-3 0 1 -0.0206 0 1 1 -0.0101 -1 2 1 -0.00696 0 3 1 0.0101 2 4 1 0.0113 -1 5 1 -0.00576 -1 6 1 -0.00724 0 7 1 -0.00688 -2 8 1 -0.0102 -2 9 1 -0.0148 -1 10 1 -0.00913 -1 11 1 -0.00659 -2 12 1 -0.00839 0 13 1 -9.12E-4 3 14 1 0.0144 4 15 1 0.0277 2 16 1 0.0149 1 17 1 0.00920 0 18 1 -0.00271 -1 19 1 -0.0121 0 20 1 -0.00333 0 21 1 1.84E-4 -1 22 1 -0.0203 -2 23 1 -0.00285 0 24 1 0.00281 -3 25 1 -0.0158 -1 26 1 -0.00633 -1 27 1 -0.00822 -1 28 1 -0.00711 0 29 1 0.00259 0 30 1 -5.94E-5 -1 31 1 -0.00271 -1 0 2 0.00326 -2 1 2 -6.59E-4 -3 2 2 -0.0180 -2 3 2 -0.00970 -1 4 2 -0.00405 -3 5 2 -0.0141 -1 6 2 -0.00516 -3 7 2 -0.0112 -2 8 2 -0.0135 -2 9 2 -0.0114 1 10 2 0.0127 4 11 2 0.0220 5 12 2 0.0373 2 13 2 0.0140 3 14 2 0.0166 1 15 2 0.0120 0 16 2 -0.00154 0 17 2 0.00163 -1 18 2 0.00417 -3 19 2 -0.0112 -1 20 2 0.00455 -1 21 2 -0.00919 -3 22 2 -0.00981 -2 23 2 -0.00740 -3 24 2 -0.0123 -1 25 2 -0.00460 -2 26 2 -0.00327 -4 27 2 -0.0118 0 28 2 -0.00105 -3 29 2 -0.0133 -4 30 2 -0.0144 0 31 2 -6.08E-4 0 0 3 0.00310 -4 1 3 -0.0231 0 2 3 -0.00222 -3 3 3 -0.00885 -1 4 3 -0.00234 -1 5 3 -9.01E-4 -1 6 3 -0.00851 -1 7 3 -0.00229 -1 8 3 -0.00171 4 9 3 0.0292 8 10 3 0.0510 4 11 3 0.0299 0 12 3 0.00992 0 13 3 0.00501 2 14 3 0.0135 3 15 3 0.0231 1 16 3 0.0101 1 17 3 0.00521 0 18 3 0.00570 3 19 3 0.0206 0 20 3 0.00340 -1 21 3 -0.00932 -1 22 3 0.00343 -3 23 3 -0.0108 -1 24 3 -0.00995 -3 25 3 -0.0112 -2 26 3 -0.0165 -1 27 3 -6.19E-4 -2 28 3 0.00199 -2 29 3 -0.00189 -4 30 3 -0.0129 -4 31 3 -0.0106 -1 0 4 -0.00828 -4 1 4 -0.0122 -1 2 4 -0.00547 -2 3 4 -0.00266 -1 4 4 -0.0130 -1 5 4 -0.00587 -3 6 4 -0.0133 0 7 4 -0.00417 8 8 4 0.0582 6 9 4 0.0403 1 10 4 0.00375 0 11 4 0.00121 3 12 4 0.0222 5 13 4 0.0338 5 14 4 0.0274 5 15 4 0.0263 4 16 4 0.0208 4 17 4 0.0291 4 18 4 0.0240 4 19 4 0.0220 7 20 4 0.0299 2 21 4 0.0159 -1 22 4 -0.00362 0 23 4 -0.00523 -1 24 4 -0.00502 -1 25 4 -0.00246 -4 26 4 -0.0242 -4 27 4 -0.0131 -1 28 4 -0.0119 -2 29 4 -0.00572 -3 30 4 -0.0179 -3 31 4 -0.00714 0 0 5 0.00346 1 1 5 0.00981 0 2 5 -0.00355 1 3 5 0.0150 0 4 5 0.00462 -1 5 5 -0.00893 0 6 5 0.0106 13 7 5 0.0730 13 8 5 0.0717 1 9 5 0.0140 1 10 5 0.0129 11 11 5 0.819 7 12 5 0.0448 6 13 5 0.0378 7 14 5 0.0450 9 15 5 0.0560 6 16 5 0.0264 8 17 5 0.0433 6 18 5 0.0297 7 19 5 0.0431 6 20 5 0.0381 7 21 5 0.0377 6 22 5 0.0328 7 23 5 0.0478 1 24 5 0.00826 0 25 5 