Greenhouse effect: heat flux / W/m^2, 1 arrow = 40

Solar radiation 235

168Flux from the ground

(mostly absorbed by the air)

Longwave radiation back to the Universe 235 before 1900, but only 232 now: over 1 % inbalance!

LW radiation from the air

324 before, 327 now