0 0 1 1.00 0 1 1 0.797 0 2 1 0.787 0 3 1 0.428 0 4 1 0.355 0 5 1 0.262 0 6 1 0.710 0 7 1 0.307 0 8 1 0.516 0 9 1 0.380 0 10 1 0.503 0 11 1 0.267 0 12 1 0.304 0 13 1 0.369 0 14 1 0.459 0 15 1 0.371 0 16 1 0.369 0 17 1 0.344 0 18 1 0.111 0 19 1 0.369 0 20 1 0.0726 0 21 1 0.176 0 0 2 1.05 0 1 2 1.16 0 2 2 0.804 0 3 2 0.775 0 4 2 0.608 0 5 2 0.902 0 6 2 0.603 0 7 2 0.551 0 8 2 0.531 0 9 2 0.555 0 10 2 0.661 0 11 2 0.566 0 12 2 0.345 0 13 2 0.381 0 14 2 0.405 0 15 2 0.0810 0 16 2 0.131 0 17 2 0.278 0 18 2 0.262 0 19 2 0.236 0 20 2 0.313 0 21 2 0.431 0 0 3 1.03 0 1 3 0.961 0 2 3 0.638 0 3 3 0.743 0 4 3 0.829 0 5 3 0.793 0 6 3 0.261 0 7 3 0.265 0 8 3 0.507 0 9 3 0.596 0 10 3 0.774 0 11 3 0.467 0 12 3 0.492 0 13 3 0.443 0 14 3 0.385 0 15 3 0.382 0 16 3 0.281 0 17 3 0.508 0 18 3 0.422 0 19 3 0.137 0 20 3 0.160 0 21 3 0.0458 0 0 4 1.07 0 1 4 0.742 0 2 4 0.553 0 3 4 0.615 0 4 4 1.09 0 5 4 0.812 0 6 4 0.795 0 7 4 0.969 0 8 4 0.812 0 9 4 0.674 0 10 4 0.893 0 11 4 1.07 0 12 4 0.529 0 13 4 0.694 0 14 4 0.703 0 15 4 0.401 0 16 4 0.395 0 17 4 0.545 0 18 4 0.455 0 19 4 0.423 0 20 4 0.448 0 21 4 0.298 2 0 5 1.49 0 1 5 0.799 0 2 5 0.766 0 3 5 1.34 0 4 5 1.15 0 5 5 1.50 0 6 5 1.53 1 7 5 1.36 0 8 5 1.52 0 9 5 1.06 0 10 5 0.999 0 11 5 1.30 0 12 5 0.881 0 13 5 0.972 0 14 5 0.880 0 15 5 0.651 0 16 5 0.816 0 17 5 0.702 0 18 5 0.847 0 19 5 0.551 0 20 5 0.380 0 21 5 0.540 0 0 6 0.960 0 1 6 0.987 0 2 6 0.617 0 3 6 1.08 0 4 6 1.09 0 5 6 1.01 0 6 6 1.07 0 7 6 1.24 0 8 6 1.11 0 9 6 1.14 0 10 6 1.52 0 11 6 1.19 0 12 6 1.14 0 13 6 1.01 0 14 6 0.544 0 15 6 0.572 0 16 6 0.640 0 17 6 1.05 0 18 6 0.680 0 19 6 0.570 0 20 6 0.282 0 21 6 0.300 0 0 7 -0.0917 0 1 7 0.0921 0 2 7 0.175 0 3 7 0.670 0 4 7 0.399 0 5 7 0.835 0 6 7 1.24 0 7 7 1.17 0 8 7 1.52 0 9 7 0.829 0 10 7 0.875 0 11 7 0.979 0 12 7 0.881 0 13 7 0.395 0 14 7 0.316 0 15 7 -0.116 0 16 7 -0.138 0 17 7 0.229 0 18 7 0.173 0 19 7 -0.164 0 20 7 -0.486 0 21 7 -0.365 0 0 8 -0.158 0 1 8 0.0322 0 2 8 0.360 0 3 8 0.491 0 4 8 0.470 0 5 8 1.15 0 6 8 1.51 6 7 8 1.78 2 8 8 1.87 0 9 8 1.64 0 10 8 1.10 0 11 8 1.55 0 12 8 0.699 0 13 8 0.911 0 14 8 0.391 0 15 8 0.219 0 16 8 0.0870 0 17 8 0.00749 0 18 8 0.138 0 19 8 -0.0394 0 20 8 -0.0134 0 21 8 -0.225 0 0 9 -0.175 0 1 9 0.272 0 2 9 0.719 0 3 9 0.613 2 4 9 2.04 49 5 9 8.00 75 6 9 11.2 61 7 9 11.8 61 8 9 9.58 52 9 9 8.57 39 10 9 6.05 29 11 9 5.45 21 12 9 4.28 3 13 9 1.97 0 14 9 0.919 0 15 9 0.500 0 16 9 0.421 0 17 9 -0.0287 0 18 9 0.427 0 19 9 0.272 0 20 9 -0.0331 0 21 9 0.140 0 0 10 -0.119 0 1 10 0.126 0 2 10 0.532 0 3 10 0.506 11 4 10 2.49 132 5 10 36.4 223 6 10 141 226 7 10 88.3 189 8 10 51.0 192 9 10 30.5 124 10 10 16.6 129 11 10 17.8 123 12 10 16.1 71 13 10 9.33 68 14 10 8.56 32 15 10 5.01 0 16 10 1.45 0 17 10 1.48 0 18 10 1.17 0 19 10 0.813 0 20 10 0.680 0 21 10 0.361 0 0 11 -0.0477 0 1 11 0.392 0 2 11 0.296 0 3 11 0.877 6 4 11 2.76 290 5 11 221 11072 6 11 1.40E3