0.00862 0 26 5 -0.00500 -1 27 5 -0.00957 -1 28 5 5.75E-4 1 29 5 0.00431 -1 30 5 -0.0104 0 31 5 0.00619 -1 0 6 0.00622 -2 1 6 -0.0194 -1 2 6 -0.00663 1 3 6 0.00403 -1 4 6 -0.00438 -1 5 6 -0.0166 7 6 6 0.0347 13 7 6 0.0745 1 8 6 0.0121 1 9 6 0.0110 2 10 6 -8.71E-4 6 11 6 0.0263 4 12 6 0.0237 6 13 6 0.0385 7 14 6 0.0359 9 15 6 0.0459 6 16 6 0.0336 7 17 6 0.0293 5 18 6 0.0237 6 19 6 0.0231 8 20 6 0.0379 6 21 6 0.0320 8 22 6 0.0394 11 23 6 0.0638 6 24 6 0.0423 0 25 6 -0.00771 -2 26 6 -0.00351 0 27 6 0.00669 -2 28 6 -0.0152 -2 29 6 -0.00599 -2 30 6 -0.0159 -1 31 6 -0.0113 -1 0 7 -0.00469 0 1 7 0.00548 -3 2 7 -0.0120 2 3 7 0.0152 -2 4 7 -0.00763 6 5 7 0.0351 15 6 7 0.0785 5 7 7 0.0375 1 8 7 0.0119 4 9 7 0.0235 8 10 7 0.0460 9 11 7 0.0542 9 12 7 0.0487 9 13 7 0.0557 11 14 7 0.0596 8 15 7 0.0515 8 16 7 0.0513 7 17 7 0.0439 7 18 7 0.0448 7 19 7 0.0346 7 20 7 0.0372 11 21 7 0.0656 8 22 7 0.0436 9 23 7 0.0392 11 24 7 0.0572 4 25 7 0.0184 0 26 7 1.39E-4 0 27 7 -0.00355 0 28 7 0.00402 -3 29 7 -0.0199 -1 30 7 0.0112 0 31 7 0.00790 -2 0 8 -0.00744 -2 1 8 0.00211 -1 2 8 -0.00560 0 3 8 0.00708 0 4 8 0.0137 8 5 8 0.0489 11 6 8 0.0686 1 7 8 0.0212 0 8 8 9.45E-4 7 9 8 0.0526 8 10 8 0.0454 13 11 8 0.0796 12 12 8 0.0730 9 13 8 0.0548 7 14 8 0.0455 8 15 8 0.0450 8 16 8 0.0503 7 17 8 0.0404 8 18 8 0.0435 8 19 8 0.0506 8 20 8 0.0487 8 21 8 0.0541 7 22 8 0.0459 8 23 8 0.0453 9 24 8 0.0634 6 25 8 0.0393 5 26 8 0.0199 0 27 8 0.0135 -1 28 8 -0.00100 -3 29 8 -0.00620 0 30 8 0.00548 0 31 8 0.00428 1 0 9 0.0180 -1 1 9 0.00237 -1 2 9 0.00706 -1 3 9 0.00848 1 4 9 0.0139 12 5 9 0.0704 8 6 9 0.0523 1 7 9 0.0255 3 8 9 0.0199 9 9 9 0.0555 12 10 9 0.0749 12 11 9 0.0682 11 12 9 0.0676 10 13 9 0.0609 11 14 9 0.0703 10 15 9 0.0539 9 16 9 0.0639 5 17 9 0.0324 7 18 9 0.0466 6 19 9 0.0416 7 20 9 0.0439 6 21 9 0.0345 6 22 9 0.0327 5 23 9 0.0394 8 24 9 0.0443 7 25 9 0.0398 7 26 9 0.0393 1 27 9 0.00964 -2 28 9 0.00535 -1 29 9 0.00470 -3 30 9 -0.0148 -1 31 9 0.00266 -1 0 10 -2.55E-4 -1 1 10 0.00120 -1 2 10 -0.00171 -1 3 10 0.00208 6 4 10 0.0364 13 5 10 0.0834 4 6 10 0.0262 0 7 10 0.0109 11 8 10 0.0722 20 9 10 0.114 14 10 10 0.0762 13 11 10 0.0791 10 12 10 0.0623 9 13 10 0.0517 9 14 10 0.0543 13 15 10 0.0693 13 16 10 0.0740 8 17 10 0.0459 3 18 10 0.0183 5 19 10 0.0315 3 20 10 0.0244 3 21 10 0.0277 6 22 10 0.0369 7 23 10 0.0427 9 24 10 0.0506 5 