21 0 1 0.00862 24 1 1 0.00763 20 2 1 0.00651 37 3 1 0.00873 40 4 1 0.00919 40 5 1 0.00908 38 6 1 0.00883 35 7 1 0.00866 31 8 1 0.00862 12 0 2 0.00528 24 1 2 0.00695 37 2 2 0.00851 38 3 2 0.00865 38 4 2 0.00880 38 5 2 0.00886 37 6 2 0.00854 37 7 2 0.00875 36 8 2 0.00862 26 0 3 0.00767 36 1 3 0.00837 35 2 3 0.00822 38 3 3 0.00850 36 4 3 0.00830 38 5 3 0.00834 37 6 3 0.00841 38 7 3 0.00846 35 8 3 0.00817 27 0 4 0.00759 34 1 4 0.00814 35 2 4 0.00839 37 3 4 0.00861 38 4 4 0.00849 37 5 4 0.00863 37 6 4 0.00875 37 7 4 0.00863 37 8 4 0.00861 31 0 5 0.00807 26 1 5 0.00705 31 2 5 0.00798 32 3 5 0.00803 36 4 5 0.00873 36 5 5 0.00839 36 6 5 0.00869 38 7 5 0.00881 35 8 5 0.00849 21 0 6 0.00630 16 1 6 0.00505 22 2 6 0.00619 16 3 6 0.00540 11 4 6 0.00448 12 5 6 0.00470 18 6 6 0.00543 15 7 6 0.00518 22 8 6 0.00654 14 0 7 0.00552 31 1 7 0.00798 37 2 7 0.00988 28 3 7 0.00785 14 4 7 0.00476 17 5 7 0.00542 48 6 7 0.0153 25 7 7 0.00711 15 8 7 0.00476 28 0 8 0.00796 30 1 8 0.00874 97 2 8 0.0578 70 3 8 0.0282 18 4 8 0.00595 27 5 8 0.00853 183 6 8 0.107 89 7 8 0.0446 36 8 8 0.0179 27 0 9 0.00887 38 1 9 0.0149 279 2 9 0.169 213 3 9 0.0681 47 4 9 0.0172 53 5 9 0.0303 104 6 9 0.0447 131 7 9 0.0424 30 8 9 0.0108 8 0 10 0.00376 24 1 10 0.00649 49 2 10 0.0361 46 3 10 0.0286 15 4 10 0.00522 28 5 10 0.0101 13 6 10 0.00601 7 7 10 0.00459 2 8 10 0.00312 2 0 11 0.00259 10 1 11 0.00378 11 2 11 0.00415 17 3 11 0.00791 5 4 11 0.00328 6 5 11 0.00361 2 6 11 0.00276 0 7 11 0.00230 0 8 11 0.00211 0 0 12 0.00190 5 1 12 0.00281 2 2 12 0.00247 2 3 12 0.00243 0 4 12 0.00184 0 5 12 0.00167 0 6 12 0.00164 0 7 12 0.00132 0 8 12 0.00158 0 0 13 0.00180 2 1 13 0.00237 1 2 13 0.00203 0 3 13 0.00188 0 4 13 0.00187 0 5 13 0.00199 0 6 13 0.00161 0 7 13 0.00122 0 8 13 0.00219 0 0 14 0.00167 0 1 14 0.00167 0 2 14 0.00151 0 3 14 0.00113 0 4 14 0.00138 0 5 14 0.00151 0 6 14 0.00139 0 7 14 0.00112 0 8 14 0.00156 4.00E-5

6.34E-5

1.00E-4

1.59E-4

2.52E-4

4.00E-4

6.34E-4

0.00100

0.00159

0.00252

0.00400

0.00634

0.0100

0.0159

0.0252

0.0400

0.0634

0.100

0.159

0.252

0.400

0.634

1.00

1.59

2.52

4.00

6.34

10.0

15.9

25.2

40.0

63.4 100 159 252 400 634 1.00E3

1.59E3

2.52E3

4.00E3

6.34E3

1.00E4

1.59E4

2.52E4