8 0 1 1.38E-5 13 1 1 6.47E-5 94 2 1 0.00132 422 3 1 0.00167 351 4 1 0.00136 73 5 1 6.22E-4 16 6 1 5.16E-5 10 7 1 2.80E-5 10 0 2 1.39E-5 788 1 2 0.00288 703 2 2 0.00335 434 3 2 0.00201 347 4 2 0.00159 333 5 2 0.00152 64 6 2 6.51E-4 12 7 2 2.55E-5 17 0 3 6.53E-5

1551 1 3 0.00713 810 2 3 0.00398 468 3 3 0.00218 363 4 3 0.00168 344 5 3 0.00159 387 6 3 0.00166 12 7 3 3.15E-5 17 0 4 8.18E-5 725 1 4 0.00755

1297 2 4 0.00695 607 3 4 0.00291 432 4 4 0.00202 413 5 4 0.00195 462 6 4 0.00195 12 7 4 2.88E-5 12 0 5 2.71E-5 442 1 5 0.00172 808 2 5 0.00561 969 3 5 0.00462 605 4 5 0.00274 548 5 5 0.00215 76 6 5 9.69E-4 12 7 5 3.05E-5 8 0 6 9.06E-6 17 1 6 1.58E-4 68 2 6 7.71E-4 70 3 6 6.14E-4 43 4 6 2.63E-4 28 5 6 1.01E-4 12 6 6 3.19E-5 8 7 6 1.40E-5