0 0 1 -5.77E-5 0 1 1 2.32E-7 6 2 1 5.31E-4 48 3 1 0.00357 106 4 1 0.00762 10 5 1 0.00463 1 6 1 2.36E-5 0 7 1 -4.34E-5 0 0 2 2.44E-5 8 1 2 5.37E-4 29 2 2 0.00163 29 3 2 0.00165 37 4 2 0.00220 112 5 2 0.00992 12 6 2 0.00530 0 7 2 1.05E-5 0 0 3 3.85E-5 24 1 3 0.00131 20 2 3 0.00106 16 3 3 8.34E-4 16 4 3 9.14E-4 32 5 3 0.00191 137 6 3 0.0100 0 7 3 5.65E-5 0 0 4 -2.00E-5 28 1 4 0.00148 16 2 4 8.37E-4 12 3 4 6.60E-4 13 4 4 7.25E-4 24 5 4 0.00132 88 6 4 0.00720 0 7 4 -3.98E-6 0 0 5 -3.18E-6 17 1 5 0.00106 20 2 5 0.00111 14 3 5 7.55E-4 16 4 5 8.53E-4 28 5 5 0.00147 15 6 5 0.00162 0 7 5 -1.28E-5 0 0 6 -2.53E-5 0 1 6 2.91E-5 18 2 6 0.00108 24 3 6 0.00136 20 4 6 0.00113 12 5 6 6.35E-4 0 6 6 5.76E-6 0 7 6 -6.23E-5