0 0 1 0.148 0 1 1 0.151 0 2 1 0.169 0 3 1 0.257 0 4 1 0.254 0 5 1 0.179 0 6 1 0.139 0 7 1 0.130 0 8 1 0.135 0 9 1 0.190 0 0 2 0.0503 0 1 2 0.0585 0 2 2 0.193 1 3 2 0.346 4 4 2 0.497 0 5 2 0.301 0 6 2 0.250 0 7 2 0.130 0 8 2 0.0559 0 9 2 0.0386 0 0 3 -0.0335 0 1 3 0.102 1 2 3 0.368 12 3 3 0.816 18 4 3 1.21 7 5 3 0.716 0 6 3 0.360 0 7 3 0.135 0 8 3 0.0481 0 9 3 -0.0420 0 0 4 0.0896 3 1 4 0.566 24 2 4 1.85 38 3 4 2.83 40 4 4 2.82 28 5 4 2.13 7 6 4 0.878 0 7 4 0.284 0 8 4 0.0940 0 9 4 0.0470 0 0 5 0.0655 29 1 5 3.20 91 2 5 7.26 110 3 5 8.19 60 4 5 4.47 35 5 5 2.66 10 6 5 1.12 0 7 5 0.267 0 8 5 0.0547 0 9 5 -0.0176 0 0 6 0.0516 145 1 6 11.6 268 2 6 18.8 187 3 6 13.0 92 4 6 6.74 38 5 6 3.02 8 6 6 0.960 0 7 6 0.257 0 8 6 0.0820 0 9 6 0.00869 0 0 7 0.102 230 1 7 18.0 355 2 7 24.8 242 3 7 17.5 102 4 7 8.06 29 5 7 2.42 0 6 7 0.451 0 7 7 0.164 0 8 7 0.0534 0 9 7 -0.0153 0 0 8 -0.0274 371 1 8 33.1 562 2 8 35.5 -38 3 8 -0.0905 4 4 8 0.331 10 5 8 0.852 0 6 8 0.148 0 7 8 0.0807 0 8 8 -0.0192 0 9 8 -0.00198 0 0 9 -0.0795 -5 1 9 0.527

-510 2 9 -17.8

-349 3 9 -19.9

-100 4 9 -6.63 -4 5 9 -0.281 0 6 9 0.0261 0 7 9 0.0191 0 8 9 0.0158 0 9 9 -0.00152 0 0 10 -0.240 -47 1 10 -12.2

-510 2 10 -26.9

-401 3 10 -22.1

-130 4 10 -8.45 -14 5 10 -1.03 0 6 10 -0.164 0 7 10 -0.0572 0 8 10 -0.0707 0 9 10 -0.127 0 0 11 -0.178

-510 1 11 -19.9

-510 2 11 -26.7

-340 3 11 -20.4

-117 4 11 -7.86 -10 5 11 -0.911 0 6 11 -0.189 0 7 11 -0.120 0 8 11 -0.0591 0 9 11 -0.116 0 0 12 -0.0726

-465 1 12 -20.7

-467 2 12 -24.4

-225 3 12 -14.7 -83 4 12 -5.76 -5 5 12 -0.595 0 6 12 -0.110 0 7 12 -0.0356 0 8 12 0.0212 0 9 12 0.0179 0 0 13 0.0352

-256 1 13 -14.8

-229 2 13 -14.4

-136 3 13 -8.77 -44 4 13 -3.25 -1 5 13 -0.366 0 6 13 -0.0459 0 7 13 0.0226 0 8 13 0.0764 0 9 13 0.0898 0 0 14 -0.188

-113 1 14 -7.47 -94 2 14 -6.05 -52 3 14 -3.43 -9 4 14 -1.03 0 5 14 -0.156 0 6 14 -0.0680 0 7 14 0.0465 0 8 14 0.0818 0 9 14 0.0584