0 0 1 -0.0861 0 1 1 0.00928 0 2 1 3.26E-4 0 3 1 0.0109 0 4 1 -0.00545 0 5 1 0.00670 0 6 1 -5.32E-4 0 7 1 0.00998 0 8 1 0.0259 0 9 1 0.0850 0 0 2 -0.0182 0 1 2 0.00575 0 2 2 0.0248 0 3 2 0.00995 0 4 2 0.0362 0 5 2 0.0295 0 6 2 0.0519 0 7 2 0.0613 0 8 2 0.0414 0 9 2 0.0688 0 0 3 -0.0144 0 1 3 6.67E-4 0 2 3 0.00951 0 3 3 0.0287 0 4 3 0.0111 0 5 3 0.0254 0 6 3 0.0309 0 7 3 0.00738 0 8 3 0.0318 0 9 3 0.0183 0 0 4 0.0240 0 1 4 0.00461 0 2 4 -0.00123 0 3 4 0.0120 0 4 4 0.00339 0 5 4 0.0242 0 6 4 0.0197 0 7 4 0.0182 0 8 4 0.0190 0 9 4 0.0353 0 0 5 -0.00697 0 1 5 -0.0187 0 2 5 -0.0160 0 3 5 0.00530 0 4 5 -0.0156 0 5 5 -0.00317 0 6 5 -0.00209 0 7 5 0.0117 0 8 5 0.0282 0 9 5 0.00312 0 0 6 0.00926 0 1 6 -0.00198 0 2 6 0.0225 0 3 6 0.0365 0 4 6 0.0274 0 5 6 0.0462 0 6 6 0.0227 0 7 6 0.0248 0 8 6 0.0323 0 9 6 0.0386 4 0 7 0.502 4 1 7 0.465 14 2 7 1.07 10 3 7 0.758 0 4 7 0.192 0 5 7 0.262 0 6 7 0.151 0 7 7 0.180 0 8 7 0.238 0 9 7 0.226 20 0 8 1.07 37 1 8 2.26 54 2 8 3.26 34 3 8 1.93 6 4 8 0.928 15 5 8 2.74 23 6 8 5.30 16 7 8 3.73 14 8 8 2.80 7 9 8 14.5 35 0 9 2.20 51 1 9 4.88 60 2 9 4.78 114 3 9 10.6 51 4 9 3.21 69 5 9 4.21 63 6 9 3.12 31 7 9 1.71 15 8 9 0.898 18 9 9 1.26 36 0 10 1.84 29 1 10 1.30 44 2 10 2.10 68 3 10 3.01 12 4 10 0.747 5 5 10 0.704 8 6 10 0.678 5 7 10 0.496 3 8 10 0.420 0 9 10 0.359 99 0 11 4.45 45 1 11 1.92 35 2 11 1.62 55 3 11 2.48 8 4 11 0.532 0 5 11 0.167 0 6 11 0.180 2 7 11 0.426 0 8 11 0.256 0 9 11 0.240 9 0 12 0.704 4 1 12 0.453 10 2 12 0.622 7 3 12 0.532 0 4 12 0.270 0 5 12 0.239 0 6 12 0.592 0 7 12 0.283 0 8 12 0.150 0 9 12 0.0811 1 0 13 0.425 0 1 13 0.345 0 2 13 0.227 9 3 13 0.836 0 4 13 0.211 0 5 13 0.157 0 6 13 0.230 0 7 13 0.185 0 8 13 0.125 0 9 13 0.125 0 0 14 0.262 0 1 14 0.165 0 2 14 0.162 0 3 14 0.167 0 4 14 0.0863 0 5 14 0.107 0 6 14 0.181 0 7 14 0.122 0 8 14 0.108 0 9 14 0.107