11949 7 11 1.50E3

12622 8 11 1.59E3

13020 9 11 1.59E3

1094 10 11 546 12769 11 11 1.07E3

13334 12 11 1.20E3 150 13 11 36.8 64 14 11 9.07 22 15 11 5.23 0 16 11 1.39 0 17 11 1.88 0 18 11 1.40 0 19 11 1.89 0 20 11 1.29 0 21 11 1.59 0 0 12 0.822 0 1 12 0.396 0 2 12 0.656 0 3 12 0.938 18 4 12 3.88 276 5 12 165 10852 6 12 1.20E3

12114 7 12 1.54E3

12743 8 12 1.64E3

13246 9 12 1.67E3

1157 10 12 486 7959 11 12 941 13569 12 12 1.34E3 165 13 12 45.8 77 14 12 9.64 26 15 12 4.60 0 16 12 1.94 0 17 12 2.01 1 18 12 1.68 3 19 12 2.04 0 20 12 1.34 0 21 12 1.74 0 0 13 -0.226 0 1 13 0.319 0 2 13 0.402 0 3 13 1.13 12 4 13 3.31 279 5 13 182 10424 6 13 1.18E3

12070 7 13 1.54E3

12729 8 13 1.64E3

13093 9 13 1.58E3

1133 10 13 462 205 11 13 44.3

8217 12 13 976 154 13 13 43.8 73 14 13 9.94 20 15 13 4.40 2 16 13 1.77 0 17 13 1.76 0 18 13 1.57 3 19 13 2.05 0 20 13 1.33 0 21 13 1.90 0 0 14 0.0445 0 1 14 0.847 0 2 14 0.497 0 3 14 0.818 7 4 14 3.17 266 5 14 216 9680 6 14 1.22E3

11817 7 14 1.48E3

12595 8 14 1.62E3

13044 9 14 1.62E3

1131 10 14 417 815 11 14 457 7266 12 14 952 142 13 14 40.3 83 14 14 10.8 11 15 14 3.77 0 16 14 1.85 0 17 14 1.75 0 18 14 1.68 0 19 14 1.94 0 20 14 1.31 0 21 14 1.66 0 0 15 0.323 0 1 15 1.80 0 2 15 0.817 0 3 15 1.12 15 4 15 3.64 246 5 15 143 4110 6 15 635 7288 7 15 841 10533 8 15 966 12025 9 15 1.03E3 947 10 15 252 772 11 15 576 1540 12 15 725 137 13 15 34.2 88 14 15 11.3 14 15 15 3.28 4 16 15 2.25 0 17 15 2.01 0 18 15 1.89 0 19 15 1.88 1 20 15 1.92 0 21 15 1.58 0 0 16 -0.0143 0 1 16 1.50 0 2 16 0.486 0 3 16 1.02 14 4 16 3.47 154 5 16 28.4 267 6 16 52.3 311 7 16 58.2 382 8 16 67.8 382 9 16 71.0 181 10 16 36.0 110 11 16 14.9 190 12 16 38.8 101 13 16 16.4 84 14 16 10.8 6 15 16 2.51 4 16 16 2.03 1 17 16 2.04 6 18 16 1.64 0 19 16 1.79 0 20 16 1.81 0 21 16 1.50 0 0 17 -0.317 0 1 17 1.06 0 2 17 0.363 0 3 17 0.857 16 4 17 3.29 265 5 17 136 5734 6 17 744 9780 7 17 1.18E3

