400 0 1 0.00538 554 1 1 0.00740 740 2 1 0.00998 872 3 1 0.0119

1071 4 1 0.0146

1134 5 1 0.0155

1148 6 1 0.0156 844 7 1 0.0112 454 0 2 0.00622 571 1 2 0.00782 695 2 2 0.00951 847 3 2 0.0116 991 4 2 0.0136

1060 5 2 0.0145

1046 6 2 0.0143 923 7 2 0.0119 453 0 3 0.00624 564 1 3 0.00774 676 2 3 0.00928 819 3 3 0.0112 955 4 3 0.0131

1043 5 3 0.0143

1091 6 3 0.0150

1092 7 3 0.0145 436 0 4 0.00597 599 1 4 0.00819 680 2 4 0.00933 764 3 4 0.0105 909 4 4 0.0125

1108 5 4 0.0156

1275 6 4 0.0168

1259 7 4 0.0152 411 0 5 0.00594 779 1 5 0.00988 860 2 5 0.0110 896 3 5 0.0114 927 4 5 0.0124 936 5 5 0.0131 844 6 5 0.0106 673 7 5 0.00894 310 0 6 0.00445 608 1 6 0.00823 784 2 6 0.0104 832 3 6 0.0111 828 4 6 0.0111 731 5 6 0.00977 576 6 6 0.00825 492 7 6 0.00698