59 0 1 0.0197 67 1 1 0.0162 63 2 1 0.0129 59 3 1 0.0121 59 4 1 0.0123 58 5 1 0.0119 57 6 1 0.0118 57 7 1 0.0119 57 8 1 0.0127 68 0 2 0.0212 98 1 2 0.0220 68 2 2 0.0136 66 3 2 0.0134 63 4 2 0.0128 62 5 2 0.0127 61 6 2 0.0125 61 7 2 0.0125 60 8 2 0.0128 83 0 3 0.0221 99 1 3 0.0213 71 2 3 0.0141 68 3 3 0.0137 68 4 3 0.0133 64 5 3 0.0131 64 6 3 0.0129 62 7 3 0.0128 53 8 3 0.0115 102 0 4 0.0242 100 1 4 0.0217 72 2 4 0.0143 69 3 4 0.0137 67 4 4 0.0133 63 5 4 0.0129 64 6 4 0.0128 63 7 4 0.0133 36 8 4 0.00848 101 0 5 0.0225 92 1 5 0.0201 73 2 5 0.0154 71 3 5 0.0145 67 4 5 0.0137 68 5 5 0.0141 71 6 5 0.0149 71 7 5 0.0149 35 8 5 0.00933 98 0 6 0.0224 84 1 6 0.0190 75 2 6 0.0156 63 3 6 0.0138 34 4 6 0.00929 46 5 6 0.0113 54 6 6 0.0123 60 7 6 0.0129 32 8 6 0.00821 113 0 7 0.0244 90 1 7 0.0203 24 2 7 0.00738 31 3 7 0.00917 16 4 7 0.0217 40 5 7 0.0102 47 6 7 0.0111 54 7 7 0.0120 48 8 7 0.0118 99 0 8 0.0218 79 1 8 0.0184 33 2 8 0.0123 65 3 8 0.0184 36 4 8 0.0421 39 5 8 0.00965 42 6 8 0.00969 51 7 8 0.0117 44 8 8 0.0109 96 0 9 0.0225 88 1 9 0.0194 58 2 9 0.0135 59 3 9 0.0140 74 4 9 0.0254 62 5 9 0.0146 50 6 9 0.0123 46 7 9 0.0110 56 8 9 0.0126 229 0 10 0.0467 225 1 10 0.0442 219 2 10 0.0421 206 3 10 0.0397 213 4 10 0.0461 219 5 10 0.0426 192 6 10 0.0375 184 7 10 0.0358 131 8 10 0.0277 257 0 11 0.0536 244 1 11 0.0488 221 2 11 0.0439 224 3 11 0.0439 215 4 11 0.0408 228 5 11 0.0435 235 6 11 0.0454 255 7 11 0.0503 239 8 11 0.0472 85 0 12 0.0318 124 1 12 0.0403 142 2 12 0.0401 143 3 12 0.0378 153 4 12 0.0378 180 5 12 0.0385 196 6 12 0.0404 186 7 12 0.0391 193 8 12 0.0398 58 0 13 0.0145 91 1 13 0.0192 94 2 13 0.0196 98 3 13 0.0200 94 4 13 0.0194 92 5 13 0.0189 96 6 13 0.0218 100 7 13 0.0314 109 8 13 0.0271 86 0 14 0.0231 150 1 14 0.0364 148 2 14 0.0344 157 3 14 0.0364 149 4 14 0.0343 143 5 14 0.0333 139 6 14 0.0325 146 7 14 0.0346 195 8 14 0.0482 4.00E-5

6.34E-5

1.00E-4

1.59E-4

2.52E-4

4.00E-4

6.34E-4

0.00100

0.00159

0.00252

0.00400

0.00634

0.0100

0.0159

0.0252

0.0400

0.0634

0.100

0.159

0.252

0.400

0.634

1.00

1.59

2.52

4.00

6.34

10.0

15.9

25.2

40.0

63.4 100 159 252 400 634 1.00E3

1.59E3

2.52E3

4.00E3

6.34E3

1.00E4

1.59E4

2.52E4