-2 0 1 8.86E-6 -1 1 1 1.01E-5 -1 2 1 1.21E-5 0 3 1 1.56E-5 0 4 1 3.90E-6 -1 5 1 1.22E-5 0 6 1 2.62E-5 0 7 1 1.88E-5 1 8 1 2.03E-5 2 9 1 2.08E-5 0 10 1 2.34E-5 0 11 1 1.29E-5 0 12 1 1.39E-5 1 13 1 2.78E-5 2 14 1 3.42E-5 2 15 1 4.96E-5 2 16 1 4.75E-5 2 17 1 3.69E-5 1 18 1 2.38E-5 -1 19 1 2.08E-5 -2 20 1 8.17E-6 -3 21 1 7.85E-6 0 22 1 2.85E-5 0 23 1 2.24E-5 0 24 1 2.03E-5 0 25 1 2.42E-5 -3 26 1 -4.30E-6 -2 27 1 4.00E-6 -1 28 1 1.36E-5 -1 29 1 1.32E-6 0 30 1 1.80E-5 -2 31 1 4.39E-6 -1 0 2 4.72E-6 -1 1 2 1.73E-6 -1 2 2 1.16E-6 -1 3 2 1.12E-5 0 4 2 2.07E-5 0 5 2 1.76E-5 0 6 2 7.54E-6 1 7 2 2.26E-5 1 8 2 2.67E-5 1 9 2 2.90E-5 1 10 2 2.43E-5 2 11 2 4.14E-5 11 12 2 1.58E-4 28 13 2 2.97E-4 42 14 2 4.14E-4 51 15 2 4.78E-4 51 16 2 4.77E-4 48 17 2 4.38E-4 31 18 2 3.42E-4 14 19 2 1.71E-4 2 20 2 4.32E-5 1 21 2 3.40E-5 0 22 2 2.75E-5 0 23 2 1.35E-5 0 24 2 1.75E-5 1 25 2 3.18E-5 0 26 2 2.31E-5 -1 27 2 1.55E-5 -1 28 2 -2.94E-6 0 29 2 1.20E-5 -1 30 2 1.45E-6 -2 31 2 4.15E-7 1 0 3 2.33E-5 0 1 3 1.64E-5 1 2 3 2.47E-5 0 3 3 2.45E-5 2 4 3 2.54E-5 2 5 3 2.41E-5 1 6 3 2.92E-5 3 7 3 3.67E-5 1 8 3 1.90E-5 4 9 3 5.42E-5 19 10 3 2.40E-4 54 11 3 5.25E-4 64 12 3 6.38E-4 66 13 3 6.60E-4 65 14 3 6.33E-4 68 15 3 6.71E-4 68 16 3 6.54E-4 69 17 3 6.82E-4 70 18 3 6.81E-4 70 19 3 6.88E-4 58 20 3 6.08E-4 23 21 3 2.61E-4 4 22 3 5.35E-5 2 23 3 3.17E-5 0 24 3 1.81E-5 0 25 3 1.55E-5 0 26 3 1.48E-5 0 27 3 1.70E-5 0 28 3 1.27E-5 0 29 3 1.40E-5 -1 30 3 2.51E-6 -1 31 3 6.27E-6 0 0 4 1.36E-5 0 1 4 2.70E-5 1 2 4 1.84E-5 0 3 4 1.69E-5 1 4 4 3.51E-5 1 5 4 3.56E-5 3 6 4 5.04E-5 2 7 4 2.94E-5 6 8 4 9.49E-5 49 9 4 4.68E-4 72 10 4 7.17E-4 71 11 4 7.02E-4 69 12 4 6.88E-4 71 13 4 6.94E-4 70 14 4 6.99E-4 68 15 4 6.73E-4 71 16 4 6.84E-4 70 17 4 6.95E-4 74 18 4 7.27E-4 78 19 4 7.61E-4 77 20 4 7.76E-4 73 21 4 8.93E-4 47 22 4 4.80E-4 9 23 4 1.22E-4 1 24 4 3.85E-5 1 25 4 3.60E-5 0 26 4 3.10E-5 1 27 4 2.40E-5 1 28 4 2.58E-5 1 29 4 2.37E-5 -2 30 4 7.55E-6 -1 31 4 1.39E-5 -1 0 5 -2.13E-7 -2 1 5 4.97E-6 -2 2 5 1.18E-5 -1 3 5 -8.46E-6 -1 4 5 9.51E-6 -1 5 5 1.04E-5 1 6 5 2.70E-5 5 7 5 8.23E-5 59 8 5 5.56E-4 72 9 5 6.98E-4 71 10 5 6.88E-4 73 11 5 7.13E-4 71 12 5 6.95E-4 72 13 5 7.00E-4 72 14 5 7.10E-4 72 15 5 7.08E-4 72 16 5 7.18E-4 72 17 5 7.12E-4 72 18 5 7.11E-4 76 19 