25 10 0.0291 10 26 10 0.0810 3 27 10 0.0179 -2 28 10 -0.00487 -3 29 10 -0.00663 -3 30 10 -0.0177 -1 31 10 0.00750 0 0 11 0.00769 0 1 11 2.60E-4 1 2 11 0.0186 2 3 11 0.0203 8 4 11 0.0517 15 5 11 0.0944 3 6 11 0.0289 4 7 11 0.0336 16 8 11 0.109 19 9 11 0.111 15 10 11 0.0935 15 11 11 0.0958 14 12 11 0.0862 12 13 11 0.0731 8 14 11 0.0553 8 15 11 0.0533 5 16 11 0.0330 4 17 11 0.0290 5 18 11 0.0318 4 19 11 0.0305 4 20 11 0.0334 4 21 11 0.0309 5 22 11 0.0381 7 23 11 0.0484 8 24 11 0.0523 10 25 11 0.0609 7 26 11 0.0509 3 27 11 0.0507 2 28 11 0.0173 -5 29 11 -0.0210 0 30 11 0.0125 0 31 11 0.0157 1 0 12 0.0102 0 1 12 0.00661 0 2 12 0.00810 0 3 12 0.00769 9 4 12 0.0554 15 5 12 0.0960 2 6 12 0.0211 5 7 12 0.0419 25 8 12 0.146 16 9 12 0.0943 21 10 12 0.119 15 11 12 0.0911 10 12 12 0.0617 5 13 12 0.0249 8 14 12 0.0524 5 15 12 0.0215 5 16 12 0.0296 5 17 12 0.0237 3 18 12 0.0117 2 19 12 0.0189 6 20 12 0.0331 5 21 12 0.0277 5 22 12 0.0375 7 23 12 0.0362 10 24 12 0.0446 8 25 12 0.0468 5 26 12 0.0384 2 27 12 0.0303 -3 28 12 -0.00388 -4 29 12 -0.00450 -1 30 12 -0.00159 -1 31 12 -0.0109 -2 0 13 -0.0105 -4 1 13 -0.0141 0 2 13 -0.00260 -2 3 13 -0.0129 12 4 13 0.0662 14 5 13 0.0847 3 6 13 0.0137 11 7 13 0.0676 24 8 13 0.138 27 9 13 0.164 20 10 13 0.119 13 11 13 0.0785 5 12 13 0.0212 5 13 13 0.0393 4 14 13 0.0283 3 15 13 0.0197 3 16 13 0.0154 2 17 13 0.00247 3 18 13 0.0187 3 19 13 0.00743 2 20 13 0.0137 3 21 13 0.0196 3 22 13 0.0141 5 23 13 0.0266 9 24 13 0.0435 8 25 13 0.0442 9 26 13 0.0685 0 27 13 0.00611 -2 28 13 -0.0109 -2 29 13 -0.0211 -3 30 13 -0.0269 -1 31 13 -0.0134 -4 0 14 -0.0223 -1 1 14 -0.00546 -1 2 14 -0.00478 0 3 14 -0.00599 9 4 14 0.0537 13 5 14 0.0802 8 6 14 0.0453 19 7 14 0.113 34 8 14 0.196 27 9 14 0.154 12 10 14 0.0630 10 11 14 0.0533 7 12 14 0.0467 5 13 14 0.0228 4 14 14 0.0160 8 15 14 0.0413 5 16 14 0.0269 4 17 14 0.0150 3 18 14 0.0175 3 19 14 0.0129 2 20 14 0.0115 5 21 14 0.0285 5 22 14 0.0268 7 23 14 0.0334 8 24 14 0.0501 7 25 14 0.0493 7 26 14 0.0439 0 27 14 0.00437 -1 28 14 -0.0154 -1 29 14 -0.00400 -2 30 14 -0.0201 -3 31 14 -0.0194 -3 0 15 -0.00569 -1 1 15 0.00421 0 2 15 0.00515 -1 3 15 0.00537 8 4 15 0.0439 15 5 15 0.0894 9 6 15 0.0673 20 7 15 0.119 31 8 15 0.182 21 9 15 0.112 16 10 15 0.0890 12 11 15 0.0638 8 12 15 0.0467 5 13 15 0.0387 7 14 15 0.0449 7 15 15 0.0425 5 16 15 0.0291 6 17 15 