13540 8 17 1.64E3

14358 9 17 1.78E3 453 10 17 248 244 11 17 364 1256 12 17 642 107 13 17 15.1 90 14 17 11.3 0 15 17 2.17 8 16 17 2.13 5 17 17 1.89 0 18 17 1.49 0 19 17 1.61 1 20 17 1.61 0 21 17 1.81 0 0 18 -0.0981 0 1 18 0.372 0 2 18 0.344 0 3 18 1.14 8 4 18 3.38 284 5 18 151 8357 6 18 1.06E3

12133 7 18 1.51E3

13605 8 18 1.69E3

14423 9 18 1.87E3

1092 10 18 226 473 11 18 358 1460 12 18 739 105 13 18 13.7 79 14 18 10.5 0 15 18 1.33 0 16 18 1.86 0 17 18 1.53 0 18 18 1.57 0 19 18 1.65 0 20 18 1.62 0 21 18 1.37 0 0 19 0.318 0 1 19 0.496 0 2 19 0.808 0 3 19 0.863 16 4 19 4.05 274 5 19 147 8038 6 19 1.02E3

12790 7 19 1.57E3

13323 8 19 1.58E3

14092 9 19 1.77E3 878 10 19 188 13080 11 19 1.23E3

1417 12 19 769 103 13 19 12.9 66 14 19 8.87 6 15 19 2.04 7 16 19 2.24 5 17 19 2.19 5 18 19 2.04 0 19 19 1.78 2 20 19 1.82 0 21 19 1.92 0 0 20 0.184 0 1 20 0.377 0 2 20 0.630 1 3 20 1.50 27 4 20 6.30 246 5 20 104 3503 6 20 494 5508 7 20 816 9005 8 20 972 8309 9 20 971 323 10 20 92.9

