5 0 1 2.89E-6 9 1 1 3.04E-5 74 2 1 6.28E-4 241 3 1 0.00103 239 4 1 0.00102 64 5 1 5.27E-4 11 6 1 3.56E-5 7 7 1 1.65E-5 8 0 2 1.42E-5 233 1 2 0.00118 354 2 2 0.00177 315 3 2 0.00157 320 4 2 0.00159 342 5 2 0.00171 62 6 2 7.22E-4 10 7 2 2.73E-5 12 0 3 4.73E-5 743 1 3 0.00381 493 2 3 0.00251 426 3 3 0.00216 437 4 3 0.00221 485 5 3 0.00249 548 6 3 0.00261 10 7 3 3.31E-5 12 0 4 4.96E-5 449 1 4 0.00277 857 2 4 0.00446 783 3 4 0.00416 823 4 4 0.00448

1005 5 4 0.00556 809 6 4 0.00385 11 7 4 3.79E-5 9 0 5 2.51E-5 312 1 5 0.00133 553 2 5 0.00392

1501 3 5 0.00723

2060 4 5 0.0106 782 5 5 0.00732 131 6 5 0.00142 10 7 5 3.42E-5 7 0 6 1.26E-5 15 1 6 1.49E-4 70 2 6 8.68E-4 95 3 6 0.00112 126 4 6 0.00121 34 5 6 4.23E-4 12 6 6 4.21E-5 7 7 6 1.85E-5