-13 0 1 -6.69E-4 -1 1 1 -5.76E-5 6 2 1 2.85E-4 14 3 1 6.90E-4 18 4 1 8.84E-4 16 5 1 8.23E-4 24 6 1 0.00118 28 7 1 0.00137 -3 0 2 -1.12E-4 8 1 2 4.11E-4 15 2 2 7.75E-4 26 3 2 0.00139 36 4 2 0.00185 37 5 2 0.00192 38 6 2 0.00196 39 7 2 0.00194 10 0 3 6.21E-4 19 1 3 0.00106 30 2 3 0.00167 47 3 3 0.00261 64 4 3 0.00350 66 5 3 0.00356 58 6 3 0.00309 52 7 3 0.00271 19 0 4 0.00114 27 1 4 0.00156 50 2 4 0.00279 104 3 4 0.00849 214 4 4 0.0258 136 5 4 0.00812 83 6 4 0.00438 66 7 4 0.00360 49 0 5 -0.00607 -3 1 5 1.76E-5 29 2 5 0.00542 89 3 5 0.0104 101 4 5 0.0140 51 5 5 0.00533 41 6 5 0.00627 55 7 5 0.00847 31 0 6 -0.00843 12 1 6 0.00305 27 2 6 0.00176 177 3 6 0.00613 227 4 6 0.0102 341 5 6 0.0178 444 6 6 0.0238 639 7 6 0.0334