0 0 1 4.51E-4 0 1 1 6.65E-4 4 2 1 0.00165 8 3 1 0.00326 8 4 1 0.00337 4 5 1 0.00182 0 6 1 6.78E-4 0 7 1 4.07E-4 0 0 2 4.76E-4 8 1 2 0.00268 16 2 2 0.00768 20 3 2 0.00898 20 4 2 0.00827 16 5 2 0.00850 8 6 2 0.00769 0 7 2 6.88E-4 0 0 3 2.02E-4 12 1 3 0.00579 20 2 3 0.0120 56 3 3 0.0829 32 4 3 0.0144 24 5 3 0.0108 28 6 3 0.0268 0 7 3 1.87E-4 0 0 4 7.13E-4 36 1 4 0.0733 64 2 4 0.0735 112 3 4 0.126 344 4 4 0.233 80 5 4 0.0716 44 6 4 0.0414 0 7 4 8.38E-4 0 0 5 6.22E-4 16 1 5 0.0473 196 2 5 0.162 512 3 5 0.206 124 4 5 0.139 460 5 5 0.184 16 6 5 0.0550 0 7 5 6.94E-4 0 0 6 5.53E-4 0 1 6 8.72E-4 12 2 6 0.0219 20 3 6 0.0391 12 4 6 0.00661 12 5 6 0.00556 4 6 6 0.00137 0 7 6 5.24E-4