2060 11 20 685 748 12 20 329 98 13 20 12.3 52 14 20 7.17 0 15 20 1.75 4 16 20 2.59 0 17 20 1.65 3 18 20 2.13 1 19 20 1.74 0 20 20 1.53 0 21 20 1.57 0 0 21 0.241 0 1 21 0.988 0 2 21 1.34 0 3 21 1.26 10 4 21 3.10 90 5 21 29.1 562 6 21 59.7 519 7 21 59.4 536 8 21 61.4 474 9 21 55.5 120 10 21 35.2 365 11 21 57.7 163 12 21 43.6 51 13 21 7.63 29 14 21 4.66 2 15 21 2.09 12 16 21 2.74 4 17 21 2.78 7 18 21 2.42 0 19 21 1.79 0 20 21 1.50 0 21 21 1.38 0 0 22 0.553 0 1 22 0.572 0 2 22 0.694 0 3 22 1.22 5 4 22 2.20 7 5 22 2.41 25 6 22 3.28 28 7 22 3.97 30 8 22 4.55 31 9 22 4.96 24 10 22 4.05 20 11 22 3.84 10 12 22 2.95 4 13 22 2.38 3 14 22 2.18 0 15 22 1.64 0 16 22 2.35 8 17 22 2.25 2 18 22 2.02 0 19 22 1.25 0 20 22 1.23 0 21 22 0.987 0 0 23 0.286 0 1 23 0.495 0 2 23 0.520 0 3 23 0.879 0 4 23 1.46 0 5 23 1.57 8 6 23 2.59 5 7 23 2.57 14 8 23 3.07 14 9 23 3.21 14 10 23 2.90 5 11 23 2.38 1 12 23 2.13 0 13 23 1.69 0 14 23 1.56 0 15 23 1.62 1 16 23 2.16 0 17 23 2.14 4 18 23 2.56 0 19 23 1.26 0 20 23 1.41 0 21 23 0.817 0 0 24 -0.269 0 1 24 0.494 0 2 24 0.449 0 3 24 0.829 0 4 24 1.06 0 5 24 1.36 1 6 24 1.73 4 7 24 2.25 8 8 24 2.34 7 9 24 2.11 6 10 24 2.47 3 11 24 1.81 0 12 24 1.71 0 13 24 1.62 0 14 24 1.44 0 15 24 1.70 2 16 24 1.78 6 17 24 2.19 8 18 24 2.62 0 19 24 1.09 0 20 24 1.16 0 21 24 0.745 0 0 25 0.268 0 1 25 1.000 0 2 25 0.904 0 3 25 1.20 0 4 25 1.24 0 5 25 1.80 0 6 25 1.76 0 7 25 1.84 4 8 25 1.93 2 9 25 1.97 0 10 25 2.16 0 11 25 2.22 0 12 25 1.92 0 13 25 1.76 2 14 25 1.92 0 15 25 1.88 0 16 25 1.99 0 17 25 2.14 9 18 25 3.04 0 19 25 1.61 0 20 25 1.49 0 21 25 0.841 0 0 26 0.891 0 1 26 1.12 0 2 26 0.843 0 3 26 1.31 0 4 26 1.17 0 5 26 1.26 1 6 26 2.05 1 7 26 1.49 0 8 26 1.93 4 9 26 2.17 2 10 26 1.89 0 11 26 1.85 3 12 26 1.66 0 13 26 1.91 0 14 26 2.16 0 15 26 1.94 1 16 26 2.17 3 17 26 2.50 4 18 26 2.57 0 19 26 1.52 0 20 26 1.39 0 21 26 0.861 0 0 27 0.318 0 1 27 0.976 11 2 27 3.90 0 3 27 0.735 0 4 27 1.32 0 5 27 1.44 5 6 27 2.10 0 7 27 2.23 8 8 27 2.47 14 9 27 2.60 17 10 27 2.42 10 11 27 2.24 9 12 27 2.26 2 13 27 1.81 0 14 27 1.86 0 15 27 1.53 0 16 27 1.49 6 17 27 1.78 0 18 27 1.42 0 19 27 1.28 0 20 27 0.982 0 21 27 0.604 0 0 28 0.366 0 1 28 0.461 0 2 28 1.29 0 3 28 1.25 0 4 28 1.06 0 5 28 1.68 1 6 28 1.44 0 7 28 1.68 0 8 28 1.59 0 9 28 1.60 0 10 28 1.73 3 11 28 1.86 0 12 28 1.48 0 13 28 1.15 0 14 28 0.929 0 15 28 1.06 0 16 28 1.14 0 17 28 1.09 0 18 28 0.899 0 19 28 0.785 0 20 28 0.577 0 21 28 0.199 0 0 29 0.227 0 1 29 0.396 0 2 29 0.179 0 3 29 0.807 2 4 29 1.29 1 5 29 1.08 2 6 29 1.55 4 7 29 1.52 0 8 29 1.28 5 9 29 1.99 6 10 29 1.69 3 11 29 1.50 2 12 29 1.80 0 13 29 1.48 0 14 29 1.65 0 15 29 1.19 0 16 29 1.29 0 17 29 0.766 0 18 29 0.498 0 19 29 0.450 0 20 29 0.369 0 21 29 -0.115 0 0 30 0.588 0 1 30 0.805 0 2 30 0.670 0 3 30 1.39 0 4 30 1.47 6 5 30 1.42 3 6 30 1.58 0 7 30 1.94 9 8 30 1.99 4 9 30 1.69 3 10 30 1.71 0 11 30 1.77 0 12 30 1.50 3 13 30 1.67 6 14 30 1.27 0 15 30 1.34 0 16 30 0.917 0 17 30 0.978 0 18 30 1.16 0 19 30 0.811 0 20 30 0.780 0 21 30 -0.124 0 0 31 1.01 0 1 31 0.592 0 2 31 0.240 0 3 31 1.10 0 4 31 1.55 0 5 31 0.967 0 6 31 1.26 0 7 31 1.71 3 8 31 1.48 2 9 31 1.73 5 10 31 1.88 3 11 31 2.03 0 12 31 1.41 0 13 31 1.57 0 14 31 1.21 0 15 31 1.41 0 16 31 1.10 0 17 31 0.986 0 18 31 0.800 0 19 31 0.514 0 20 31 0.508 0 21 31 -0.0575 0 0 32 0.711 0 1 32 1.07 0 2 32 0.713 0 3 32 1.24 3 4 32 1.75 0 5 32 1.45 0 6 32 1.71 1 7 32 1.67 0 8 32 1.60 0 9 32 1.81 4 10 32 2.09 0 11 32 2.01 0 12 32 1.94 2 13 32 1.89 5 14 32 1.63 0 15 32 1.55 0 16 32 1.33 0 17 32 1.19 0 18 32 0.924 0 19 32 0.921 0 20 32 0.720 0 21 32 0.272 0 0 33 0.502 0 1 33 0.797 0 2 33 0.812 0 3 33 1.12 0 4 33 1.33 0 5 33 1.37 0 6 33 1.42 0 7 33 1.17 3 8 33 1.55 5 9 33 1.82 0 10 33 1.83 5 11 33 1.76 2 12 33 1.69 0 13 33 1.31 0 14 33 1.30 0 15 33 1.26 0 16 33 0.954 0 17 33 0.707 0 18 33 0.689 0 19 33 0.551 0 20 33 0.357 0 21 33 0.352