5 7.34E-4 81 20 5 7.92E-4 75 21 5 7.26E-4 76 22 5 9.97E-4 56 23 5 5.61E-4 7 24 5 1.03E-4 1 25 5 2.30E-5 0 26 5 1.37E-5 0 27 5 4.27E-6 1 28 5 2.23E-5 -2 29 5 -1.06E-6 -2 30 5 7.77E-6 -2 31 5 -6.46E-7 -2 0 6 1.96E-6 -1 1 6 1.35E-5 0 2 6 2.02E-5 1 3 6 2.83E-5 0 4 6 2.64E-5 1 5 6 3.15E-5 3 6 6 5.90E-5 59 7 6 5.50E-4 74 8 6 7.28E-4 75 9 6 7.39E-4 78 10 6 7.69E-4 77 11 6 7.62E-4 76 12 6 7.55E-4 79 13 6 7.76E-4 78 14 6 7.63E-4 77 15 6 7.58E-4 77 16 6 7.60E-4 76 17 6 7.39E-4 76 18 6 7.56E-4 78 19 6 7.72E-4 83 20 6 8.18E-4 83 21 6 8.25E-4 81 22 6 7.92E-4 78 23 6 0.00107 54 24 6 5.13E-4 5 25 6 7.58E-5 0 26 6 2.48E-5 0 27 6 2.14E-5 -1 28 6 1.42E-5 -2 29 6 3.92E-6 -2 30 6 3.32E-6 -2 31 6 4.74E-6 -1 0 7 7.43E-6 1 1 7 2.61E-5 -1 2 7 1.37E-5 2 3 7 3.19E-5 0 4 7 1.50E-5 2 5 7 3.79E-5 31 6 7 3.91E-4 77 7 7 7.64E-4 79 8 7 7.71E-4 80 9 7 7.76E-4 81 10 7 7.88E-4 82 11 7 8.09E-4 86 12 7 8.27E-4 86 13 7 8.36E-4 83 14 7 8.08E-4 86 15 7 8.30E-4 84 16 7 8.17E-4 84 17 7 8.20E-4 81 18 7 8.12E-4 83 19 7 8.09E-4 90 20 7 8.80E-4 94 21 7 9.14E-4 89 22 7 8.69E-4 82 23 7 8.78E-4 75 24 7 9.79E-4 41 25 7 4.04E-4 2 26 7 3.23E-5 2 27 7 2.98E-5 1 28 7 2.31E-5 -1 29 7 7.58E-6 -2 30 7 6.93E-6 -2 31 7 -3.10E-6 1 0 8 2.18E-5 1 1 8 6.14E-6 -1 2 8 4.82E-6 1 3 8 2.44E-5 1 4 8 1.61E-5 8 5 8 1.09E-4 82 6 8 7.76E-4 79 7 8 7.68E-4 83 8 8 7.92E-4 85 9 8 8.28E-4 89 10 8 8.72E-4 88 11 8 8.54E-4 89 12 8 8.69E-4 93 13 8 8.96E-4 94 14 8 9.05E-4 97 15 8 9.26E-4 95 16 8 9.19E-4 93 17 8 9.11E-4 92 18 8 8.82E-4 90 19 8 8.68E-4 97 20 8 9.29E-4 100 21 8 9.64E-4 104 22 8 0.00101 90 23 8 8.65E-4 91 24 8 0.00125 72 25 8 6.97E-4 11 26 8 1.33E-4 1 27 8 2.31E-5 0 28 8 1.63E-5 0 29 8 -2.35E-7 -1 30 8 6.70E-6 0 31 8 1.23E-6 1 0 9 1.52E-5 1 1 9 5.42E-6 -2 2 9 -8.41E-6 2 3 9 2.94E-5 1 4 9 1.94E-5 37 5 9 4.59E-4 88 6 9 8.55E-4 86 7 9 8.36E-4 91 8 9 8.87E-4 93 9 9 8.99E-4 96 10 9 9.35E-4 97 11 9 9.39E-4 99 12 9 9.47E-4 105 13 9 0.00102 109 14 9 0.00104 109 15 9 0.00105 109 16 9 0.00104 108 17 9 0.00103 103 18 9 0.00100 103 19 9 9.99E-4 107 20 9 0.00101 113 21 9 0.00108 110 22 9 0.00107 103 23 9 9.80E-4 93 24 9 0.00105 72 25 9 0.00109 21 26 9 2.24E-4 2 27 9 2.36E-5 1 28 9 2.00E-5 1 29 9 1.10E-5 -1 30 9 3.28E-6 -1 31 9 -2.12E-6 2 0 10 2.21E-5 0 1 10 1.57E-5 1 2 10 2.80E-5 