39 0 1 0.0130 61 1 1 0.0142 73 2 1 0.0152 78 3 1 0.0158 84 4 1 0.0171 90 5 1 0.0183 95 6 1 0.0192 101 7 1 0.0197 95 8 1 0.0199 70 9 1 0.0187 55 0 2 0.0146 74 1 2 0.0154 80 2 2 0.0162 87 3 2 0.0177 96 4 2 0.0191 103 5 2 0.0205 110 6 2 0.0215 114 7 2 0.0224 113 8 2 0.0222 95 9 2 0.0215 58 0 3 0.0142 77 1 3 0.0158 82 2 3 0.0169 91 3 3 0.0184 101 4 3 0.0202 113 5 3 0.0225 120 6 3 0.0234 122 7 3 0.0241 121 8 3 0.0238 108 9 3 0.0231 40 0 4 0.0101 74 1 4 0.0151 83 2 4 0.0171 93 3 4 0.0189 110 4 4 0.0219 123 5 4 0.0244 132 6 4 0.0262 134 7 4 0.0266 130 8 4 0.0256 119 9 4 0.0244 28 0 5 0.00748 42 1 5 0.0102 74 2 5 0.0156 74 3 5 0.0159 113 4 5 0.0228 140 5 5 0.0276 151 6 5 0.0299 153 7 5 0.0302 142 8 5 0.0281 129 9 5 0.0256 28 0 6 0.00639 21 1 6 0.00587 48 2 6 0.0108 42 3 6 0.0100 97 4 6 0.0205 163 5 6 0.0322 181 6 6 0.0359 177 7 6 0.0351 156 8 6 0.0310 132 9 6 0.0265 15 0 7 0.00437 26 1 7 0.00626 37 2 7 0.00871 45 3 7 0.0119 148 4 7 0.0674 241 5 7 0.0628 239 6 7 0.0476 211 7 7 0.0419 171 8 7 0.0345 106 9 7 0.0225 24 0 8 0.00583 27 1 8 0.00660 32 2 8 0.0126 33 3 8 0.0242 82 4 8 0.0904 206 5 8 0.0768 346 6 8 0.131 192 7 8 0.0737 151 8 8 0.0402 63 9 8 0.0177 16 0 9 0.00512 18 1 9 0.00561 18 2 9 0.00901 19 3 9 0.00769 32 4 9 0.0146 82 5 9 0.0487 359 6 9 0.104 303 7 9 0.0905 258 8 9 0.0912 156 9 9 0.0448 10 0 10 0.00334 12 1 10 0.00389 15 2 10 0.00510 16 3 10 0.00508 20 4 10 0.00579 21 5 10 0.00747 42 6 10 0.0168 49 7 10 0.0134 54 8 10 0.0188 62 9 10 0.0268 10 0 11 0.00357 9 1 11 0.00335 11 2 11 0.00426 18 3 11 0.00528 17 4 11 0.00526 16 5 11 0.00680 26 6 11 0.00657 7 7 11 0.00364 24 8 11 0.00732 41 9 11 0.00960 8 0 12 0.00355 10 1 12 0.00344 10 2 12 0.00379 13 3 12 0.00465 10 4 12 0.00388 28 5 12 0.0102 25 6 12 0.00649 13 7 12 0.00474 0 8 12 0.00204 6 9 12 0.00345 10 0 13 0.00377 11 1 13 0.00344 7 2 13 0.00273 8 3 13 0.00366 9 4 13 0.00350 37 5 13 0.0106 28 6 13 0.00772 20 7 13 0.00546 9 8 13 0.00374 0 9 13 0.00136 6 0 14 0.00288 5 1 14 0.00270 7 2 14 0.00309 3 3 14 0.00256 8 4 14 0.00346 39 5 14 0.0107 31 6 14 0.00861 20 7 14 0.00537 15 8 14 0.00490 0 9 14 0.00264