0.0309 6 18 15 0.0390 4 19 15 0.0211 5 20 15 0.0435 7 21 15 0.0426 7 22 15 0.0418 9 23 15 0.0594 10 24 15 0.0615 8 25 15 0.0551 8 26 15 0.0529 5 27 15 0.123 -1 28 15 -0.00680 0 29 15 0.00135 0 30 15 -9.75E-5 -2 31 15 -0.00899 -1 0 16 0.00125 -2 1 16 -0.00962 -2 2 16 -0.00342 -1 3 16 -0.00944 4 4 16 0.0190 11 5 16 0.0741 12 6 16 0.0733 15 7 16 0.0973 45 8 16 0.255 29 9 16 0.159 17 10 16 0.102 14 11 16 0.0748 10 12 16 0.0515 8 13 16 0.0389 7 14 16 0.0316 7 15 16 0.0335 7 16 16 0.0379 4 17 16 0.0165 4 18 16 0.0157 3 19 16 0.0195 5 20 16 0.0299 5 21 16 0.0144 7 22 16 0.0400 8 23 16 0.0314 8 24 16 0.0416 9 25 16 0.0651 5 26 16 0.0400 1 27 16 0.122 -3 28 16 -0.00945 -6 29 16 -0.0297 -2 30 16 -0.0137 -5 31 16 -0.0315 0 0 17 -0.00864 -2 1 17 -0.0138 -1 2 17 -0.00376 0 3 17 4.77E-5 -1 4 17 0.00178 11 5 17 0.0631 15 6 17 0.103 10 7 17 0.0781 68 8 17 0.382 45 9 17 0.253 28 10 17 0.154 22 11 17 0.114 15 12 17 0.0877 11 13 17 0.0578 9 14 17 0.0453 11 15 17 0.0533 9 16 17 0.0486 9 17 17 0.0480 5 18 17 0.0298 5 19 17 0.0314 7 20 17 0.0323 6 21 17 0.0452 10 22 17 0.0558 9 23 17 0.0444 12 24 17 0.0834 4 25 17 0.0316 1 26 17 0.0128 0 27 17 0.00448 -1 28 17 -0.0114 -3 29 17 -0.0104 -3 30 17 -0.0115 -1 31 17 -0.00961 0 0 18 -0.00741 -1 1 18 -0.00199 -2 2 18 -0.0107 -3 3 18 -0.0110 -1 4 18 -0.00211 5 5 18 0.0377 15 6 18 0.0889 16 7 18 0.0929 12 8 18 0.101 40 9 18 0.239 40 10 18 0.219 22 11 18 0.124 23 12 18 0.130 16 13 18 0.0914 16 14 18 0.0948 14 15 18 0.0689 12 16 18 0.0558 9 17 18 0.0538 8 18 18 0.0426 9 19 18 0.0456 9 20 18 0.0421 9 21 18 0.0626 10 22 18 0.0605 17 23 18 0.128 20 24 18 0.124 3 25 18 0.0220 9 26 18 0.0629 -1 27 18 -0.00975 -1 28 18 -0.00661 -2 29 18 -0.0114 -3 30 18 -0.00430 -1 31 18 -0.00652 0 0 19 0.00989 0 1 19 0.0106 0 2 19 -0.00400 0 3 19 0.00426 2 4 19 0.0147 4 5 19 0.0267 13 6 19 0.0837 17 7 19 0.104 11 8 19 0.420 11 9 19 0.0762 48 10 19 0.275 29 11 19 0.169 37 12 19 0.209 29 13 19 0.164 24 14 19 0.134 22 15 19 0.123 17 16 19 0.0863 14 17 19 0.0778 17 18 19 0.106 17 19 19 0.0929 16 20 19 0.0979 18 21 19 0.113 32 22 19 0.807 41 23 19 0.371 4 24 19 0.0296 9 25 19 0.0583 2 26 19 0.0248 1 27 19 0.00749 0 28 19 -7.18E-4 -2 29 19 -0.00989 -3 30 19 -0.0203 2 31 19 0.0136 0 0 20 -0.00251 -1 1 20 0.00864 0 2 20 9.63E-4 1 3 20 0.0122 -1 4 20 -0.00515 -1 5 20 0.00643 8 6 20 0.0549 13 7 20 0.0821 15 