1 3 10 2.22E-5 4 4 10 4.61E-5 52 5 10 5.74E-4 70 6 10 6.44E-4 77 7 10 6.83E-4 96 8 10 9.75E-4 108 9 10 0.00105 109 10 10 0.00105 109 11 10 0.00107 114 12 10 0.00110 120 13 10 0.00117 126 14 10 0.00122 131 15 10 0.00126 133 16 10 0.00128 124 17 10 0.00120 118 18 10 0.00113 115 19 10 0.00111 122 20 10 0.00121 130 21 10 0.00125 125 22 10 0.00121 87 23 10 8.29E-4 69 24 10 6.84E-4 60 25 10 0.00114 27 26 10 3.14E-4 4 27 10 5.74E-5 3 28 10 3.57E-5 0 29 10 1.57E-5 0 30 10 1.52E-5 1 31 10 1.26E-5 1 0 11 2.72E-5 0 1 11 1.23E-5 3 2 11 5.23E-5 2 3 11 2.79E-5 5 4 11 7.45E-5 34 5 11 3.63E-4 18 6 11 2.01E-4 16 7 11 1.86E-4 24 8 11 3.24E-4 28 9 11 3.88E-4 55 10 11 6.48E-4 120 11 11 0.00116 131 12 11 0.00127 141 13 11 0.00137 151 14 11 0.00148 159 15 11 0.00148 143 16 11 0.00120 72 17 11 8.66E-4 51 18 11 5.45E-4 57 19 11 5.87E-4 56 20 11 5.87E-4 44 21 11 4.62E-4 38 22 11 4.50E-4 37 23 11 3.82E-4 54 24 11 5.45E-4 79 25 11 0.00131 87 26 11 8.67E-4 10 27 11 1.30E-4 2 28 11 3.22E-5 2 29 11 2.47E-5 -1 30 11 1.00E-5 1 31 11 1.92E-5 1 0 12 1.83E-5 1 1 12 2.70E-5 0 2 12 2.32E-5 2 3 12 3.30E-5 9 4 12 1.10E-4 30 5 12 3.08E-4 25 6 12 2.63E-4 17 7 12 2.03E-4 23 8 12 3.30E-4 19 9 12 2.06E-4 35 10 12 4.08E-4 79 11 12 8.14E-4 61 12 12 6.99E-4 98 13 12 0.00132 136 14 12 0.00424 75 15 12 0.00303 48 16 12 4.76E-4 46 17 12 4.79E-4 80 18 12 9.54E-4 188 19 12 0.00319 109 20 12 0.00546 62 21 12 0.00403 257 22 12 0.00542 204 23 12 0.00262 101 24 12 0.00105 113 25 12 0.00150 116 26 12 0.00158 19 27 12 2.87E-4 2 28 12 3.43E-5 2 29 12 2.73E-5 2 30 12 2.52E-5 1 31 12 2.05E-5 0 0 13 2.73E-5 1 1 13 2.31E-5 1 2 13 2.60E-5 2 3 13 2.90E-5 13 4 13 1.89E-4 84 5 13 0.00124 82 6 13 0.00115 141 7 13 0.00165 490 8 13 0.00633 98 9 13 0.00185 99 10 13 0.00108 84 11 13 8.83E-4 59 12 13 6.18E-4 57 13 13 6.24E-4 93 14 13 0.00162 85 15 13 8.70E-4 75 16 13 7.75E-4 87 17 13 9.05E-4 90 18 13 9.21E-4 99 19 13 9.97E-4 120 20 13 0.00121 96 21 13 0.00106 203 22 13 0.00271 408 23 13 0.00547 154 24 13 0.00330 189 25 13 0.00403 165 26 13 0.00257 23 27 13 0.00141 3 28 13 3.40E-5 0 29 13 3.13E-5 0 30 13 1.09E-5 -1 31 13 7.45E-6 0 0 14 2.67E-5 1 1 14 2.65E-5 1 2 14 2.89E-5 3 3 14 5.43E-5 13 4 14 2.03E-4 132 5 14 0.00149 143 6 14 0.00182 340 7 14 0.00362 621 8 14 0.00739

