0 0 1 0.00356 2 1 1 0.0175 13 2 1 0.0660 38 3 1 0.186 41 4 1 0.200 34 5 1 0.169 26 6 1 0.120 9 7 1 0.0462 3 8 1 0.0215 0 9 1 0.0115 -1 0 2 -0.00467 6 1 2 0.0316 25 2 2 0.125 48 3 2 0.253 96 4 2 0.439 65 5 2 0.307 51 6 2 0.253 22 7 2 0.101 5 8 2 0.0312 0 9 2 0.0113 -1 0 3 -0.00445 18 1 3 0.117 74 2 3 0.369 127 3 3 0.607 217 4 3 1.01 160 5 3 0.719 100 6 3 0.471 37 7 3 0.187 8 8 3 0.0401 0 9 3 0.00546 -2 0 4 -0.00884 47 1 4 0.342 232 2 4 1.16 390 3 4 1.79 433 4 4 1.81 377 5 4 1.69 167 6 4 0.793 52 7 4 0.258 11 8 4 0.0518 0 9 4 0.00259 1 0 5 0.00373 235 1 5 1.58 913 2 5 4.49

1177 3 5 5.28 602 4 5 2.63 446 5 5 1.87 212 6 5 1.000 57 7 5 0.276 8 8 5 0.0499 1 9 5 0.00983 2 0 6 0.0137

1045 1 6 4.27

1028 2 6 7.37

1589 3 6 6.45 897 4 6 3.98 446 5 6 2.04 176 6 6 0.806 47 7 6 0.224 7 8 6 0.0337 0 9 6 0.00406 3 0 7 0.00561 1 1 7 2.39 2 2 7 1 3 7 4.76

1025 4 7 4.94 351 5 7 1.66 88 6 7 0.417 33 7 7 0.153 5 8 7 0.0172 0 9 7 -0.00621 -3 0 8 -0.0176 0 1 8 0.975 0 2 8 -60 3 8 -1.08

-222 4 8 -0.0759 117 5 8 0.551 28 6 8 0.134 17 7 8 0.0722 3 8 8 0.0152 0 9 8 -0.00266 -14 0 9 -0.0675 0 1 9 0.150 0 2 9 -1.50

-510 3 9 -1.70

-510 4 9 -1.68 -73 5 9 -0.440 -8 6 9 -0.0280 9 7 9 0.0363 1 8 9 0.00697 -2 9 9 -0.00950 -21 0 10 -0.115 -74 1 10 -0.269

-510 2 10 -1.68

-510 3 10 -1.71

-510 4 10 -1.70

-185 5 10 -0.839 -30 6 10 -0.120 -2 7 10 -0.00815 0 8 10 0.00240 -2 9 10 -0.0112 -26 0 11 -0.125

-510 1 11 -1.02

-510 2 11 -1.72

-510 3 11 -1.71

-510 4 11 -1.71

-205 5 11 -0.893 -51 6 11 -0.203 -11 7 11 -0.0369 -3 8 11 -0.00844 -2 9 11 -0.00768 -26 0 12 -0.137

-510 1 12 -1.31

-512 2 12 -1.73

-510 3 12 -1.72

-510 4 12 -1.69

-157 5 12 -0.714 -48 6 12 -0.201 -21 7 12 -0.0758 -8 8 12 -0.0269 -4 9 12 -0.0164 -24 0 13 -0.130

-510 1 13 -1.41

-510 2 13 -1.70

-510 3 13 -1.70

-510 4 13 -1.57

-128 5 13 -0.558 -48 6 13 -0.195 -22 7 13 -0.0816 -9 8 13 -0.0344 -4 9 13 -0.0124 -26 0 14 -0.138

-510 1 14 -1.55

-510 2 14 -1.71

-510 3 14 -1.61

-234 4 14 -0.918 -56 5 14 -0.268 -34 6 14 -0.141 -12 7 14 -0.0450 -4 8 14 -0.0236 -3 9 14 -0.0129