55 0 1 0.0165 76 1 1 0.0163 79 2 1 0.0152 76 3 1 0.0144 76 4 1 0.0144 87 5 1 0.0164 143 6 1 0.0258 652 7 1 0.182 356 8 1 0.0854 79 9 1 0.0224 74 0 2 0.0180 89 1 2 0.0173 84 2 2 0.0161 83 3 2 0.0155 83 4 2 0.0158 96 5 2 0.0177 156 6 2 0.0280

2044 7 2 0.491 627 8 2 0.187 103 9 2 0.0274 84 0 3 0.0186 95 1 3 0.0177 89 2 3 0.0165 87 3 3 0.0160 90 4 3 0.0168 99 5 3 0.0180 135 6 3 0.0242 462 7 3 0.0861 347 8 3 0.149 110 9 3 0.0240 94 0 4 0.0187 96 1 4 0.0176 90 2 4 0.0167 76 3 4 0.0145 81 4 4 0.0154 95 5 4 0.0173 112 6 4 0.0208 243 7 4 0.0416 159 8 4 0.0404 80 9 4 0.0158 74 0 5 0.0154 97 1 5 0.0182 91 2 5 0.0170 56 3 5 0.0117 46 4 5 0.0110 65 5 5 0.0131 94 6 5 0.0175 127 7 5 0.0229 82 8 5 0.0186 71 9 5 0.0143 56 0 6 0.0125 75 1 6 0.0150 66 2 6 0.0135 30 3 6 0.00756 57 4 6 0.0264 28 5 6 0.00657 43 6 6 0.00980 80 7 6 0.0157 71 8 6 0.0156 68 9 6 0.0136 56 0 7 0.0124 56 1 7 0.0117 49 2 7 0.0104 25 3 7 0.00646 32 4 7 0.0136 31 5 7 0.00693 30 6 7 0.00721 37 7 7 0.00839 62 8 7 0.0156 71 9 7 0.0143 56 0 8 0.0129 152 1 8 0.0331 96 2 8 0.0387 24 3 8 0.00615 25 4 8 0.00783 40 5 8 0.00872 33 6 8 0.00733 40 7 8 0.00880 58 8 8 0.0145 69 9 8 0.0139 46 0 9 0.0104 273 1 9 0.120 196 2 9 0.0553 68 3 9 0.0238 129 4 9 0.0272 107 5 9 0.0414 53 6 9 0.0131 55 7 9 0.0126 41 8 9 0.0108 57 9 9 0.0122 59 0 10 0.0180 80 1 10 0.0164 59 2 10 0.0114 55 3 10 0.0108 70 4 10 0.0136 87 5 10 0.0173 115 6 10 0.0266 113 7 10 0.0262 62 8 10 0.0148 51 9 10 0.0107 82 0 11 0.0160 115 1 11 0.0210 128 2 11 0.0242 180 3 11 0.0317 244 4 11 0.0396 296 5 11 0.0495 224 6 11 0.0407 142 7 11 0.0258 101 8 11 0.0202 48 9 11 0.0103 127 0 12 0.0245 187 1 12 0.0323 217 2 12 0.0370 238 3 12 0.0399 305 4 12 0.0504 276 5 12 0.0478 207 6 12 0.0346 194 7 12 0.0316 114 8 12 0.0219 53 9 12 0.0110 137 0 13 0.0270 160 1 13 0.0284 176 2 13 0.0309 236 3 13 0.0405 193 4 13 0.0355 141 5 13 0.0244 162 6 13 0.0272 173 7 13 0.0294 114 8 13 0.0209 43 9 13 0.00987 110 0 14 0.0234 149 1 14 0.0271 195 2 14 0.0342 142 3 14 0.0288 105 4 14 0.0184 116 5 14 0.0201 125 6 14 0.0219 121 7 14 0.0220 88 8 14 0.0164 40 9 14 0.00961