1869 9 14 0.0171

1693 10 14 0.0139

1280 11 14 0.0110 122 12 14 0.00243 110 13 14 0.00185 80 14 14 7.79E-4 62 15 14 6.78E-4 65 16 14 8.03E-4 55 17 14 5.85E-4 47 18 14 4.85E-4 48 19 14 4.89E-4 53 20 14 5.32E-4 61 21 14 6.09E-4 87 22 14 8.36E-4 90 23 14 8.77E-4 89 24 14 8.63E-4 114 25 14 0.00259 486 26 14 0.00621 21 27 14 3.56E-4 3 28 14 4.79E-5 3 29 14 4.04E-5 2 30 14 3.74E-5 0 31 14 2.73E-5 1 0 15 3.25E-5 1 1 15 3.21E-5 1 2 15 2.06E-5 1 3 15 3.51E-5 7 4 15 1.01E-4 115 5 15 0.00145 209 6 15 0.00239 313 7 15 0.00387 446 8 15 0.00486 790 9 15 0.00937

2107 10 15 0.0193

2327 11 15 0.0231

1789 12 15 0.0174

1630 13 15 0.0159

1620 14 15 0.0130 515 15 15 0.00826 763 16 15 0.00805 262 17 15 0.00471 580 18 15 0.00790 134 19 15 0.00606 109 20 15 0.00219 110 21 15 0.00191 182 22 15 0.00458 136 23 15 0.00391 678 24 15 0.00687 988 25 15 0.00998

1410 26 15 0.0129 19 27 15 4.51E-4 2 28 15 4.56E-5 0 29 15 2.28E-5 1 30 15 3.04E-5 0 31 15 1.58E-5 1 0 16 3.49E-5 0 1 16 2.25E-5 1 2 16 3.02E-5 3 3 16 4.68E-5 6 4 16 7.49E-5 97 5 16 0.00135 184 6 16 0.00235 424 7 16 0.00452 275 8 16 0.00324 603 9 16 0.00634 807 10 16 0.00866

