40^0 1 0.00420 60 1 1 0.00569 65 2 1 0.00613 62 3 1 0.00601 58 4 1 0.00567 58 5 1 0.00567 59 6 1 0.00563 57 7 1 0.00547 51 8 1 0.00510 32 9 1 0.00368 64 0 2 0.00616 80 1 2 0.00751 76 2 2 0.00748 74 3 2 0.00728 73 4 2 0.00701 72 5 2 0.00697 71 6 2 0.00690 71 7 2 0.00689 69 8 2 0.00668 55 9 2 0.00551 90 0 3 0.00850 99 1 3 0.00943 96 2 3 0.00898 92 3 3 0.00856 91 4 3 0.00849 95 5 3 0.00847 90 6 3 0.00838 88 7 3 0.00821 89 8 3 0.00819 85 9 3 0.00766 105 0 4 0.00987 112 1 4 0.0104 108 2 4 0.00998 99 3 4 0.00964 98 4 4 0.00929 99 5 4 0.00927 99 6 4 0.00936 99 7 4 0.00927 101 8 4 0.00917 96 9 4 0.00907 130 0 5 0.0123 132 1 5 0.0126 124 2 5 0.0120 122 3 5 0.0117 120 4 5 0.0117 121 5 5 0.0117 122 6 5 0.0116 118 7 5 0.0114 121 8 5 0.0114 121 9 5 0.0113 151 0 6 0.0145 152 1 6 0.0145 151 2 6 0.0144 144 3 6 0.0138 142 4 6 0.0137 148 5 6 0.0141 147 6 6 0.0141 141 7 6 0.0135 143 8 6 0.0135 144 9 6 0.0135 176 0 7 0.0185 185 1 7 0.0174 189 2 7 0.0184 176 3 7 0.0167 165 4 7 0.0163 185 5 7 0.0178 183 6 7 0.0176 168 7 7 0.0164 163 8 7 0.0156 153 9 7 0.0146 128 0 8 0.0155 155 1 8 0.0202 180 2 8 0.0399 179 3 8 0.0326 135 4 8 0.0173 181 5 8 0.0481 299 6 8 0.0791 201 7 8 0.0551 148 8 8 0.0310 160 9 8 0.0196 55 0 9 0.00934 124 1 9 0.0330 103 2 9 0.0329 105 3 9 0.0204 130 4 9 0.0357 108 5 9 0.0234 96 6 9 0.0146 112 7 9 0.0143 142 8 9 0.0353 288 9 9 0.0898 11 0 10 0.00354 47 1 10 0.0152 45 2 10 0.00961 51 3 10 0.0104 80 4 10 0.0338 72 5 10 0.0150 69 6 10 0.00965 50 7 10 0.00861 50 8 10 0.00789 109 9 10 0.0377 9 0 11 0.00724 20 1 11 0.00861 19 2 11 0.00439 35 3 11 0.00937 26 4 11 0.00622 39 5 11 0.0288 10 6 11 0.00248 26 7 11 0.00361 44 8 11 0.00508 88 9 11 0.0139 0 0 12 9.73E-4 5 1 12 0.00173 10 2 12 0.00225 45 3 12 0.00769 24 4 12 0.00346 34 5 12 0.00467 33 6 12 0.00513 49 7 12 0.00924 46 8 12 0.00539 116 9 12 0.0362 0 0 13 0.00123 1 1 13 0.00131 0 2 13 0.00109 16 3 13 0.00264 32 4 13 0.00414 33 5 13 0.00418 94 6 13 0.0110 50 7 13 0.00587 52 8 13 0.00869 91 9 13 0.0176 2 0 14 0.00131 6 1 14 0.00172 7 2 14 0.00162 8 3 14 0.00172 13 4 14 0.00205 22 5 14 0.00293 101 6 14 0.0150 31 7 14 0.00443 36 8 14 0.00524 54 9 14 0.00727