178 0 1 0.0471 225 1 1 0.0436 221 2 1 0.0389 197 3 1 0.0343 173 4 1 0.0307 154 5 1 0.0277 138 6 1 0.0246 118 7 1 0.0215 97 8 1 0.0196 219 0 2 0.0485 249 1 2 0.0448 228 2 2 0.0397 203 3 2 0.0354 181 4 2 0.0319 163 5 2 0.0290 142 6 2 0.0257 122 7 2 0.0224 108 8 2 0.0200 242 0 3 0.0484 251 1 3 0.0440 224 2 3 0.0394 200 3 3 0.0353 185 4 3 0.0327 176 5 3 0.0312 145 6 3 0.0262 124 7 3 0.0227 54 8 3 0.0133 236 0 4 0.0431 221 1 4 0.0366 225 2 4 0.0392 199 3 4 0.0349 196 4 4 0.0345 251 5 4 0.0456 137 6 4 0.0253 89 7 4 0.0180 26 8 4 0.00722 69 0 5 0.0154 199 1 5 0.0361 254 2 5 0.0661 193 3 5 0.0346 205 4 5 0.0363 713 5 5 0.270 144 6 5 0.0298 42 7 5 0.00966 18 8 5 0.00562 82 0 6 0.0412 165 1 6 0.0323 190 2 6 0.0538 114 3 6 0.0302 157 4 6 0.0386 524 5 6 0.167 135 6 6 0.0283 17 7 6 0.00537 12 8 6 0.00484 120 0 7 0.206 56 1 7 0.0135 57 2 7 0.0125 78 3 7 0.0170 149 4 7 0.0338 237 5 7 0.0560 65 6 7 0.0152 41 7 7 0.00947 59 8 7 0.0148 70 0 8 0.0775 120 1 8 0.0386 93 2 8 0.0326 86 3 8 0.0189 87 4 8 0.0168 114 5 8 0.0216 69 6 8 0.0140 49 7 8 0.0108 28 8 8 0.00799 52 0 9 0.0125 68 1 9 0.0238 76 2 9 0.0177 80 3 9 0.0169 82 4 9 0.0163 90 5 9 0.0175 72 6 9 0.0144 48 7 9 0.0103 41 8 9 0.00930 95 0 10 0.0197 100 1 10 0.0195 100 2 10 0.0192 96 3 10 0.0183 86 4 10 0.0165 81 5 10 0.0154 71 6 10 0.0140 64 7 10 0.0129 55 8 10 0.0114 93 0 11 0.0188 86 1 11 0.0170 78 2 11 0.0153 76 3 11 0.0149 77 4 11 0.0149 73 5 11 0.0146 73 6 11 0.0143 70 7 11 0.0139 68 8 11 0.0136 78 0 12 0.0160 79 1 12 0.0154 69 2 12 0.0139 68 3 12 0.0137 76 4 12 0.0149 68 5 12 0.0136 67 6 12 0.0134 58 7 12 0.0120 57 8 12 0.0115 63 0 13 0.0139 68 1 13 0.0133 64 2 13 0.0126 63 3 13 0.0125 60 4 13 0.0120 58 5 13 0.0116 54 6 13 0.0110 53 7 13 0.0107 50 8 13 0.0106 54 0 14 0.0132 59 1 14 0.0126 59 2 14 0.0120 59 3 14 0.0121 60 4 14 0.0123 64 5 14 0.0129 63 6 14 0.0128 63 7 14 0.0127 61 8 14 0.0123 4.00E-5

6.34E-5

1.00E-4

1.59E-4

2.52E-4

4.00E-4

6.34E-4

0.00100

0.00159

0.00252

0.00400

0.00634

0.0100

0.0159

0.0252

0.0400

0.0634

0.100

0.159

0.252

0.400

0.634

1.00

1.59

2.52

4.00

6.34

10.0

15.9

25.2

40.0

63.4 100 159 252 400 634 1.00E3

1.59E3

2.52E3

4.00E3

6.34E3

1.00E4

1.59E4

2.52E4