2294 11 16 0.0188

2333 12 16 0.0233

1979 13 16 0.0196

1855 14 16 0.0187

1921 15 16 0.0192

1262 16 16 0.0132

1089 17 16 0.0110

1614 18 16 0.0166

1964 19 16 0.0192

1529 20 16 0.0150

1016 21 16 0.0105

1239 22 16 0.0126

1609 23 16 0.0158

1258 24 16 0.0133

1604 25 16 0.0161 929 26 16 0.00947 17 27 16 1.76E-4 4 28 16 5.87E-5 1 29 16 2.61E-5 0 30 16 1.54E-5 1 31 16 2.15E-5 1 0 17 6.17E-6 0 1 17 3.22E-6 1 2 17 8.66E-6 2 3 17 2.24E-5 4 4 17 3.72E-5 39 5 17 0.00103 188 6 17 0.00213 351 7 17 0.00452 241 8 17 0.00277 483 9 17 0.00516 599 10 17 0.00614 754 11 17 0.00785 922 12 17 0.0116

2164 13 17 0.0181

2436 14 17 0.0243

2373 15 17 0.0232

1590 16 17 0.0173

1585 17 17 0.0165

1988 18 17 0.0196

2152 19 17 0.0212

2058 20 17 0.0200

1359 21 17 0.0139

2162 22 17 0.0208

1793 23 17 0.0175

1459 24 17 0.0153 903 25 17 0.0111 163 26 17 0.00220 10 27 17 9.39E-5 1 28 17 1.93E-5 2 29 17 2.13E-5 0 30 17 -7.54E-7 -2 31 17 -1.43E-5 2 0 18 2.55E-5 0 1 18 9.76E-6 1 2 18 2.60E-5 3 3 18 3.58E-5 4 4 18 5.26E-5 11 5 18 1.79E-4 162 6 18 0.00191 233 7 18 0.00358 199 8 18 0.00252 356 9 18 0.00417 483 10 18 0.00519 448 11 18 0.00480 656 12 18 0.00741 639 13 18 0.00781 885 14 18 0.0102

