38 0 1 0.0115 69 1 1 0.0151 77 2 1 0.0151 79 3 1 0.0155 86 4 1 0.0164 97 5 1 0.0183 108 6 1 0.0198 68 7 1 0.0135 75 8 1 0.0157 42 0 2 0.0113 72 1 2 0.0151 83 2 2 0.0165 88 3 2 0.0171 102 4 2 0.0193 141 5 2 0.0256 134 6 2 0.0245 64 7 2 0.0134 73 8 2 0.0148 41 0 3 0.0101 73 1 3 0.0147 93 2 3 0.0181 98 3 3 0.0188 127 4 3 0.0233 313 5 3 0.0643 226 6 3 0.0488 81 7 3 0.0158 59 8 3 0.0122 37 0 4 0.00836 56 1 4 0.0114 93 2 4 0.0183 111 3 4 0.0209 150 4 4 0.0273

1023 5 4 0.348 519 6 4 0.195 134 7 4 0.0236 47 8 4 0.0100 29 0 5 0.00676 49 1 5 0.00981 78 2 5 0.0153 118 3 5 0.0225 160 4 5 0.0292 503 5 5 0.130 347 6 5 0.121 137 7 5 0.0278 43 8 5 0.0101 25 0 6 0.00609 41 1 6 0.00899 76 2 6 0.0156 145 3 6 0.0265 123 4 6 0.0261 290 5 6 0.0748 178 6 6 0.0509 126 7 6 0.0254 63 8 6 0.0128 22 0 7 0.00542 51 1 7 0.0107 65 2 7 0.0162 120 3 7 0.0284 142 4 7 0.0354 395 5 7 0.0836 122 6 7 0.0247 99 7 7 0.0285 67 8 7 0.0132 33 0 8 0.00747 70 1 8 0.0137 128 2 8 0.0249 196 3 8 0.0339 301 4 8 0.0554 289 5 8 0.0543 216 6 8 0.0388 95 7 8 0.0204 58 8 8 0.0121 41 0 9 0.00844 71 1 9 0.0132 98 2 9 0.0182 114 3 9 0.0204 199 4 9 0.0373 258 5 9 0.0469 225 6 9 0.0396 163 7 9 0.0299 84 8 9 0.0163 39 0 10 0.00785 50 1 10 0.00993 63 2 10 0.0119 78 3 10 0.0147 98 4 10 0.0188 141 5 10 0.0251 135 6 10 0.0239 99 7 10 0.0181 77 8 10 0.0145 34 0 11 0.00790 47 1 11 0.00969 50 2 11 0.0104 56 3 11 0.0111 65 4 11 0.0131 113 5 11 0.0210 98 6 11 0.0184 83 7 11 0.0158 67 8 11 0.0131 34 0 12 0.00798 42 1 12 0.00887 42 2 12 0.00902 45 3 12 0.00939 48 4 12 0.0101 72 5 12 0.0142 81 6 12 0.0153 71 7 12 0.0136 59 8 12 0.0118 35 0 13 0.00843 44 1 13 0.00943 43 2 13 0.00918 47 3 13 0.0101 66 4 13 0.0130 59 5 13 0.0126 88 6 13 0.0169 69 7 13 0.0134 59 8 13 0.0117 27 0 14 0.00727 31 1 14 0.00740 41 2 14 0.00887 49 3 14 0.0104 53 4 14 0.0111 40 5 14 0.00913 84 6 14 0.0165 63 7 14 0.0129 53 8 14 0.0111 4.00E-5

6.34E-5

1.00E-4

1.59E-4

2.52E-4

4.00E-4

6.34E-4

0.00100

0.00159

0.00252

0.00400

0.00634

0.0100

0.0159

0.0252

0.0400

0.0634

0.100

0.159

0.252

0.400

0.634

1.00

1.59

2.52

4.00

6.34

10.0

15.9

25.2

40.0

63.4 100 159 252 400 634 1.00E3

1.59E3

2.52E3

4.00E3

6.34E3

1.00E4

1.59E4

2.52E4