8 20 0.0888 7 9 20 0.154 8 10 20 0.0851 52 11 20 0.308 56 12 20 0.331 42 13 20 0.245 41 14 20 0.230 33 15 20 0.197 23 16 20 0.130 27 17 20 0.149 22 18 20 0.124 18 19 20 0.106 15 20 20 0.106 88 21 20 3.04 156 22 20 2.57 15 23 20 0.181 13 24 20 0.464 14 25 20 0.184 -3 26 20 -0.00897 -1 27 20 0.00961 -1 28 20 0.00969 0 29 20 0.00640 0 30 20 0.0122 -1 31 20 0.00723 0 0 21 -0.00198 0 1 21 0.00685 0 2 21 -0.00123 0 3 21 0.00119 2 4 21 0.0114 1 5 21 0.0112 0 6 21 -5.78E-4 7 7 21 0.0468 15 8 21 0.0855 15 9 21 0.140 7 10 21 0.0518 4 11 21 0.0426 35 12 21 0.271 72 13 21 0.414 73 14 21 0.409 49 15 21 0.272 36 16 21 0.201 21 17 21 0.125 8 18 21 0.0583 2 19 21 0.0208 11 20 21 0.0897 25 21 21 0.309 19 22 21 0.167 19 23 21 0.162 18 24 21 0.234 1 25 21 0.0156 -1 26 21 -5.53E-4 0 27 21 0.0123 -2 28 21 -0.00767 1 29 21 0.00960 -2 30 21 7.79E-4 1 31 21 0.0147 0 0 22 0.00648 0 1 22 0.00634 0 2 22 0.00655 0 3 22 0.0130 0 4 22 0.0117 2 5 22 0.0233 0 6 22 0.00581 0 7 22 0.00906 2 8 22 0.0220 10 9 22 0.0626 12 10 22 0.0805 7 11 22 0.0492 6 12 22 0.0809 5 13 22 0.0581 7 14 22 0.0475 3 15 22 0.0270 7 16 22 0.0516 8 17 22 0.0580 2 18 22 0.0331 8 19 22 0.0641 9 20 22 0.0669 34 21 22 1.19 70 22 22 0.742 10 23 22 0.0825 3 24 22 0.0221 -1 25 22 -0.00603 -1 26 22 -0.00173 0 27 22 0.0189 -3 28 22 -0.00376 -1 29 22 0.00627 -1 30 22 0.00400 0 31 22 0.00636 2 0 23 0.0231 0 1 23 0.0168 1 2 23 0.0105 3 3 23 0.0190 1 4 23 0.0210 1 5 23 0.0278 0 6 23 -4.96E-4 0 7 23 0.0135 3 8 23 0.0262 4 9 23 0.0261 7 10 23 0.0427 4 11 23 0.0287 3 12 23 0.0290 20 13 23 0.249 21 14 23 0.288 6 15 23 0.0512 7 16 23 0.0624 23 17 23 0.195 16 18 23 0.767 15 19 23 0.187 34 20 23 0.325 28 21 23 0.506 8 22 23 0.0669 2 23 23 0.0290 3 24 23 0.0274 0 25 23 0.00697 1 26 23 0.0165 0 27 23 0.0122 0 28 23 0.00483 0 29 23 0.0112 -1 30 23 0.00842 3 31 23 0.0347 1 0 24 0.0169 -2 1 24 -4.95E-4 0 2 24 0.00193 -1 3 24 0.00690 -1 4 24 0.00726 0 5 24 0.00387 0 6 24 -2.67E-5 0 7 24 0.0128 -3 8 24 -0.00365 1 9 24 0.0178 -1 10 24 -0.00369 -1 11 24 -0.00458 1 12 24 0.0149 3 13 24 0.0257 12 14 24 0.0704 12 15 24 0.0819 9 16 24 0.0610 8 17 24 0.0668 11 18 24 0.0696 11 19 24 0.0804 8 20 24 0.0618 1 21 24 0.0168 0 22 24 0.0161 -1 23 24 -0.00244 1 24 24 0.0187 -1 25 24 0.00814 -1 26 24 0.00594 -1 27 24 -1.33E-4 -3 28 24 -0.00939 -3 29 24 -0.00951 -2 30 24 -0.00128 -1 31 24 0.00608