1392 15 18 0.0156

1574 16 18 0.0147

1540 17 18 0.0164

2455 18 18 0.0225

2450 19 18 0.0241

1970 20 18 0.0195

1683 21 18 0.0165

2312 22 18 0.0186 821 23 18 0.0103 579 24 18 0.00621 325 25 18 0.00310 22 26 18 3.41E-4 5 27 18 6.46E-5 2 28 18 3.29E-5 1 29 18 2.69E-5 0 30 18 1.27E-5 -1 31 18 7.29E-6 0 0 19 1.97E-5 1 1 19 1.92E-5 1 2 19 2.53E-5 2 3 19 3.01E-5 3 4 19 3.79E-5 5 5 19 6.45E-5 41 6 19 9.11E-4 224 7 19 0.00279 204 8 19 0.00300 226 9 19 0.00278 446 10 19 0.00458 519 11 19 0.00555 450 12 19 0.00510 403 13 19 0.00497 580 14 19 0.00692 570 15 19 0.00664 596 16 19 0.00629 739 17 19 0.00750 895 18 19 0.00978 938 19 19 0.00895 749 20 19 0.00683 711 21 19 0.00730 569 22 19 0.00623 468 23 19 0.00491 358 24 19 0.00366 46 25 19 0.00130 10 26 19 1.10E-4 4 27 19 4.65E-5 2 28 19 4.48E-5 1 29 19 1.46E-5 0 30 19 1.20E-5 0 31 19 1.21E-5 -2 0 20 1.47E-6 -2 1 20 -5.80E-6 0 2 20 -1.13E-6 0 3 20 2.21E-5 0 4 20 4.04E-6 2 5 20 2.82E-5 6 6 20 7.98E-5 116 7 20 0.00149 237 8 20 0.00334 180 9 20 0.00241 205 10 20 0.00273 490 11 20 0.00502 544 12 20 0.00553 507 13 20 0.00520 371 14 20 0.00380 381 15 20 0.00446 394 16 20 0.00425 480 17 20 0.00510 478 18 20 0.00532 417 19 20 0.00522 459 20 20 0.00518 365 21 20 0.00438 425 22 20 0.00452 369 23 20 0.00392 225 24 20 0.00235 11 25 20 1.31E-4 3 26 20 4.13E-5 2 27 20 3.86E-5 0 28 20 1.73E-5 -1 29 20 1.11E-6 -1 30 20 -4.46E-6 -1 31 20 -3.79E-6 0 0 21 1.17E-5 1 1 21 2.65E-5 -1 2 21 1.09E-5 2 3 21 3.09E-5 1 4 21 1.74E-5 0 5 21 1.71E-5 1 6 21 2.06E-5 9 7 21 1.37E-4 103 8 21 0.00195 194 9 21 0.00255 247 10 21 0.00295 199 11 21 0.00226 409 12 21 0.00454 434 13 21 0.00459 412 14 21 0.00438 395 15 21 0.00440 444 16 21 0.00452 324 17 21 0.00326 381 18 21 0.00408 341 19 21 0.00353 399 20 21 0.00418 359 21 21 0.00417 331 22 21 0.00392 252 23 21 0.00279 13 24 21 2.24E-4 4 25 21 4.13E-5 2 26 21 3.06E-5 1 27 21 2.39E-5 1 28 21 2.51E-5 0 29 21 1.18E-5 -1 30 21 9.10E-6 -2 31 21 3.67E-6 -1 0 22 -4.34E-6 -2 1 22 -8.36E-6 -1 2 22 -1.06E-5 -1 3 22 -7.24E-6 0 4 22 7.87E-6 0 5 22 7.10E-7 0 6 22 4.72E-6 2 7 22 3.57E-5 7 8 22 9.83E-5 99 9 22 0.00199 206 10 22 0.00243 226 11 22 0.00260 184 12 22 0.00211 149 13 22 0.00204 303 14 22 0.00384 305 15 22 0.00313 493 16 22 0.00515 380 17 22 0.00381 420 18 22 0.00449 512 19 22 0.00555 349 20 22 0.00393 279 21 22 0.00334 232 22 22 0.00212 11 23 22 2.29E-4 3 24 22 4.00E-5 1 25 22 2.80E-5 0 26 22 1.46E-5 -1 27 22 6.37E-6 -1 28 22 -1.07E-6 -1 29 22 -1.32E-5 -2 30 22 -6.99E-6 -1 31 22 -1.10E-5 -1 0 23 3.45E-6 -1 1 23 -8.28E-6 -1 2 23 1.65E-8 -1 3 23 2.74E-6 0 4 23 1.58E-5 0 5 23 4.29E-6 1 6 23 1.39E-5 0 7 23 1.02E-5 2 8 23 3.06E-5 4 9 23 4.59E-5 19 10 23 4.71E-4 120 11 23 0.00152 188 12 23 0.00216 152 13 23 0.00155 143 14 23 0.00143 119 15 23 0.00141 165 16 23 0.00230 214 17 23 0.00232 204 18 23 0.00255 192 19 23 0.00219 145 20 23 0.00200 25 21 23 5.32E-4 7 22 23 7.55E-5 2 23 23 2.56E-5 1 24 23 2.49E-5 0 25 23 8.26E-6 1 26 23 1.73E-5 0 27 23 4.81E-6 -1 28 23 2.19E-7 -2 29 23 -1.24E-5 -2 30 23 -7.49E-6 -2 31 23 -1.20E-5 -2 0 24 -1.27E-5 -3 1 24 -1.34E-5 -2 2 24 -1.96E-5 -1 3 24 -6.33E-7 0 4 24 2.07E-6 0 5 24 1.60E-5 0 6 24 4.00E-7 1 7 24 2.08E-5 0 8 24 5.79E-6 0 9 24 1.08E-5 2 10 24 3.69E-5 6 11 24 7.18E-5 12 12 24 2.70E-4 29 13 24 6.83E-4 68 14 24 8.42E-4 84 15 24 7.72E-4 98 16 24 8.58E-4 67 17 24 6.42E-4 34 18 24 5.57E-4 15 19 24 3.42E-4 7 20 24 7.86E-5 3 21 24 3.64E-5 1 22 24 1.47E-5 2 23 24 3.31E-5 -1 24 24 7.16E-6 1 25 24 1.87E-5 0 26 24 7.74E-6 0 27 24 9.87E-6 -2 28 24 -1.28E-5 -3 29 24 -1.12E-5 -3 30 24 -2.22E-5 -3 31 24 -1.60E-5