TOP: mid-July mean insolation of 65N latitude / W.m-2, BOTTOM: GRIP O18 data

-39

-6 -33

-3

0 420

480 temperature - that in 1990 / K (middle, Vostok data)

3 6 9 12 15 18 21 24

Age / 10 ka