18 2.20

3000 15 18 2.32

3148 16 18 2.46

3336 17 18 2.56

3404 18 18 2.57

3512 19 18 2.62

3628 20 18 2.67

3712 21 18 2.65

3512 22 18 2.64

3256 23 18 2.52

2720 24 18 2.04

2400 25 18 1.75

2320 26 18 1.73

2204 27 18 1.64

1944 28 18 1.45

1992 29 18 1.33

1772 30 18 1.17

1428 31 18 1.00 64 0 19 0.0517 96 1 19 0.0820 120 2 19 0.130 200 3 19 0.428 460 4 19 0.706

2024 5 19 1.51

2572 6 19 1.85

2384 7 19 1.93

3432 8 19 2.54

3348 9 19 2.63

4616 10 19 3.74

3612 11 19 2.89

4772 12 19 3.48

4372 13 19 3.17

4324 14 19 3.23

3788 15 19 2.83

3832 16 19 2.79

3616 17 19 2.59

3408 18 19 2.50

3060 19 19 2.28

2600 20 19 1.97

2448 21 19 1.80

2140 22 19 1.62

1976 23 19 1.51

1968 24 19 1.48

1760 25 19 1.35

1664 26 19 1.26

1496 27 19 1.13

1336 28 19 0.985

1060 29 19 0.801 964 30 19 0.762 876 31 19 0.715 52 0 20 0.0410 52 1 20 0.0410 52 2 20 0.0385 68 3 20 0.0532 104 4 20 0.0839 228 5 20 0.217 168 6 20 0.170 344 7 20 0.469

1072 8 20 0.907

1784 9 20 1.46

2508 10 20 1.90

2416 11 20 1.82

2372 12 20 1.76

2480 13 20 1.84

2644 14 20 1.94

2320 15 20 1.60

2260 16 20 1.71

2460 17 20 1.82

1980 18 20 1.39

2144 19 20 1.58

1600 20 20 1.23

1716 21 20 1.34

1524 22 20 1.18

1468 23 20 1.13

1528 24 20 1.09

1144 25 20 0.924

1216 26 20 0.893 928 27 20 0.732 780 28 20 0.590 592 29 20 0.469 520 30 20 0.437 472 31 20 0.356 48 0 21 0.0395 44 1 21 0.0352 48 2 21 0.0349 56 3 21 0.0439 44 4 21 0.0358 56 5 21 0.0405 72 6 21 0.0537 92 7 21 0.0720 132 8 21 0.108 248 9 21 0.250 372 10 21 0.436 428 11 21 0.465 584 12 21 0.647 312 13 21 0.434 584 14 21 0.673 824 15 21 0.798 468 16 21 0.569

1296 17 21 0.979 944 18 21 0.760

1052 19 21 0.779 788 20 21 0.576 708 21 21 0.525 576 22 21 0.451 652 23 21 0.498 592 24 21 0.428 520 25 21 0.376 448 26 21 0.337 300 27 21 0.249 248 28 21 0.199 216 29 21 0.164 192 30 21 0.145 156 31 21 0.118 36 0 22 0.0304 40 1 22 0.0322 44 2 22 0.0332 52 3 22 0.0418 56 4 22 0.0427 56 5 22 0.0432 56 6 22 0.0446 56 7 22 0.0444 60 8 22 0.0449 56 9 22 0.0444 60 10 22 0.0457 96 11 22 0.0752 120 12 22 0.108 124 13 22 0.0995 152 14 22 0.119 296 15 22 0.234 172 16 22 0.131 140 17 22 0.161 340 18 22 0.308 300 19 22 0.228 272 20 22 0.202 228 21 22 0.169 220 22 22 0.166 200 23 22 0.149 212 24 22 0.156 172 25 22 0.129 176 26 22 0.135 172 27 22 0.129 152 28 22 0.112 140 29 22 0.108 132 30 22 0.0989 120 31 22 0.0913 64 0 23 0.0518 48 1 23 0.0375 28 2 23 0.0201 36 3 23 0.0265 40 4 23 0.0300 44 5 23 0.0356 48 6 23 0.0359 44 7 23 0.0324 44 8 23 0.0364 44 9 23 0.0328 48 10 23 0.0365 56 11 23 0.0420 76 12 23 0.0566 116 13 23 0.0887 92 14 23 0.0717 96 15 23 0.0775 164 16 23 0.123 108 17 23 0.0794 152 18 23 0.117 168 19 23 0.128 160 20 23 0.123 152 21 23 0.115 128 22 23 0.0943 136 23 23 0.104 116 24 23 0.0865 116 25 23 0.0875 100 26 23 0.0748 92 27 23 0.0690 88 28 23 0.0677 76 29 23 0.0595 84 30 23 0.0630 76 31 23 0.0576 44 0 24 0.0349 48 1 24 0.0372 44 2 24 0.0339 36 3 24 0.0283 28 4 24 0.0228 36 5 24 0.0262 36 6 24 0.0287 40 7 24 0.0310 32 8 24 0.0269 36 9 24 0.0291 40 10 24 0.0315 52 11 24 0.0389 44 12 24 0.0301 64 13 24 0.0483 64 14 24 0.0486 60 15 24 0.0460 88 16 24 0.0673 88 17 24 0.0696 64 18 24 0.0508 88 19 24 0.0644 76 20 24 0.0585 72 21 24 0.0551 72 22 24 0.0544 68 23 24 0.0516 64 24 24 0.0478 60 25 24 0.0439 56 26 24 0.0405 48 27 24 0.0360 44 28 24 0.0342 48 29 24 0.0350 40 30 24 0.0302 40 31 24 0.0313